arXiv:hep-ex/0111021 v1 7 Nov 2001

A Study of RHIC Crystal Collimation

D.Trbojevic, BNL, USA, V.Biryukov, IHEP, Protvino, Russia, M.Harrison, B.Parker, P.Thompson, and A. Stevens, BNL, USA, N.Mokhov and A.Drozhdin, FNAL, USA

Presented at EPAC 1998 (Stockholm)

Abstract

The Relativistic Heavy Ion Collider (RHIC) will experience increasing longitudinal and transverse heavy ion emittances, mostly due to intra-beam scattering (IBS). The experiments in RHIC are expected to not only have reduced luminosities due to IBS but also an unwanted beam halo. Primary betatron collimators will be used to remove the large amplitude particles. The efficiency of the primary collimator in RHIC depends very much on the alignment of the jaws which needs to be within few micro-radians for the best conditions. As proposed by V. Biryukov [1] bent crystals could be used to improve the efficiency of an existing collimation system by installing them upstream of the collimator jaws. Bent crystals have been successfully used in SPS, Protvino and Fermilab for extraction of the beam particles channeled through them. This study examines possible improvements of the primary collimator system for heavy ions at RHIC by use of bent crystals. Bent crystals will reduce the collimator jaws alignment requirement and will increase collimator efficiency thereby reducing detector background.^1

1 Introduction

The Relativistic Heavy Ion Collider (RHIC) has two large angle acceptance detectors PHENIX and STAR placed at the interaction regions (IR-’s) where the heavy ion beams (like fully striped gold^{+79}Au^{197} ions) from the two parallel rings will be focussed to β^⋆ = 1 − 2m. The intra-beam scattering of the heavy ions like gold^{+79}Au^{197} ions is expected to be a dominant effect of the emittance growth with a fast loss of luminosity. The transverse and longitudinal emittances are expected to double in size between one to two hours due to intra-beam scattering which may lead to transverse beam loss. Particle amplitudes also grow due to other effects like beam gas interaction, beam diffusion due to the nonlinear beam dynamics etc. This results in beam loss at limiting apertures at the triplet magnets close to the large detectors. This beam loss creates hadronic showers which leads to larger than desirable backgrounds in detectors. To reduce this background it is necessary to scrape the unwanted beam. The primary betatron collimator has to be able to remove particles with large amplitudes. The

1Work performed under the auspices of the U.S. Department of Energy

RHIC collimator studies previously reported [2], [3], had shown that a combination of the primary with the secondary collimators reduced the background around the large detectors. The studies have shown that losses of the out-scattered ions from the primary collimators were, as expected, localized at the high beta focusing quadrupoles. The amplitude growth of the the gold^{+79}Au^{197} and proton ion beams was estimated by a diffusion process based on measurements at the SPS-CERN [4]. The energy and phase distributions of the out-scattered ions from the primary collimators were obtained by using the “ELSHIM” Van Ginneken code [6] , [7], which simulated transport of the 100 GeV gold^{+79}Au^{197} ion beam through the primary collimator jaws. The previous study [3] has shown that for the best collimation of the gold ions the alignment of the primary collimators’ jaws has to be within about 10 μrad. This is a report where a simulation of the bent crystal deflection for the RHIC beam collimation of the heavy ion beam is described.

There are few motivations for this study and an eventual implementation of the bent crystals for the collimation purposes:

• The bent crystal, with a length of the order of 1 cm removes a request for the high accuracy in alignment of the primary collimator jaws

• The primary collimators, placed ∼7 m downstream of the crystal, become effectively the secondary collimators, because most of the large amplitude particles are bent into it.

• The background of the large detectors will be reduced because the losses at the high focusing quadrupoles are expected to be reduced.

1.1 Bent Single Crystal Deflection

The protons and heavy ion (like fully stripped lead^{208}P b^{82+} ions) bent single crystal extraction has been demonstrated and continually used at many laboratories like (SPS, Fermilab, IHEP, Aarhus, ect.) and previously reported in many articles [8], [9], [10] ect. The high energy relativistic particles are channeled within the bent crystal planes and bent away from the center of the beam.

The theoretical predictions and experimental results of the crystal extraction and deflection are very well understood. The crystal extraction efficiency is defined as the number of ions extracted by the crystal with respect to the number of lost particles due to the crystal. The theoretical predictions of the crystal extraction F are obtained by tracking the particles through the potential of the bent crystal lattice taking into account the multipole and catastrophic scattering, nuclear and electronic collisions with the crystal discontinuities, surface effects and dislocations [10]. The heavy ions (like +79Au^{197}) interact with the crystal matter differently than protons due to their large mass and high charge state. The critical angle ψ_c, one of the most important parameters for the channeling acceptance [5] scales with the mass and charge as ψ_c ∼ √_Z p .

2 Bent Crystal Collimation Simulation in RHIC

The crystal collimation is clearly a multi turn process. The multi turn efficiency for the TEVATRON is estimated well above 90% at the peak according to our simulation. In this report, instead of a proper simulation of the multi turn deflection a simulation a single pass of the diffused gold ions is performed. The initial horizontal and vertical phase space distributions of 19528 gold^{+79}Au^{197} ions in front of the crystal were obtained by selecting ions which had their amplitudes grown above 5σ_x horizontally by diffusion process. The diffusion was described by the published experimental and theoretical results from the SPS (CERN) [4].

All particles in the initial horizontal phase space distribution have the horizontal distance larger than x ≥0.04290 m which represents 5σ_x of beam with the 40π mmmrad emittance. The betatron functions at this position of the crystal are presented in Table 1. Before the gold ions were transported through the 1 mrad bent silicon single crystal Si(110), an optimum value for the crystal length was selected to be l=1 cm along the beam direction. This length provides large enough deflection efficiency and is still practical for the experimental use. The gold^{+79}Au^{197} ions, with an input energy of

Table 1: Betatron Functions at the Crystal β_x (m) α_x β_y α_y D_x 1222.631 29.349 365.902 13.885 -1.055

γ=108.4, are transported through the lattice of the bent silicon crystal by the Monte Carlo program “CATCH” [12]. The total number of the gold ions which passed the crystal was 18296. The number of particles which interacted with the crystal nuclei was 5%. The simulation of the bent crystal collimation is continued by using the ions obtained from the output at the crystal edge. Four coordinates of each ion (x, x’, y, y’, dp/p) were used as an input into the tracking program TEAPOT [11]. All measured systematic as well as the random multipole errors in the magnetic field for each magnet were introduced into the lattice as well as the measured magnet misalignment errors. The bent single crystal is placed in the lattice at the position downstream of the high focusing quadrupoles at the IR where the PHENIX detector is located. The tracking was performed at the top energy of 100 GeV/nucleon for gold for 256 turns. The rms values for misalignment of the arc quadrupoles were Δx,y=0.5 mm Δθ=0.5 mrad, while from the measurements of the triplet quadrupoles the roll and misalignment errors for the rms values were Δθ=0.5 mrad and Δx,y=0.5 mm. During tracking the RF voltage was included and the longitudinal motion of the surviving particles could be monitored. Particles which survived, with momentum offsets within the bucket size limit, executed synchrotron oscillations. In the phase space of the gold ions at the end of the crystal, there are large number of particles with momenta larger than the bucket size. If these particles are not removed by the primary collimators they will be lost due to their large momentum offsets. The crystal length, together with its bending angle, can be further reduced to affect the momentum loss distribution which will be addressed in our future simulations.

2.1 Transverse Phase Space Distribution at the Crystal End

The position of the primary collimator is 7.68 m downstream of the single crystal. Each tracking run was performed with a different position of the primary collimator selected to a distance from center of the beam, starting with a position completely away from the beam. In gold ion distributions in the horizontal phase space at the downstream edge of the crystal, there are several important features to point out: -The channeled particles are contained in the upper part of the x and x’ plot with a slope of x^′_{ch} ∼0.073 mrad. The slope of the gold ions, used for the input into the bent crystal, is within the range of −1.080mrad < x^′_{input} < −1.058mrad. A difference between the average slopes of x^′_{ch} − x^′_{input} ≃1 mrad, shows that the channeled particles are bent for ≃1 mrad.

-The group of particles at the lower part of the x and x’ plot with a value of x≃0.04289 m and with the slope of x’≥-1.15 mrad is not channeled. The slope of the horizontal amplitude x’ 1.15 mrad reaches negative values larger than the end within the initial distribution (-1.108 mrad).

-Particles with the slope of the horizontal amplitude between the channeld ones and the edge clearly interacted with the crystal lattice. When the primary collimator was completely away from the beam, the particles from the crystal are lost mostly at the first quadrupole downstream of it, as well as at the high focusing quadrupoles around the IR’s where the β^⋆=1 m. In the gold ion distribution in the horizontal phase space, at the 7.68 m downtream of the crystal, particles which reached the primary collimator in the first pass are presented within a very narrow region between values of the slope of the horizontal amplitude −1.17 mrad≤ x^′ ≤ −0.47 mrad. Particles within the ellipse survived many turns and reach every turn the primary collimator again. If all the particles are channeled then the primary collimator could be set up at the distance close to 0.042 m. It is clear that not all the particles are channeled and there will be losses around the ring even when the primary collimator is set to a horizontal distance of 5σ_x of the beam. This is due to the paticles which come from the crystal with the slopes larger than 1.08 mrad from the crystal edge.

3 A Comparison of the Crystal Collimation with the Previous Results

The large amplitude particles are mostly likely to get lost at the most limited appertures in the two RHIC accelerator rings which are located at the high focusing triplet magnets. The background of the two large detectors will be enhanced by the showers generated by these lost particles. Table 2 represents a the losses around the RHIC rings from the particles scattered of the standard collimation case by using a standard primary and secondary collimators while table 3 shows the losses from the particles deflected by the crystal. In the table 3 two extreme cases are presented when the primary collimator downstream of the crystal is wide open and when it is set to 5σ_x, the same horizontal distance as a front edge of the crystal.

Table 2: Ring Losses for Standard Collimation Location Sec. Opened Sec. Col. 6σ S.Col. 0.00 % 62.30 % q2o8 42.38 % 16.99 % q3o8 8.20 % 3.30 % q3i6 14.26 % 0.30 % Pr.Col 12.11 % 5.10 %

Table 3: Ring Losses for Crystal Collimation Location Pr. Col. Open Pr. Col. 5σ Pr.Coll. 0.00 % 99.43 % q2o8 0.70 % 0.00 % q3o8 1.87 % 0.00 % q3i6 14.56 % 0.52 % Crystal 2.66 % 0.00 %

4 Conclusions

We presented a simulation study where the bent single crystals are used in the RHIC collimation system. The preliminary results are very encouraging. The 100 GeV/nucleon gold ions were transported through the bent single crystal Si(110) and the gold ions from the crystal were tracked through the RHIC storage lattice. A comparison to the previous results with a standard two stage collimator system shows lower losses around the ring from the outscattered particles. This would possibly reduced background at the two large detectors due to smaller losses at the high focusing limited apperture quadrupoles located around the detectors. The study of the crystal collimation in RHIC will be concluded by the multiturn crystal deflection simulation and with a shorter length and smaller bending angle single crystal. We expect improvement in the momentum distribution of the ions passed through the crystal and a reduction of lost particles around the ring.

References

[1] V. Biryukov, Proceedings of the “International Simposium on Near Beam Physics”, at Fermi National Laboratory, Batavia, Illinois, USA, Sptember 22-24, 1997, pp. 179-184.

[2] D. Trbojevic, A.J. Stevens, M.A. Harrison, F. Dell, and S. Peggs, “A Study of Betatron and Momentum Collimators in RHIC”, Proc Part. Acc. Conference PAC97, Vancouver, May 1997.

[3] D. Trbojevic and A.J. Stevens, “A Study of Betatron and Momentum Collimators in RHIC”, Proceedings from the “International Symposium on Near Beam Physics” at Fermi National Laboratory, Batavia, Illinois, USA, September 22-24, 1997, pp. 137-142.

[4] W. Fischer, M. Giovannozzi and F. Schmidt, “Dynamic aperture experiment at a synchrotron”, Phys. Rev. E, Vol. 55, Number 3, p. 3507 (1997).

[5] J.Lindhard, Mat.Fys.Medd. Dan. Vid. Selsk., Vol. 34, 1 (1965).

[6] A.Van Ginneken, Elastic scattering in thick targets and edge scattering, Physical Review D, Vol. 37, number 11, 1 June 1988, pp.3292-3307.

[7] A.Van Gineken, ELSHIM, Program to simulate Elastic Processes of Heavy Ions, BNL-47618, AD/RHIC-100, Informal Report, May 1992.

[8] G. Arduini, K. Elsener, G. Fidecaro, M.Gyr, W. Herr, J. Klem, U. Mikkelsen, and E. Weisse, “Energy Dependence of crystal assisted extraction at the CERN SPS”, Proc. Part. Acc. Conference PAC97, Vancouver, May 1997.

[9] C. Biino, M. Clement, N. Doble, K. Elsener, A. Freund, L. Gatignon, P. Grafstrom, K. Kirsebom, U. Mikkelsen, S.P. Moller, E. Uggerhoj, and T. Worm, “Deflection of 200 GeV/c and 450 GeV/c positevily charged particles in a bent germanium crystal”, Physics Letters B, Vol. 403, (1997), pp.163-167.

[10] V. Biryukov, “Computer Simulation of Crystal Extraction of Protons from a Large- Hadron-Collider Beam”, Phys. Rev. Lett., Vol. 74, Number 13, p 2471-2474(1995).

[11] L.Schachinger and R. Talman, “A Thin Element Accelerator Program for Optics and Tracking”, SSC Central Design Group, Internal Report SSC-52 (1985).

[12] Valery Biryukov, “Crystal Channeling Simulation-CATCH 1.4 User’s Guide”, SL/Note 93-74(AP), CERN, 1993.