DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2012-040 October 2012

Commissioning and LED System Tests of the Engineering Prototype of the Analog Hadronic Calorimeter of the CALICE Collaboration

by

O. Hartbrich

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG