DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2013-017 June 2013

Combination of the H1 and ZEUS Inclusive Cross-Section Measurements at Proton Beam Energies of 460 GeV and 575 GeV and Tests of Low Bjorken-x Phenomenological Models

by

P. Belov

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG