DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2014-015 June 2014

Measurement of the Drift Velocities of Electrons and Holes in High-Ohmic <100> Silicon

by

C. Scharf

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG