arXiv:hep-ex/0001003 2 Jan 2000

Nucl. Instr. Meth. A324 (1993) 535 CBPF NF-013-92 UMS/HEP/92-019 FERMILAB-Pub-92-137-E

The E791 Parallel Architecture Data Acquisition System

S. Amato, J. R. T. de Mello Neto^�, and J. de Miranda Centro Brasileiro de Pesquisas Físicas Rio de Janeiro Brasil

C. James Fermilab, Batavia, IL 60510 USA

D. J. Summers Department of Physics and Astronomy University of Mississippi, Oxford, MS 38677 USA

S. B. Bracker 317 Belsize Drive Toronto, Ontario M4S1M7 Canada

Abstract

To collect data for the study of charm particle decays, we built a high speed data acquisition system for use with the E791 magnetic spectrometer at Fermilab. The DA system read out 24 000 channels in 50 ¯s. Events were accepted at the rate of 9 000 per second. Eight large FIFOs were used to buffer event segments, which were then compressed and formatted by 54 processors housed in 6 VME crates. Data was written continuously to 42 Exabyte tape drives at the rate of 9.6 Mb/s. During the 1991 fixed target run at Fermilab, 20 billion physics events were recorded on 24 000 8 mm tapes; this 50 Tb (Terabyte) data set is now being analyzed.

�Now at the Universidade Estadual do Rio de Janeiro, RJ, Brasil.

1. Introduction

Experiment 791, Continued Study of Heavy Flavors, located in Fermilab’s Proton-East experimental area, examines the properties of short lived particles containing a charm quark. Events involving charm quarks are rare and difficult to recognize in real time. The experiment’s strategy was to impose only loose constraints when recording data, and select the events of interest offline when time and computing resources are more available. Therefore the DA system must collect and record data very quickly.

The Fermilab Tevatron delivered beam during a 23 second spill, with a 34 second interspill period, so that the experiment generated data for 23 seconds approximately every minute. The data consists of discrete packets known as events, each of which contains particle tracking information and calorimetry for one interaction. The E769 data acquisition system used previously for this detector [1] was able to read data at 1400 kb/s during the beam spill, and record data at 625 kb/s during both the spill and interspill; the digitizing time per event was

840 ¯s. The physics goals of E791 called for recording at least 10 times the events collected

by E769, in about the same amount of beam-time. The detector’s digitizing and readout time had to be reduced by at least a factor of 10; a 50 ¯s dead time per event was achieved by replacing almost all the front-end digitizers with faster systems. Events arrived at the DA system at an average rate of 26 Mb/s during the beam spill, and were recorded at more than 9 Mb/s during both the spill and interspill using 42 Exabyte 8200 tape drives [2].

The following section will discuss the overall architecture and the hardware components in more detail. Following that are sections on the software used in the DA processors, and a discussion of performance and possible upgrades.

2. Architecture and Hardware

A schematic of the E791 DA system is shown in Fig. 1. Events were digitized in a variety of front-end systems and delivered into Event FIFO Buffers (EFB) along eight parallel data paths. The buffers stored 80 Mb of data apiece, enough to allow the rest of the DA system to be active during both the spill and interspill. Care was taken to ensure that each data path carried about the same amount of data. Data are distributed through Event Buffer

Interfaces (EBI) to processors housed in six VME crates. The processors (CPU) read event segments from the buffers, compressed them into formatted events, and recorded them on tape through a SCSI magnetic tape controller (MTC).

The DA system is parallel in several respects. Data arrives along parallel data paths. Processors act in parallel to prepare data for logging. Many parallel tape drives record data concurrently.

3. Front Ends

The E791 detector contained silicon microstrip detectors, drift chambers, and proportional wire chambers for tracking charged particles. Calorimeters based on scintillators and phototubes measured particle energies. Gas Čerenkov detectors performed particle identification, and plastic scintillators were used for muon identification. The detector elements were digitized by various electronics systems, which were in turn managed by front-end controllers which delivered data to the DA system. The front-end hardware is summarized in Table 1.

The DA system placed specific requirements on the front-end controllers. The data paths from the controllers conformed to the EFB inputs, which were 32-bit wide RS-485 lines accompanied by a single RS-485 strobe. Data was delivered at a maximum rate of 100 ns per 32-bit word. Each event segment on the data paths was delimited by a leading word count, calculated and placed there by the data path’s front-end controller. A 4-bit event synchronization number was generated for each event by a scaler module and distributed to all front-end controllers. The controllers accepted this number and made it a part of each event’s segments. The DA system used the synchronization number to assure that all event segments presented at a given moment derived from the same event in the detector. Finally, because we had 16 digitizing controllers and only 8 data paths, each data path was shared by two front-end controllers using simple token passing.

4. Event FIFO Buffers

Each Event FIFO Buffer (EFB) [3] consisted of an I/O card, a FIFO Controller card, five 16 Mb Memory cards, and a custom backplane, housed two per crate in 9U by 220 mm

Eurocrates. The I/O card contained the RS-485 input and output data paths, Status and Strobe lines, and a Zilog Z80 processor with a serial port used for testing. The Controller card kept track of internal pointers and counters, and managed the write, read, and memory refresh cycles. The Memory cards used low cost 1 Mb by 8 DRAM SIMMs. In E791, the EFBs received data in bursts of up to 40 Mb/s and delivered data at several Mb/s concurrently.

The data was pushed into the EFB’s through a 32-bit wide RS-485 data port, controlled by a strobe line driven by the attached front-end controller. Each longword of data delivered by a front-end controller was accompanied by the strobe which latched the data in the EFB and updated the EFB’s internal pointers. The output side of the EFB had a similar data port and strobe, driven by the receiving device. The EFB maintained 4 Status lines: Full, Near Full, Near Empty, and Empty. The thresholds for Near Full or Near Empty were set by the I/O card’s processor. The Near Full LEMO outputs were used in the E791 trigger logic to inhibit triggers whenever any EFB was in danger of overflowing. The Near Empty Status was used by the event building processors, and is described below.

5. Event Buffer Interface

The EBI [4] was a VME slave module designed specifically for the E791 DA system. Its job was to strobe 32-bit longwords out of an EFB and make them available to VME-based CPUs used to process events. Figure 2 details the connections between a single EFB and its EBIs. Each VME crate held one EBI for every EFB in the system, so that every CPU had access to the output data path from every buffer. The EFB status lines were also bussed to the EBIs, so that the CPUs could determine how much data was available in the buffers. At any moment in time, only one CPU is granted control of a particular EFB. When a CPU in one crate is finished reading data from an EFB, it passes control of the buffer to the next crate through a token passing mechanism built into the EBIs.

The EBI was a simple module with a few basic operations : (a) read a data word from the EFB and strobe the next word onto the output path, (b) read the EFB status, (c) check for the buffer control token, (d) pass the buffer control token to the next EBI, and (e) set or clear the buffer control token.

6. VME CPUs

The assembling of events was performed by VME based CPUs [5]. They contained a 16 Mhz Motorola 68020 processor, a 68881 coprocessor, and 2 Mb of memory, and were able to perform VME master single–word transfers at 2 Mb/s. There were 8 Event Handler CPUs in each VME crate, plus one Boss CPU. An Absoft Fortran compiler was available for the CPUs, and most of the E791 DA code was written in Fortran, except for a few time-critical subroutines which were written in 68020 Assembler.

7. The VAX-11/780

The VAX-11/780 was used to download and start the VME system; the DA system operator’s console and status displays were also connected to the VAX. A low speed link between the VAX and VME was provided by a DR11-W on the VAX Unibus, a QBBC [5] branch bus controller, and branch bus to VME interfaces (BVI) [5] in each VME crate.

8. Magnetic Tape Controller and Drives

Tape writing was handled by a VME to SCSI interface, the Ciprico RF3513 [6]. The tape drives used were Exabyte 8200s writing single-density, 2.3 Gigabyte 8 mm cassettes. As shown in Table 2, the choice of Exabyte drives was driven by the media costs of storing the large amount of data we expected to record.

In principle, each Magnetic Tape Controller (MTC) could be connected to 7 Exabyte drives, but we found that a single SCSI bus saturated when writing continuously to only four drives. We required a data rate to tape of about 1.6 Mb/s in each VME crate, but Exabyte drives write at a speed of only 0.24 Mb/s. Our solution was to use 2 MTCs per VME crate, and connect them to 4 and 3 Exabytes, respectively. Thus there were 7 Exabyte drives controlled from each VME crate, for a total of 42 drives in the DA system.

The MTCs stored their SCSI commands in circular command descriptor queues. The queues for both MTCs in a VME crate were managed by themselves and one CPU in that crate. The command descriptors held information on the VME address of a block of data and the length of the block. The MTC acted as a VME master and performed the actual transfer of a block of complete events from an event building CPU onto a single tape. The tape handling software was written to ensure that all 7 Exabyte drives on a VME crate were filling their tapes at about the same rate. All 42 drives were loaded with tapes at the same time, the DA system started, and all 42 tapes filled with data at approximately the same rate. All the tapes became full within a few minutes of each other, and all 42 tapes were stopped and unloaded at the same time. During data taking, the tapes were full when 3 hours of beam time had elapsed.

9. Software

The DA software was comprised of three main programs. At the top was VAX, which ran in the VAX-11/780. It accepted user commands, generated status displays and error logs, and fetched a tiny fraction of the incoming data to be monitored for data quality. Next was Boss, a program that ran in one CPU in each VME crate. It managed the other CPUs in its crate, and controlled the crate’s magnetic tape system. Finally was EH, the Event Handler program which ran in several CPUs in each VME crate. Event Handlers did most of the real work, reading and checking event data, formatting and compressing events, and assembling blocks of events for eventual output to tape. The interprocessor communication protocol used by the three programs was the same as used by the E769 DA system [1].

Operator commands were entered on a VAX terminal, transmitted to the crate bosses by VAX, and sent to the event handlers by Boss. Status information was gathered from the event handlers by Boss and compiled into a crate report; crate reports were gathered by VAX, which generated displays and report files for the operator.

All three programs consisted of a once-only initialization code and a processing loop which ran until the program was terminated. Specific tasks were placed on the processing loop, rather like beads on a string. Each time control passed to a task, it would proceed as far as possible without waiting for external responses, set a flag recording its present state, and pass control to the next task on the loop. When that task was re-entered on the next pass of the loop, it continued where it left off, and so on until the task was completed. Good real-time response was maintained while avoiding entirely the use of interrupts.

10. Event Handler Program

The EH program had two basic states, grabber and muncher. Only one CPU in each crate could be in the grabber state at any given time. The grabber’s sole duty was to read event segments from the EFBs and place them in a large internal event array, big enough to hold 200-300 events. When the crate Boss noticed that a grabber’s event array was becoming quite full, it changed that grabber to the munching state, and appointed a new grabber. Because the throughput of the entire system depended on efficient event grabbing, grabbers were free of all other obligations, and the grabbing code was written in assembly language.

Munchers took events from their event arrays, formatted and compressed the data, and grouped events into physical blocks suitable for output to tape. Munching the data could take several times longer than grabbing it, so that at any moment each crate would have one grabber and several busy munchers. Munchers were also subject to other obligations, such as responding to requests for status information and binning histograms requested by the operator.

In order to achieve high system throughput from these rather slow processors, event grabbing had to be orchestrated very carefully. At the start of data taking, one grabber would be appointed in each crate, and one crate would be designated number 1. As data arrived in the EFBs, the grabber in crate 1 would extract the event segment from EFB 1 and pass that buffer’s token to crate 2. As the grabber in crate 1 moved on to reading the second segment of the first event from EFB 2, the grabber in crate 2 would start reading the first segment of the second event from EFB 1. Soon the grabbers in all six crates would be active, each reading from a different EFB. Because there were eight EFBs but only six crates with one grabber each, all the grabbers would be busy all the time.

Normally the crate Boss would replace a grabber with a new one before the old grabber’s event array became full. If that reassignment were delayed, the existing grabber would simply pass tokens through to the next crate without reading data, giving up the event to other grabbers that might be able to handle it. Only if all grabbers were glutted with data and no event handlers could be recruited as new grabbers would data taking slow down.

As grabbers read data from the EFBs, they checked to ensure that the event segment word counts were reasonable and that all event segments being joined together in an event had the same event synchronization number. Illegal word counts and unsynchronized events usually indicated that a front-end readout system had failed. To overlook such a failure would be very serious; pieces of unrelated data could end up being joined together into a bogus event, and the error would propagate forward for all subsequent events. When such failures were noted, the grabber notified its Boss, the Boss notified the VAX, and the VAX inhibited data taking, flushed the EFBs, and instructed the system to restart. Synchronization errors occurred with depressing regularity throughout the data taking, so it was fortunate that the DA system had the ability to recognize and respond to them quickly and automatically. A few spills a day were thus lost.

Event munching consisted of compressing the TDC data from the drift chambers (which arrived in a very inefficient format), formatting each event so that it conformed to the E791 standard, and packing events into tape buffers for output. Munchers did not control tape writing however; they submitted output requests to their Boss, who queued the necessary commands to the tape controller, checked the status, and notified the event handler when the tape buffer could be reused. Each muncher had 10 tape buffers, each capable of holding a full-sized tape record of 65532 bytes. Although the Boss managed all tape writing, the data itself never passed to the Boss; the MTC extracted the data directly from the event handler’s tape buffers.

Most of the event munching time was spent compressing TDC data to about^2_3 of its original size. Since the TDC data was a large fraction of the total, it was important to compress the data, to conserve tape writing bandwidth and minimize tape use. In choosing readout hardware for high-rate experiments, it is important to evaluate the details of the data format very carefully (although in this instance we had no alternate choice of vendors).

11. The Boss Program

The CPU running the Boss program controlled the scheduling of each EH as a grabber or muncher. It polled the EHs on a regular basis to check the need for rescheduling. The main criteria to retire a grabber and select a new one was whether the input event arrays were full or nearly full. When the system was heavily loaded, protection against too frequent rescheduling was applied.

Managing tape writing was also the Boss’s job. The Boss made periodic requests to all EHs for a list of tape buffers ready for writing. The EHs responded by giving the boss the VME address and the length of their full tape buffers. The Boss used the information to construct the commands for the MTCs. The Boss also selected which MTC and tape drive to send a tape buffer to, based on how full the MTC’s command queue was and how full the tape in the drive was. The MTCs performed the block transfer of the tape buffer from the EH processor to the Exabyte tape drive. When a tape buffer was written, the MTC informed the Boss, and the Boss in turn notified the EH that the particular tape buffer was ready for reuse.

The Bosses were also responsible for gathering status information and reports of recoverable errors and passing the information to the VAX program. The Bosses sent occasional Request Sense commands to the drives, which returned the number of blocks written to tape and the number of blocks rewritten (soft write errors). All commands sent to the Exabyte drives were returned by the MTC with a status block, and if a drive error occurred while writing data, the status block gave details on the error type. Drive errors of some types were not recoverable, and the offending drive was taken offline until the end of the data taking run. Likewise, any EH which did not respond to Boss commands within a given time limit was reset and temporarily removed from the active system. Event processing could continue even if a few EHs or Exabyte drives failed since there were multiple drives and EHs in each VME crate. The throughput of the DA system would be slightly reduced, but not stop.

12. The VAX Program

The VAX program managed and monitored the rest of the DA system. A schematic is shown in Fig. 3. The DA Control Console is shown in Fig. 4, and provided the user with general status information and a command menu. In regular data taking the user executed a LOAD after the tapes were placed in the drives, then a START to begin a data taking run. Another option was to read out the detector without sending the events to tape (START NOTAPE). During data taking the run could be suspended for a short time (PAUSE, RESUME) and under special circumstances the user could clear the EFBs (CLEAR BUFF). The Bosses polled the tape drives for fullness of the tapes, and sent the information to the VAX program. When 20% of the active drives were 95% full, the VAX program automatically sent the END command. The user could also END data taking whenever he wished.

In ending data-taking runs, it was necessary to allow a smooth run down of the system. The VAX first inhibited the triggers to stop the flow of data into the EFBs. The Bosses stopped the current grabber and did not schedule another one. The VAX cleared any data that remained in the EFBs, but all the events that were already in the EH input event arrays were allowed to be written to tape. The VAX waited until the Bosses reported that all tape writing was complete and file marks written before informing the user that the run was ended. The user could not START another data taking run or execute the tape drive UNLOAD command until this END process was complete.

The EHs stored a few events for online monitoring. During data taking, the VAX retrieved these events and passed them on to an event pool managed by VAXONLINE software [7]. The event pool was accessible by other VAX workstations in the local cluster, and an entirely separate set of programs analyzed and displayed the pool events for online monitoring of the detector. Typically, the rate at which events were sent to the pool for was fast enough for most monitoring needs. The DA system also provided a much faster alternative detector monitoring method. Monitoring a detector typically means making histograms (hit maps) of the detector elements. One can look for dead or noisy channels. Part of the EH munching code constructed such histograms upon user request. The user specified a particular section of the detector to histogram using a very simple program; the program sent the request to the VAX DA program using a DEC Mailbox facility. The request was distributed to the VME EH processors, and all the EHs in the system would accumulate all events for a period of about one minute. The Bosses and ultimately the VAX summed up the histogram contributions from each EH, and entered the final product into the event pool as a special event type. The user’s program retrieved the histogram from the event pool and could use a variety of means to display it. In this way the user could get a hit map of a part of the detector with high statistics, 200 000 events or so, in a very short time.

The VAX program retrieved status information from the Bosses on a regular basis while a data taking run was in progress. Information such as the numbers of events processed, the fullness of the tapes, and any errors that occurred were displayed on various monitors and on the DA Control Console. For every data taking run, a disk file was created which held a unique run number, the date and time the data was recorded, the number of events written to each drive during the run, the drive’s soft error rate as a percent of blocks written, and whether the drive failed during the run. This file of numbers was entered automatically into an electronic database when the run was ended.

13. Performance and Conclusions

The DA system hardware performed well. As mentioned earlier, the system was tolerant of errors encountered by CPUs running the EH program and of Exabyte drives with write errors. While all the hardware components in the system experienced some infant mortality in the initial testing phases, all the components, with one exception, had very few failures in 9 months of data taking. The exception was the Exabyte drives, which, after 2000 hours of operation, will often require head replacement. System wide failures that halted data taking were extremely rare, and recovery if they did occur was rapid.

Running in a test mode, data was pushed into the DA system from the front end controllers at a rate exceeding real data taking. The DA system then gave a maximum data rate to tape of about 9.6 Mb/s, or 1.6 Mb/s through each VME crate. Throughput in each part of the DA system components were well matched. The data rate into the EFBs times the length of the beam spill matched the size of the EFBs; the grabbing speed matched the munching speed times the number of munchers in each VME crate; the output rate from each crate matched the tape writing speed times the number of drives per crate. However, during real data taking, the maximum 9.6 Mb/s throughput was usually not attained simply because the accelerator did not deliver enough beam to create the events.

In a 5 month period of data taking in 1991 and early 1992, E791 recorded 20 billion physics events on 24 000 8 mm tapes. This 50 Tb data set is now being analysed at parallel RISC computing facilities similar to those used previously in E769 [8]. The experiment’s goal of 100 000 reconstructed charm particle decays should easily be met.

The parallel architecture of the E791 DA system is central to its success. The performance of the system could be increased with more parallel front-end controllers for faster read out, larger Event FIFO Buffers, faster CPUs with much better I/O capability, and by upgrading the 0.24 Mb/s Exabyte 8200 drives to double–speed, double–density Exabyte 8500 tape drives.

Acknowledgements

We thank the staffs of all the participating institutions and especially S. Hansen, A. Baumbaugh, K. Knickerbocker, and R. Adamo and his group, all of FNAL. This work was supported by the U. S. Department of Energy (DE-AC02-76CHO3000 and DE-FG05-91ER40622) and the Brazilian Conselho Nacional de Desenvolvimento Científico e Tecnológico.

References

[1] C. Gay and S. Bracker, ”The E769 Multiprocessor Based Data Acquisition System”, IEEE Trans. Nucl. Sci. NS-34 (1987) 870.

[2] Exabyte Corp., 1745 38th Street, Boulder, CO 80301, USA.

[3] A. E. Baumbaugh et al., ”A Real Time Data Compactor (sparsifier) and 8 Mb High Speed FIFO for HEP”, IEEE Trans. Nucl. Sci. NS-33 (1985) 903; K. L. Knickerbocker et al., ”High Speed Video Data Acquisition System (VDAS) for HEP”, IEEE Trans. Nucl. Sci. NS-34 (1986) 245.

[4] S. Bracker, ”Specification of the E791 Event Buffer Interface”, E791 internal document;

S. Hansen, FNAL Physics Dept., personal communication.

[5] R. Hance et al., ”The ACP Branch Bus and Real Time Applications of the ACP Multiprocessor System”, IEEE Trans. Nucl. Sci. NS-34 (1987) 878.

[6] Ciprico, 2955 Xenium Lane, Plymouth, Minnesota 55441, USA. [7] V. White et al., ”The VAXONLINE Software System at Fermilab”, IEEE Trans. Nucl. Sci. NS-34 (1987) 763.

[8] C. Stoughton and D. J. Summers, ”Using Multiple RISC CPUs in Parallel to study Charm Quarks”, Computers in Physics 6 (1992) 371.

[9] Phillips Scientific, 305 Island Rd., Mahwah, New Jersey 07430, USA. [10] LeCroy Research, 700 Chestnut Ridge Rd., Chestnut Ridge, NY 10977, USA. [11] C. Rush, A. Nguyen and R. Sidwell, Dept. of Physics, The Ohio State University, personal communication.

[12] Nanometric Systems, 451 South Blvd., Oak Park, IL 60302, USA. [13] M. Bernett et al., ”FASTBUS Smart Crate Controller Manual”, Fermilab Technical Document HN96 (1992).

[14] S. Bracker, ”Description of the Damn Yankee Controller (DYC)”, E791 Internal Document;

S. Hansen, FNAL Physics Dept., personal communication.

[15] M. Purohit, Dept. of Physics, Princeton University, ”Princeton Scanner/Controller Manual”, E791 Internal Document.

[16] S. Hansen et al., ”Fermilab Smart Crate Controller”, IEEE Trans. Nucl Sci.

NS-34 (1987) 1003.

Table 1. E791 Front End Digitization Systems and Read Out Controllers.

System Drift Čerenkov, Silicon Micro- Proportional CAMAC Chamber Calorimeter vertex Detector Wire Chamber Digitizer Phillips [9] LeCroy 4300B Ohio State [11], LeCroy 2731A LeCroy 10C6 TDC FERA ADC [10] Nanometric N339P, Latch 4448 Latch, Nanometric S710/810 4508 PLU, [12] Latches 2551 Scaler Mean Dead Time 30 ¯s 30 ¯s 50 ¯s 4 ¯s 30 ¯s Pre-Controllers none 2 LeCroy 4301s 81 Princeton Scanners 2 LeCroy 2738s none Controller FSCC [13] Damn Yankee [14] Princeton [15] Damn Yankee SCC [16] No. of Controllers 10 2 2 1 1 Channels / System 6304 554 15896 1088 80 Event Size to EFB 480 longwords 160 longwords 110 longwords 20 longwords 11 longwords Event Size to Tape 300 longwords 160 longwords 110 longwords 20 longwords 12 longwords On Tape Fraction 50% 27% 18% 3% 2%

Table 2. A Comparison of Storage Media. The 8 mm, 9-track, and 3480 tape prices are from the Fermilab stockroom catalog. The 4 mm DAT price is from the New York Times, 20 Jan. 1991, page 31. Prices do not include overhead.

Tape Type Length Capacity $/ $/ Tapes/ [m] [Gb] tape 50 Tbytes 50 Tbytes 8 mm video 106 2.3 $3.92 $85 217 21 739 4 mm DAT 60 1.2 $7.79 $324 583 41 667 IBM 3480 165 0.22 $4.60 $1 045 455 227 272 9-track 732 0.16 $9.31 $2 909 375 312 500

Figure 1. A schematic of the VME part of the E791 DA system. Two complete VME crates are shown, with the Event Fifo Buffers and data paths from the digitizers at the base.

Figure 2. Detail of the connections between a single EFB and the six EBIs attached to it. Each EBI is in a different VME crate. The output data path and the EFB status lines are bussed across all six EBIs. The output data path connects to the VME backplane of each crate through the EBI. The EBIs share the data path by communicating along the EFB token line.

Figure 3. Schematic of the entire E791 DA system. The VAX 11/780 was the user interface to the VME part of the system, via the DA Control Display. The VAX part of the DA program handled the status and error displays, sent events for monitoring to the event pool, and received histogram requests via the mailbox. An entirely separate set of programs picked up events from the event pool or sent histogram requests to the mailbox.

Figure 4. Detail of the E791 DA Control Display. The lower half of the screen contained commands to the system, executed by using arrow keys to move the shaded box over the command. The upper half of the screen contained contained information on the current state of the system (RUNNING or IDLE, tapes LOADED or UNLOADED, tape writing ON or OFF), the Run Number if a data-taking run was in progress, and the number of events written to tape.