DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2012-036 September 2012

Limits on Neutrino Oscillations in the CNGS Neutrino Beam and Event Classification with the OPERA Detector

by

T. Ferber

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG