DEUTSCHES ELEKTRONEN-SYNCHROTRON

Ein Forschungszentrum der Helmholtz-Gemeinschaft

DESY-THESIS-2014-039 November 2014

Design and Construction of an Injector for an Electron/Positron Linac Optimized for Positron Yield and Minimal Particle Loss

by

C. Liebig

ISSN 1435-8085

NOTKESTRASSE 85 - 22607 HAMBURG