arXiv:hep-ex/0004030 27 Apr 2000

DFUB 2000-7

Energy losses of Q-balls in Matter, Earth and Detectors.

Mohamed Ouchrif

Dipartimento di Fisica dell’Università di Bologna and INFN Sezione di Bologna, Viale Berti Pichat 6/2, I-40127, Italy. and Université Mohamed Premier, Faculté des Sciences, Département de Physique, L.P.T.P. B.P: 524 60000 Oujda, Morocco. E-mail: ouchrif@bo.infn.it

Abstract

We present a sudy of the interactions of Q-balls with matter, and their energy losses in the earth, for a large range of velocities. These calculations are used to compute the fractional geometrical acceptance of underground detectors. Furthermore we computed the light yield in liquid scintillators, the ionization in streamer tubes and the Restricted Energy Loss in nuclear track detectors.

Invited talk at COSMO99, ICTP-Trieste September 1999

Energy losses of Q-balls in Matter, Earth and Detectors.

Mohamed Ouchrif Dipartimento di Fisica dell’Università di Bologna and INFN Sezione di Bologna, Viale Berti Pichat 6/2, I-40127, Italy. and Université Mohamed Premier, Faculté des Sciences, Département de Physique, L.P.T.P. B.P: 524 60000 Oujda, Morocco. E-mail: ouchrif@bo.infn.it

We present a sudy of the interactions of Q-balls with matter, and their energy losses in the earth, for a large range of velocities. These calculations are used to compute the fractional geometrical acceptance of underground detectors. Furthermore we computed the light yield in liquid scintillators, the ionization in streamer tubes and the Restricted Energy Loss in nuclear track detectors.

1 Interaction of Q-balls with matter

1.1 Interaction with matter of Q-balls type SECS

SECS (Supersymmetric Electrically Charged Solitons) are Q-balls with a net positive electric charge which tends to be mainly in the outer layer. The charge of SECS originates from the unequal rates of absorption in the condensate^1. The positive electric charge could be of one unit up to several tens. This positive electric charge may be neutralized by a surrounding cloud of electrons.

For small size Q-balls the positive charge interacts with matter (electrons and nuclei) via elastic or quasi elastic collisions^2. The cross section is similar to the Bohr cross section of hydrogenoid atoms^3�^4

σ = πa^2_0 ∼ 10�^{16}cm^2 (1)

where a_0 is the Bohr radius.

The main energy losses^5 of SECS passing through matter with velocities in the range 10�^4 < β < 10�^2 are due to two contributions: (i) the interaction of the SECS positive charge with the nuclei (nuclear contribution), and, (ii) with the electrons of the traversed medium (electronic contribution). The total energy loss is the sum of the two contributions^5�^6.

Electronic energy losses of SECS: The electronic^5�^7 contribution to the energy loss of SECS may be computed with the following formula dE dx = 8πa_0e^2β α Z^{7/6}_Q N_e

(Z^{2/3}_Q + Z^{2/3})^{3/2} (2)

where α is the fine structure constant, β = v/c, Z_Q is the positive charge of SECS, Z is the atomic number of the medium and N_e is the density of electrons in the medium. Electronic losses dominate for β > 10�^4 for the case of the dE/dx in the earth^5.

Nuclear energy losses of SECS: The nuclear^5 contribution to the energy loss of SECS is due to the interaction of the SECS positive core with the nuclei of the medium and it is given by dE dx = πa^2γNE ϵ S_n(ϵ) (3)

where S_n(ϵ) ≃ 0.56 ln(1.2ϵ) 1.2ϵ − (1.2ϵ)�^{0.63} , ϵ = aME Z_QZe^2M_Q (4) and a = 0.885 a_0 ( √ Z_Q + √ Z)^{2/3} , γ = 4M M_Q (5) M_Q is the mass of the incident Q-ball; M is the mass of the target nucleus; Z_Qe and Ze are their electric charges; we assume that M_Q >> M. Nuclear energy losses dominates for β ≤ 10�^4.

Using the energy losses of SECS discussed above, we can computed, for a specific velocity v = 250 km/s, the angular acceptance^6 of a detector located at the underground Gran Sasso Laboratory in Italy (MACRO experiment).

1.2 Interaction with matter of Q-balls type SENS

The Q-ball interior of SENS (Supersymmetric Electrically Neutral Solitons) is characterized by a large Vacuum Expectation Value (VEV) of squarks, and may be of sleptons and Higgs fields. The SU(3)_c symmetry is broken and deconfinement takes place inside the Q-ball. If a nucleon enters this region of deconfinement, it dissociates into three quarks, some of which may then become absorbed in the supersymmetric condensate. The reaction looks like^3 (Q) + Nucleon → (Q + 1) + pions (6) or less probably, (Q) + Nucleon → (Q + 1) + kaons (7) The nucleon enter the q̃ condensate and it gives rise to the process qq → q̃q̃ (8) If it is assumed that the energy released in (6) and (7) is the same as in typical hadronic processes (about 1 GeV per nucleon), this energy is carried by 2 or 3 pions (or kaons). The cross section is determined by the Q-ball radius

σ = π R^2_Q =

16π^2 9 M�2_Q Q2 ∼ 6 × 10�34Q1/2^(1 T eV M_S )2 cm^2 (9)

The corresponding mean free path λ is λ = 1 σN (10)

The energy loss of SENS moving with velocities in the range 10�^4 < β < 10�^2 is constant and is given by dE dx ∼ ζ λ = σNζ (11)

where N is the number of atoms per cm^3 in the traversed material; ζ = 1 (^ρ_{1g.cm}�_3 )GeV is the energy released in one reaction. Large mass SENS lose a small fraction of their kinetic energy and are able to traverse the earth without attenuation for all masses of our interest.

2 Energy losses of Q-balls in the earth

In general the energy losses in the earth are calculated using the density profile of the earth interior. One may observe three layers: the nucleus, the mantle and the crust. For our purposes it is sufficient to use a simpler model, in which the density and composition of each layer is uniform.

In the earth interior model the nucleus is made of iron, with a density of 11.5 g/cm^3 and a conductivity of 1.6 × 10^{16} s�^1; the mantle is made of Si, with a density of 4.3 g/cm^3. The radius of the nucleus is 0.54 earth radii. The crust may be neglected as long as we consider Q-balls arriving at underground detectors from below. The rock above is assumed to have the same composition of the mantle.

The energy losses of SECS in the earth mantle and earth core can be easily computed for different β-ranges and for different positive electric charges of the Q-ball core.

3 Energy losses of SECS in detectors

3.1 Light Yield of SECS in Scintillators

For SECS we distinguish two contributions to the light yield in scintillators: the primary light yield and the secondary light yield.

The primary light yield is due to the direct excitation (and ionization that occurs only for β > 10�^3) produced by the SECS in the medium. The energy loss in the MACRO liquid scintillator is computed from the energy loss of protons in hydrogen and carbon^5�^8

* For electric charge q = 1e the energy loss of SECS is calculated for two cases i) For 10�^5 < β < 5 × 10�^3 we have the following formula ( dE dx ) SECS = 1.3 × 10^5β [ 1 − exp ( β 7 × 10�^4 )2] MeV cm (12)

ii) For 5 × 10�^3 < β < 10�^2 we used the following formula SP = SP_H + SP_C = ( dE dx ) SECS (13)

where SP_H = SL_H × SH_H SL_H + SH_H (14)

SP_C = SL_C × SH_C SL_C + SH_C (15) and SL = A_1 E^{0.45}, SH = A_2 Ln ( 1 + A_3 E + A_4E ) (16)

where (A_{i=1,4}) are constants obtained from experimental data, and E is the energy of a proton with velocity β.

* For SECS with electric charge q = Z_1e the energy losses for 10�^5 < β < 10�^2 are given by^9�^{11} ( dE dx ) SECS = 8πe^2a_0β α Z^{7/6}_1 N_e (Z^{2/3}_1 + Z^{2/3}_2 )^{3/2} [ 1 − exp ( − β 7 × 10�^4 )2] (17)

where Z_2 is the atomic number of the target atom, N_e the density of electrons and α is the fine structure constant.

The primary light yield of SECS is given by ( dL dx ) SECS = A [ 1 1 + AB^{dE}_{dx} ] dE dx (18)

where dE/dx is the total energy loss of SECS; A is a constant of conversion of the energy losses in photons (light yield) and B is the parameter describing the saturation of the light yield; both parameters depend only on the velocity of SECS.

The secondary light yield arises from recoiling particles: we consider the elastic or quasi-elastic recoil of hydrogen and carbon nuclei. The light yield L_p from a hydrogen or carbon nucleus of given initial energy E is computed as

L_p(E) = ∫ E 0 dL dx (ϵ)S�^1_{tot} dϵ (19)

where S_{tot} is the sum of electronic and nuclear energy losses. The secondary light yield is then ( dL dx ) secondary = N ∫ Tm 0 L_p(T ) dσ dT dT (20)

where N is the number density of atoms in the medium T_m is the maximum energy transferred and dσ dT is the differential scattering cross section.

3.2 Energy losses of SECS in streamer tubes

The composition of the gas in the MACRO limited streamer tubes is 73% helium and 27% n-pentane, in volume. The pressure is about one atmosphere and the resulting density is low (in comparison with the density of the other detectors): ρ_{gas} = 0.856 mg/cm^3.

The ionization energy losses of SECS with 10�^3 < β < 10�^2 in the MACRO streamer tubes are computed with the same general procedure used for scintillators, using the density and the chemical composition of streamer tubes.

The threshold for ionizing n-pentane occurs for β ≥ 2 × 10�^3.

3.3 Restricted Energy Losses of SECS in the Nuclear Track Detectors

The relevant parameter for nuclear track detectors is the Restricted Energy Loss (REL), that is, the energy deposited within ∼ 100 Å from the track.

The chemical composition of CR39 nuclear track detector is (C_{12}H_{18}O_7)_n, and the density is 1.31 g/cm^3. For the computation of the REL, only energy transfers to atoms larger than 12 eV are considered, because it is estimated that 12 eV are necessary to break the molecular bonds.

At low velocities (3 × 10�^5 < β < 10�^2) there are two contributions to REL: the ionization and the atomic recoil contributions.

The ionization contribution, which become important only for β > 2 × 10�^3, was computed with Ziegler’s fit to the experimental data.

The atomic recoil contribution, important for low β values, and was calculated using the interaction potential between an atom and a SECS which is

V (r) =

Z_1Z_2e^2 r ϕ(r) (21)

where r is the distance between the core of SECS and the target atom, Z_1e is the electric charge of the SECS core, Z_2 is the atomic number of the target atom.

The Restricted Energy Losses are finally obtained by integrating the transferred energies as − dE dx = N ∫ σ(K) dK (22) where N is the number density of atoms in the medium, σ(K) is the differential cross section as function of the transferred kinetic energy K.

4 Conclusions

We computed for a large range of velocity the energy losses of Q-balls of type SENS and SECS in matter. Using these energy losses and a rough model of the earth’s composition and density profiles, we have computed the energy losses in the earth interior.

We also calculated the energy deposited in scintillators, streamer tubes and nuclear track detectors by SECS, in forms useful for their detection. In particular we computed the light yield in scintillators, the ionization in streamer tubes and the REL in nuclear track detectors.

References

[1] T.D. Lee and Y. Pang, Phys. Rept. 221 (1992);

S. Coleman, Nucl. Phys. B262 (1985) 293. [2] A. Kusenko, Phys. Lett. B405 (1997) 108;

Phys. Lett. B404 (1997) 285; Phys. Lett. B406 (1997) 26.

[3] A. Kusenko and M. Shaposhnikov, Phys. Lett. B 417 (1998) 99;

A. Kusenko et al. Phys. Rev. Lett. 80 (1998) 3185. [4] M. Ouchrif, PhD. thesis, University of Oujda (1999) .

[5] D. Bakari et al., “ Energy Losses of Q-balls.", [hep-ex/0003003], submitted to Astroparticle Physics (2000).

[6] M. Ouchrif, “Q-balls in Underground Experiments", [hep-ex/0002013]. [7] T. Gherghetta, C. Kolda and S.P. Martin, Nucl. Phys. B468 (1996) 37. [8] H. H. Andersen and J.F. Ziegler, “Hydrogen stopping power and ranges in all elements", Pergamon Press (1977).

[9] D. J. Ficenec et al., Phys. Rev. D36 (1987) 311. [10] J. Lindhard and M. Scharff, Phys. Rev. 124 (1961) 28. [11] J. Derkaoui al., Astropart. Phys. 10 (1999) 339;

Astropart. Phys. 9 (1998) 173.

[12] W. D. Wilson, L. G. Haggmark and J. P. Biersack, Phys. Rev. B15 (1977) 2458.

[13] J. Lindhard et al., K. Dan. Vidensk. Selsk. Mat.-Fys. Med. 33 (1963) No. 14. [14] T. W. Ruijgrok, J. A. Tjon and T. T. Wu, Phys. Lett. 129B (1983) 209;

S. Nakamura, PhD. Thesis, UT-ICEPP-88-04, University of Tokyo (1988).