DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2013-004 February 2013

Elastic and Proton Dissociative J/ψ Photoproduction at Low W_{γp} with the H1 Detector at HERA

by

F. Huber

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG