arXiv:gr-qc/0206062 v1 20 Jun 2002

Stochastic backgrounds of gravitational waves and spherical detectors

J. Alberto Lobo^{(1)} and Álvaro Montero^{(2)} Department de Física Fonamental Universitat de Barcelona Diagonal 647, Barcelona 08028 Spain

(1) e-mail: lobo@ffn.ub.es (2) e-mail: montero@ffn.ub.es

ABSTRACT

The analysis of how a stochastic background of gravitational radiation interacts with a spherical detector is given in detail, which leads to explicit expressions for the system response functions, as well as for the cross-correlation matrix of different readout channels. It is shown that distinctive features of GW induced random detector excitations, relative to locally generated noise, are in practice insufficient to separate the signal from the noise by means of a single sphere, if prior knowledge on the GW spectral density is nil. The situation significantly improves when such previous knowledge is available, due to the omnidirectionality and multimode capacities of a spherical GW antenna.

PACS: 04.80.Nn; 95.55.Ym Keywords: Spherical Gravitational Wave detector, Gravitational Wave backgrounds

1 Introduction

Stochastic backgrounds of Gravitational Waves (GWs) are amongst the most interesting sources to be detected by the upcoming new generation of antennas: such kind of gravitational radiation will convey to us e.g. information on the structure of the Universe at its earliest evolutionary stages. This is quite unique to gravitational waves, due to their extremely weak coupling to other forms of matter and radiation, and will therefore greatly enhance our understanding of Cosmology as well as Fundamental Physics. Literature on the possible forms, origins and spectral shapes of various gravitational wave backgrounds is rich —see for example [1] for a detailed review and further references on the subject.

The stochastic nature of gravitational background signals, together with the same stochastic origin of the local noise generated in the detector itself, makes very difficult to tell local noise from actual signal. Therefore, detection strategies to extract that kind of gravitational signals from detector data are based on finding differential properties capable to distinguish between both processes.

The standard procedure to identify a stochastic signal is to use two (or more) antennas, and cross-correlate their outputs. The concept is that, while local noises in separate detectors are uncorrelated, the stochastic signal is common to both. Signal to noise ratio therefore builds up on the basis of long-term average compensation of local noise fluctuations, and can be seen to develop as T^{1/4}, where T is the integration time [2]. Specific strategies for GW background detection have been considered for two bar detectors [3], two interferometers [4], a bar and an interferometer [5] and two spherical detectors [6].

A spherical GW detector is a multimode device which, in a number of senses, behaves like an array of bars [7, 8, 9]. This suggests that one might try and take advantage of such multimode capacity to perform a search for a GW background by suitably crosscorrelating the different detector readouts. A procedure like this would therefore enable the determination of the GW background spectral density with a single detector —a significant advantage to rid the usual method (sketched above) of inherent uncertainties bound to the fact that no two real detectors are exactly identical.

One might a priori expect in this direction that specific signal correlation patterns happen between pairs of sensor readouts which be not shared by the local sources of noise, thereby making possible to filter the latter out. This paper is concerned with the analysis of the possibilities offered by the sphere, as a multimode device, for the detection of a stochastic background of GWs, defined by a spectral density function.

As we shall see, though, local noise and GW background random amplitudes actually show no distinctive correlation pattern in the output channels, except for the obvious fact that GWs are only seen in quadrupole (perhaps also monopole) antenna modes [10]. So, in the absence of some kind of previous information on the functional form of the GW spectrum, the above expectations fail. If, on the other hand, spectral information is available ahead of time (templates) then the sphere has a very good performance in its frequency band of sensitivity. This can improve efficiency up to an order of magnitude in energy compared with single readout GW detectors (bars and interferometers), due to the sphere being both omnidirectional and multimode, as we shall see.

The outline of the article will be the following. In section 2 we set up definitions and notation for the stochastic background of GWs, and in section 3 we derive the sphere’s response to this signal. In section 4 we present the correlation functions between the sphere’s responses induced by the gravitational signal at two points on its surface, where motion sensors will be attached. Section 5 is dedicated to calculate the same correlation function presented in section 4 but in this case induced by local noise, and discusses, in the light of these results, various possible strategies to retrieve information about the incoming gravitational signal spectrum with a single spherical detector. We close with a summary of conclusions in section 6, and also include a brief mathematical appendix.

2 The stochastic signal

We give in this section a few definitions and notation for a stochastic background of gravitational radiation, and its characterization through the spectral density S_h(ω).

A background of gravitational waves can be expressed as a linear superposition of plane waves coming from all directions and with all possible polarizations,

h_{ij} (t, x) = ∫_∞ −∞ dω 2π ∫ d^2Ω e^{−iω(t−}Ω^{·x)} ∫_{2π} 0 dψ ∑ A h̃_A(ω; Ω, ψ) G^A_{ij} (Ω, ψ) (1) where Ω is a unit vector pointing to a generic location, ψ is a rotation angle around this vector, h̃_A(ω; Ω, ψ) are the wave amplitudes and G^A_{ij} (Ω, ψ) the polarization matrices. General Relativity predicts only two transverse polarization modes. Nevertheless, another four degrees of freedom must generally be allowed for. We thus have altogether six independent 3 × 3 symmetric polarization matrices. If we choose a right-handed triad of orthonormal vectors m, n and Ω, where Ω is aligned with the propagation direction, a suitable parametrization for the G-matrices is the following:

G^M_{ij} (Ω, ψ) = √ 2 3 δ_{ij} , G^{L0}_{ij} (Ω, ψ) = √ 1 3 (3Ω_iΩ_j − δ_{ij}) G^{Lm}_{ij} (Ω, ψ) = m_iΩ_j + m_j Ω_i , G^{Ln}_{ij} (Ω, ψ) = n_iΩ_j + n_j Ω_i G^{T×}_{ij} (Ω, ψ) = m_in_j + n_im_j , G^{T+}_{ij} (Ω, ψ) = m_im_j − n_in_j (2) where we give to the index A in G^A_{ij} (Ω, ψ) the following meanings: A = M is the monopole component, A = L_0, L_m, L_n are longitudinal quadrupole components, and A = T_+, T_× are the two transverse quadrupole components. These matrices satisfy normalization conditions ∑ ij G^A_{ij} G^B_{ji} = 2δ^{AB} (3)

If (θ, ϕ, ψ) are Euler angles relating the laboratory frame to the just described wave frame then

m = (cos ψ cos θ cos ϕ − sin ψ sin ϕ , cos ψ cos θ sin ϕ + sin ψ cos ϕ , − cos ψ sin θ) n = (− sin ψ cos θ cos ϕ − cos ψ sin ϕ , − sin ψ cos θ sin ϕ + cos ψ cos ϕ , sin ψ sin θ) Ω = (sin θ cos ϕ, sin θ sin ϕ, cos θ) (4) where we can see that a choice for the angles θ, ϕ gives a direction in space and a choice for ψ gives the definition of the two transverse polarization states for a particular direction.

The “electric” components R_{0i0j}(t) of the Riemann tensor at the center of mass of the sphere are

R_{0i0j}(t) = 1 2 h_{ij,00}(0, t) = − ∫_∞ −∞ dω ω^2e^{−iωt} ∫ d^2Ω ∫ dψ 5∑ A=0 h̃_A(ω; Ω, ψ) G^A_{ij} (Ω, ψ), (5) and these are the only components carrying information on an incoming GW [11].

In this paper we shall be considering an unpolarized stochastic bath of GWs which is also isotropic and stationary. Its statistical properties are therefore encoded in its power spectrum function, defined by the following equation:

⟨h̃^∗_A(ω, Ω, ψ) h̃_A′ (ω^′, Ω^′, ψ^′)⟩ = δ(ω − ω^′) { 1 4π δ^2(Ω, Ω^′) 1 2π δ(ψ − ψ^′) } { δ_{AA}′ 1 2 S_h(ω) } (6) where ⟨−⟩ stands for ensemble average. There are alternative ways to characterize the frequency spectrum, for example, through an energy density per unit logarithmic interval of frequency, or in terms of a characteristic amplitude of the stochastic background. The definitions for such quantities, as well as their mutual relationships can be found in reference [1].

3 The sphere’s response

In this section we calculate the sphere’s response to the background of gravitational waves given by equation (1). We shall use henceforth the general formalism and notation of reference [10].

We assume that the sphere’s response u(x, t) to an incoming signal is the solution to the partial differential equation

ϱ ∂^2u ∂t^2 − { μ ∇^2u + (λ + μ) ∇(∇ · u) } Lu = f(x, t) (7)

with suitable initial and boundary conditions. Here, λ and μ are the material’s elastic Lamé coefficients [12], and ϱ is the sphere’s density. In the rhs of equation (7), f_i(x, t) = ϱc^2R_{0i0j} (t)x_j is the density of gravitational wave tidal forces, ensuing from the geodesic deviation equation —see e.g. [13]. The latter term can be split up into its monopole and quadrupole components according to [10]

f(x, t) = f^{(00)}(x) g^{(00)}(t) + 2∑ m=−2 f^{(2m)}(x) g^{(2m)}(t) (8) with

f^{(00)}_i (x) = ϱ E^{(00)}_{ij} x_j , g^{(00)}(t) = 4π 3 E^{∗(00)}_{ij} R_{0i0j}(t) c^2

f^{(2m)}_i (x) = ϱ E^{(2m)}_{ij} x_j , g^{(2m)}(t) = 8π 15 E^{∗(2m)}_{ij} R_{0i0j} (t) c^2 (m = −2, . . . , 2) (9)

The definition for the matrices E^{(00)}_{ij} and E^{(2m)}_{ij} can be found in appendix A. The generic response function u(x, t) can be expressed as an orthogonal series expansion, which only involves quadrupole and monopole terms:

u(x, t) = ∞∑ n=1 a_{n0} ω_{n0} u_{n00}(x) g^{(00)}_{n0} (t) + ∞∑ n=1 a_{n2} ω_{n2} 2∑ m=−2 u_{n2m}(x) g^{(2m)}_{n2} (t)

(10)

where u_{nlm} are spheroidal wavefunctions corresponding to the (2l + 1)-degenerate eigenfrequency ω_{nl}, i.e.,

Lu_{nlm}(x) = −ω^2_{nl}ϱu_{nlm}(x) (11) with L the differential operator defined in equation (7); a_{n0} and a_{n2} are projection coefficients —see [14] for details on definitions and values of these quantities.

Finally, g^{(lm)}_{nl} (t) are convolution products between the driving terms g^{(lm)}(t) and the corresponding eigenmode oscillation function —in this case represented by an ideally nondissipating, purely sinusoidal vibration:

g^{(lm)}_{nl} (t) ≡ ∫_t 0 dt^′ g^{(lm)}(t^′) sin {ω_{nl}(t − t^′)} (l = 0, 2 ; m = −l, ..., l) (12) We shall later relax this ideal behavior hypothesis in order to cope with the stationary state the system will eventually reach under the action of long term random excitations.

We next calculate the sphere’s response to the background of gravitational waves given by equation (1). The only quantities we have to evaluate are the functions g^{(lm)}_{nl} (t) using equations (12) and (9), with the components of the Riemann tensor given by equation (5). The following is readily found:

g^{(lm)}_{nl} (t) = − ∫_∞ −∞ dω ω^2 T (t; ω, ω_{nl}) ∫ d^2Ω dψ ∑ A h̃_A(ω; Ω, ψ) G^A_{ij} (Ω, ψ) E^{∗(lm)}_{ij} (13) where

T (t; ω, ω_{nl}) ≡ ∫_t 0 dt^′ e^{−iωt′} sin {ω_{nl}(t − t^′)} (14) is a function strongly peaked at ω = ±ω_{nl} for large values of t. The sphere’s response u(x, t) is then given by equation (10) with g^{(lm)}_{nl} (t) given by equation (13).

In actual practice, the sphere’s motions are sensed at a number of different positions on its surface, where motion sensors are attached. We consider devices which are only sensitive to radial displacements, and attached to the sphere’s surface at positions

x_a = R n_a , a = 1, . . . , J (15) where R is the radius of the sphere, and n_a a unit vector pointing outward at the a-th position. There will consequently be J readout channels with output displacements

u_a(t) ≡ n_a · u(x_a, t) , a = 1, . . . , J (16) If equation (10) is now used, these are seen to be

u^{GW}_a (t) = ∞∑ n=1 a_{n0} ω_{n0} A_{n0}(R) Y_{00}(n_a) g^{(00)}_{n0} (t) + + ∞∑ n=1 a_{n2} ω_{n2} A_{n2}(R) 2∑ m=−2 Y_{2m}(n_a) g^{(2m)}_{n2} (t) , a = 1, . . . , J (17) where Y_{lm} are spherical harmonics, and A_{nl}(R) is a radial function coefficient in the spheroidal wavefunction u_{nlm}(x); this one depends on whether we are dealing with a solid or a hollow sphere —see [10] or [15] for each case, respectively.

Because the time dependent terms g^{(2m)}_{n2} (t) in (17) are random in nature, the readouts u_a(t) are consequently random, too. In addition, the linear character of the relationship between both ensures that certain properties of the driving terms, such as e.g. gaussianity, directly carry over to the outputs. We now propose to investigate the relevant statistical properties of the latter.

4 Cross-correlation functions

As already stated in the Introduction, an essential ingredient in our analysis are the crosscorrelations between different output channels. In order to make them useful, however, we first need to establish their theoretical structure, i.e., to assess their behavior under ideal conditions of infinite integration times, and relate them to the unique characteristic function S_h(ω) —the signal spectral density.

Correlations between the outputs at the readout channels are naturally defined by

R_{ab}(t, τ ) ≡ ⟨u^∗_a(t) u_b(t + τ )⟩ (18) where ⟨−⟩ stands for ensemble average again. We must now introduce the function u^{GW}_a (t), given by equation (17), into equation (18) to calculate the correlation functions we are looking for. When averages are taken, equation (6) for the ensemble average of the wave amplitudes comes into play. Dirac δ-functions appearing in that equation allow us to easily perform the integrals in Ω^′, ψ^′ and ω^′. The remaining integrals in Ω, ψ can then be done after evaluating

G_{ijkl} ≡ ∫ dψ 2π ∫ d^2Ω 4π ∑ A e^A_{ij} (Ω, ψ) e^A_{kl}(Ω, ψ) (19) which yields the following result:

G_{ijkl} = 2 3 δ_{ij} δ_{kl} monopole + 2N [ − 1 15 δ_{ij} δ_{kl} + 1 10 (δ_{ik}δ_{jl} + δ_{il}δ_{jk}) ]

quadrupole (20)

The index A in equation (19) runs over the polarization modes of the incoming gravitational signal. And the result given in equation (20) takes into account the monopole mode and N quadrupole modes (note that N ≤ 5, for example N = 2 in General Relativity, and that all of them have the same contribution to G_{ijkl}).

It is now readily seen that there is no cross-correlation between monopole and quadrupole modes, and that the correlation functions between the outputs induced by the gravitational signal split up as

R^{GW}_{ab} (t, τ ) = R^{(0)GW}_{ab} (t, τ ) + R^{(2)GW}_{ab} (t, τ ) (21) where R^{(0)GW}_{ab} and R^{(2)GW}_{ab} are monopole and quadrupole terms, respectively, and have the form

R^{(0)GW} ab (t, τ ) = 2 P_0(Ω_a · Ω_b) ∞∑ n,n^′ =1 a_{n0}a_n′_0 A_{n0}(R)A_n′_0(R) ω_{n0}ω_n′_0 f^{(0)}_{nn}′ (t, τ ) R^{(2)GW} ab (t, τ ) = 4N 15 P_2(Ω_a · Ω_b) ∞∑ n,n^′=1 a_{n2}a_n′_2 A_{n2}(R)A_n′_2(R) ω_{n2}ω_n′_2 f^{(2)}_{nn}′ (t, τ ) (22)

with P_0 the zero-th Legendre polynomial —which is identically equal to 1 for any value of its argument, but we keep it explicit for the sake of structure clarity—, P_2 is the second Legendre polynomial, and

f^{(l)}_{nn}′ (t, τ ) ≡ ∫_∞ 0 dω 2π ω^4 Re [T^∗(t, ω, ω_{nl}) T (t + τ, ω, ω_n′_l)] S_h(ω) , l = 0, 2 (23)

Here we see how the spectral density S_h(ω) characterizing the incoming signal appears, and its relation to the correlation functions.

In a stationary random process, the second order correlation functions are time-shift invariant (by definition), i.e., if we use the definition (18) then the function R should only depend on its second argument, τ . Time-shift invariance has been assumed for the exciting GW bath, as we have characterized it by the spectral density S_h(ω). Nevertheless, the sphere’s response is calculated with the series expansion (10) in which a choice for the state of the sphere at t = 0 (initial conditions) is assumed which, therefore, breaks that invariance.

The correlation functions we are looking for can actually be obtained from (21) and (22) by taking their limit when t approaches infinity, because in this limit the property of time shift invariance is recovered, as the system looses memory of any particular initial conditions in the remote past.

Memory is however not lost in the kind of ideal, non-dissipative elastic body we have described in the preceding sections. Meaningful results can only be obtained if some kind of dissipation, no matter how large or small, is present in the system. This is therefore the appropriate place to introduce dissipation, and we shall do it in the standard way of assuming an exponentially decaying amplitude for the oscillation eigenmodes, i.e., we make the replacement

sin(ω_{nl}τ ) −→ e^{−γnl τ} sin(ω_{nl}τ ) (24) where γ_{nl} is proportional to the inverse of the decay time of the associated mode, which is in all cases of interest much larger than the period of oscillation of that mode, or

γ_{nl} ≪ ω_{nl} (25) If we express the limits of R^{(0)GW}_{ab} (t, τ ) and R^{(2)GW}_{ab} (t, τ ) by dropping the first argument then the following results are readily obtained:

R^{(0)GW} ab (τ ) = 2 P_0(Ω_a · Ω_b) ∫_∞ −∞ dω 2π R̃^{(0)}(ω) 1 2 S_h(ω) e^{iωτ} (26)

R^{(2)GW} ab (τ ) = 4N 15 P_2(Ω_a · Ω_b) ∫_∞ −∞ dω 2π R̃^{(2)}(ω) 1 2 S_h(ω) e^{iωτ} (27)

where

R̃^{(l)}(ω) = ∑ n [a_{nl}A_{nl}(R)]^2 ω^4 |L_{nl}(ω)|^2 (28)

and L_{nl}(ω) is a Lorentzian curve:

L_{nl}(ω) ≡ 1 ω^2 − ω^2_{nl} + 2iγ_{nl} ω

(29) Equations (26) and (27) have a foreseeable functional structure: the correlation functions are Fourier transforms of the spectral density of the driving stochastic signal times the sphere’s transfer function R̃^{(l)}(ω), and this is a characteristic sum of Lorentzian curves centered on the resonant frequencies, and with appropriate weights. Note also that different harmonics (n, n^′) appear to be uncorrelated.

4.1 Mode channels

The algebraic structure of the correlation function matrix requires some further consideration. For P_2(Ω_a · Ω_b) is a symmetric matrix whose rank^1 is at most 5, which means one can form 5 linear combinations

y^{(m)}(t) = J∑ a=1 v^{(m)}_a u_a(t) , m = −2, . . . , 2 (30)

where the coefficient v^{(m)}_a is the a-th component of the (normalized) eigenvector associated to the m-th non-null eigenvalue of P_2(Ω_a · Ω_b), ζ^2_m, say, which is always positive.

If we now define a new correlation function matrix

R^{GW}_{mm}′ (τ ) ≡ ⟨y^{(m)∗}(t) y^{(m′)}(t + τ )⟩ , m, m^′ = −2, . . . , 2 (31) we readily see that

R^{GW}_{mm}′ (τ ) = 4N 15 ζ^2_m δ_{mm}′ ∫_∞ −∞ dω 2π R̃^{(2)}(ω) 1 2 S_h(ω) e^{iωτ} (32) Thus the 5 quadrupole channels y^{(m)}(t) are uncorrelated with one another. They are therefore particularly well suited for improved estimation of the spectral density S_h(ω), since the latter is common to all of them. One may recall here that y^{(m)}(t) are actually mode channels for the well known TIGA [16] and PHC [17] sensor distributions, in which cases

v^{(m)}_a ∝ Y_{2m}(Ω_a) for TIGA and PHC (33) Note that the fact that the y^{(m)}(t) are uncorrelated is independent of whether the motion sensors are resonant or not, so it applies to a system like the recently proposed dual sphere [18], too. Note also that sensor geometries such as TIGA and PHC, for which the y^{(m)}(t) are mode channels —i.e., quantitites whose frequency spectrum ỹ^{(m)}(ω) is directly proportional to that of the GW quadrupole amplitudes g̃^{(2m)}(ω)—, allow for a very clear

1 Actually, rank{P_l(Ω_a · Ω_b)} = 2l + 1, provided no two of the J vectors Ω_a are parallel, and provided of course that J ≥ 2l + 1 —see [14] for full details.

and direct physical interpretation of the correlation coefficients (32). They are therefore also preferred from the specific point of view of the signals considered in this paper.

Summing up, the main result so far is that cross-correlations between different output channels of a spherical GW detector, whether direct sensor readouts or quadrupole (mode) channels, possess a specific pattern, which is given by equations (27) or (32), respectively. The problem is of course that a random signal must be told from also random local noise; we thus review next the relevant properties of the latter.

5 Local noise and detection strategies

We study in this section the multipole characteristics of the correlation functions between the outputs at two points of the sphere induced by the local noise.

The actual readouts of the spherical antenna are in fact superpositions of those induced by the GW and by the local noise, i.e.,

u_a(t) = u^{GW}_a (t) + u^{LN}_a (t) (34) We shall generically consider that

u^{LN}_a (t) = ∑ n,l,m q_{nlm}(t) A_{nl}(R) Y_{lm} (n_a) (35)

where q_{nlm}(t) are narrow band stochastic time series, with correlation times of order 1/γ_{nl} . Because these q_{nlm}(t) are the amplitudes of different normal modes of the solid, they are statistically uncorrelated, or

⟨q^∗_{nlm}(t) q_n′_l′_m′ (t + τ )⟩ = δ_{nn}′ δ_{ll}′ δ_{mm}′ F_{nl}(τ ) (36) with,

F_{nl}(τ ) = ∫_∞ −∞ dω 2π |L_{nl}(ω)|^2 1 2 S_{LN} (ω) e^{iωτ} (37) where L_{nl}(ω) is given by (29), and S_{LN} (ω) is the input spectral density of local detector noise. We need not go into the details of the specific form of this function here, which is a superposition of thermal and transducer back-action noise —see [18].

The system readout correlation functions of local noise, defined by

R^{LN}_{ab} (τ ) ≡ ⟨u^{LN ∗}_a (t) u^{LN}_b (t + τ )⟩ (38) are therefore given by

R^{LN}_{ab} (τ ) = ∑ l R^{(l)LN}_{ab} (τ ) (39)

where

R^{(l)LN}_{ab} (τ ) = 2l + 1 4π P_l(Ω_a · Ω_b) ∫_∞ −∞ dω 2π ∑ n |A_{nl}(R)|^2 |L_{nl}(ω)|^2 1 2 S_{LN} (ω) e^{iωτ} (40)

These expressions show that local noise correlations split up in a way similar to (21), except of course that we now have contributions from all multipoles rather than just monopole and quadrupole modes, characteristic of GW signals. In particular, we can easily assess how do quadrupole channels —as defined in (30)— correlate with one another in a local noise dominated detector:

⟨y^{(m)∗}_{LN} (t) y^{(m)}_{LN} (t + τ )⟩ = 5 4π ζ^2_m δ_{mm}′ ∫_∞ −∞ dω 2π ∑ n |A_{n2}(R)|^2 |L_{n2}(ω)|^2 1 2 S_{LN} (ω) e^{iωτ}

+ ∑ l≠2 2l + 1 4π P^{(l)}_{mm}′ ∫_∞ −∞ dω 2π ∑ n |A_{nl}(R)|^2 |L_{nl}(ω)|^2 1 2 S_{LN} (ω) e^{iωτ} (41)

where

P^{(l)}_{mm}′ = ∑ a,b v^{(m)∗}_a v^{(m′)}_b P_l(Ω_a · Ω_b) , m = −2, . . . , 2 (42)

is generally a non-diagonal matrix^2.

The important conclusion to be drawn from equations (40) and (41) is that monopole and quadrupole correlations follow precisely the same algebraic pattern, whether they are

2 Exceptionally, it is diagonal for certain values of l in certain sensor configurations —see a discussion in [19].

dominated by local noise or by a bath of random GWs. Extra terms, such as those in the last line of (41), do not really provide a distinctive feature of local noise, for they are only significant at frequencies different from those of the quadrupole modes, as determined by the presence of the frequency dependent coefficients L_{nl}(ω) in each case.

This is a very unfortunate circumstance, indeed, for it in principle renders useless the cross-correlation algorithm between different detector channels as an efficient means of filtering out local noise. Are there expedient alternatives?

5.1 Filtering strategies

There are two interesting possibilities one can try to filter out local noise effects with a single multimode detector:

i) Since different normal modes are statistically uncorrelated, one is tempted to consider e.g. the first and second quadrupole modes of a sphere [9, 15, 18] as a pair of independent antennas, then use cross-correlation between them to filter local noise out. This however cannot possibly work because, even if local noise induced fluctuations are independent in either mode, so are also GW induced fluctuations. And, as we have just seen, there is no distinctive feature as to how noise gets added to the signal at different quadrupole modes. Actually, as seen in equations (31) and (41), there is no way to tell which part in y^{(m)}(t) is due to GWs and which is due to local noise.

ii) The fundamental difference between a bath of random GWs and local noise is that, while the former can only affect quadrupole modes (or, at most, also monopole modes), local noise excites all modes, instead —not just quadrupole/monopole. Given that, in a realistic GW antenna, mode linewidths are extremely narrow, i.e., energy transfer between different modes is extremely slow, an attractive possibility to use a single sphere as a detector of a continuous flow of stochastic GWs would be to identify the effect of the latter as a temperature excess in the quadrupole modes, relative to other modes —dipole, octupole, etc.

While this may look like a reasonable approach, it is in fact an impractical one, as we can appreciate by the following argument. The temperature of a mode is of course a measure of the variance of its random oscillations; since these are a narrow band stochastic process, their correlation time, τ_{corr}, is quite long, hence a reliable estimate of the variance requires taking data during a suitable number of correlation times for averaging. If t_{obs} is such time then the relative error in the temperature estimation is of the order of δT T ≃ √ τ_{corr} t_{obs}

(43)

Let us consider a few likely numbers: an SQL detector —such as described e.g. in [18]— should be capable of sensing energy innovations of magnitude kT/Q, where k is Boltzmann’s constant, T is the temperature of the mode (e.g. the first quadrupole), and Q its mechanical quality factor. An optimized device should be able to reach T/Q ∼ 10^{−8} K^{−1}, for example with Q = 10^7 and T = 100 milli-Kelvin. A spherical antenna whose considered resonance happens at 1 kHz, say, thus has a correlation time of 2πQ/ω_{12} = 10^4 seconds. On the other hand, the precision required in the measurement of the mode temperature to match the SQL is δT/T = 10^{−7} for the assumed temperature of 0.1 K. If we now make use of (43) then the conclusion is that an integration time of about 3×10^{10} years is required to detect such a small temperature excess as the optimized antenna permits. . .

It can be argued that stochastic background signals will actually be hotter than the just described precision limit. However nucleosynthesis constraints, for instance, set bounds on the spectral density of GWs to values below 3×10^{−24} Hz^{−1/2} at frequencies in the 1 kHz range [1]. This translates into a GW bath temperature of fractions of a micro-Kelvin, for whose accurate estimation integration times of the order of several 10 000 years would be required. The use of fast variance estimation techniques [20] may improve on this by between one and two orders of magnitude, but even so one would still be in the range of 100 to 1000 years of integration time —an absurd figure. There is also little hope that GW backgrounds originating in astrophysical sources, such as e.g. supernovae [21], have an effective temperature above 10^{−7} K or so [1].

Altogether then the multimode capabilities of a spherical GW antenna do not seem to offer the practical possibility to make reliable, single detector measurements of the spectral density of a background of stochastic GWs. An exception to this however happens when some a priori information on the actual form of the spectral function is known ahead of time (template) [22]. If this is the case then optimum filter techniques can be used, of which a wealth is available in the literature [23].

Of course this is not specific to spherical detectors —in fact any single, unimodal GW antenna (such as bars or interferometers) can make advantageous use of the above techniques. Spheres however are more efficient in two senses: first they are omnidirectional, and second they can provide up to five independent estimates of the spectral density of the GW background, as follows from equation (32): each quadrupole channel y^{(m)}(t) can be used to produce one such independent estimate. On average, one gets a factor of 15/8 because of omnidirectionality, times a factor of 5 for quadrupole channels, which make up for 75/8, one order of magnitude (in energy) better than bars and interferometers. Let us however stress that this obviously applies only within the frequency band of sensitivity of each detector; in the case of a dual sphere, even this is quite competitive, see [18].

6 Conclusion

In this paper we have investigated in detail how a spherical detector interacts with a background of gravitational waves, characterized by a frequency dependent spectral energy density function, S_h(ω). In particular, we have found the generic response functions for a device with an arbitrary number of motion sensors, as well as their correlation matrix, both of the system readouts and for the five quadrupole channels —mode channels for certain specific sensor layout geometries.

We have discovered that there is no distinctive pattern in that correlation matrix, relative to the local noise induced pattern, except that the latter involves all the antenna’s oscillation eigenmodes rather than just the monopole/quadrupole harmonics, characteristic of generic GWs. This difference proves however insufficient to efficiently filter the stochastic GWs from random local disturbances.

We are thus led to conclude that, in the absence of some a priori knowledge about the

GW spectral density S_h(ω), the multimode character of a spherical detector does not offer a useful alternative to the traditional cross-correlation between two (or more) detectors as a recipe to get rid of local noise effects. However, if such a priori knowledge is available then the spherical detector naturally yields one order of magnitude better performance (in energy) than single readout devices, such as bar and interferometric GW detectors.

Acknowledgments

We are indebted with Antonello Ortolan and David Blair for helpful and very illuminating discussions. JAL acknowledges support received from the Spanish Ministry of Science, contract number BFM2000-0604. AM thanks Generalitat de Catalunya and Universitat de Barcelona for a contract.

Appendix A

A suitable representation for the matrices E^{(00)}_{ij} and E^{(2m)}_{ij} used in equation (9) is the following:

E^{(00)}_{ij} = { 1 4π }^1_2

1 0 0 0 1 0 0 0 1

E^{(20)}_{ij} = { 5 16π }^1_2

−1 0 0 0 −1 0 0 0 2

E^{(2±1)}_{ij} =

{ 15 32π }^1_2

0 0 ∓1 0 0 −i ∓1 −i 0 E^{(2±2)}_{ij} =

{ 15 32π }^1_2 1 ±i 0 ±i −1 0 0 0 0

(44)

having the properties:

E^{(00)}_{ij} Ω_iΩ_j = Y_{00}(Ω) , E^{(2m)}_{ij} Ω_iΩ_j = Y_{2m}(Ω) (45) where Ω is a unit vector, and Y_{lm}(Ω) are spherical harmonics.

References

[1] M. Maggiore, Phys Rep 331, 283 (2000) [2] B.F. Schutz, in D.G. Blair, ed., The detection of gravitational waves, Cambridge University Press (1991), p. 406 [3] P. Astone et al., Astron & Astrophys 351, 811 (1999) [4] B. Allen, J.D. Romano, Phys Rev D 59 102001 (1999) [5] P. Astone, J.A. Lobo, B.F. Schutz, Class Quant Grav 11, 2093 (1994) [6] M. Cerdonio, E. Coccia, A. Ortolan, S. Vitale, Phys Rev D 55, 1741 (1997) [7] M. Cerdonio, P. Fortini, A. Ortolan, G.A. Prodi, S. Vitale, Phys Rev Lett 71, 4107 (1993) [8] W.W. Johnson, S.M. Merkowitz, Phys Rev Lett 70, 2367 (1993) [9] E. Coccia, J.A. Lobo, J.A. Ortega, Phys Rev D 52, 3735 (1995) [10] J.A. Lobo, Phys Rev D 52, 591 (1995) [11] D.M. Eardley, D.L. Lee & A.P. Lightman, Phys Rev D 8, 3308 (1973) [12] L.D. Landau, E.M. Lifshitz, Theory of Elasticity, Pergamon 1970 [13] R.M. Wald, General Relativity, University of Chicago Press, 1984 [14] J.A. Lobo, Mon Not Roy Astr Soc 316, 173 (2000) [15] E. Coccia, V. Fafone, G. Frossati, J. A. Lobo, J.A. Ortega, Phys Rev D 57, 2051 (1998) [16] S.M. Merkowitz, W.W. Johnson, Phys Rev D 51, 2546 (1995) [17] J.A. Lobo, M.A. Serrano, Europhys Lett 35, 253 (1996)

[18] M. Cerdonio, L. Conti, J.A. Lobo, A. Ortolan, L. Taffarello, J.P. Zendri, Phys Rev Lett 87, 031101 (2001)

[19] M.A. Serrano, J.A. Lobo, gr-qc/9911056

[20] P. Astone, P. Bonifazi, G.V. Pallottino, Rev Sci Instr 61, 3899 (1990)

[21] V. Ferrari, S. Matarrese, R. Schneider, Mon Not Roy Astron Soc 303, 247 and 258 (1999)

[22] T. Zwerger, E. Müller, Astron & Astrophys 320, 209 (1997). See also the website

http://www.physics.uwa.edu.au/~coward/SIMULATION.htm for illustrating exam-

ples

[23] See [6] above for a variant of the matched filter procedure. So called Capon filters are useful in certain circumstances —see S.M. Kay, Modern spectral estimation, Prentice Hall (1991). A variety of other techniques have even been considered for bar GW detectors, see O. Rodríguez, Análisis espectral en detección de ondas gravitatorias con la antena EXPLORER, Escola Tècnica Superior d’Enginyeria de Telecomunicació de Barcelona (Spain), February-2001