DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2012-028 July 2012

Measurement of High-Q^2 Neutral Current Cross-Sections with Longitudinally Polarised Positrons with the ZEUS Detector

by

T. P. Stewart

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG