DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2012-037 September 2012

Measurement of Differential tt̄ Cross Sections in the Dilepton Decay Channels with the CMS Detector at 7 TeV Centre-of-Mass Energy

by

W. Behrenhoff

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG