arXiv:hep-ex/0204005 v1 4 Apr 2002

Summary and Outlook of the International Workshop on Aging Phenomena in Gaseous Detectors (DESY, Hamburg, October, 2001)

M. Titov^∗, M. Hohlmann, C. Padilla, N. Tesch

Abstract

High Energy Physics experiments are currently entering a new era which requires the operation of gaseous particle detectors at unprecedented high rates and integrated particle fluxes. Full functionality of such detectors over the lifetime of an experiment in a harsh radiation environment is of prime concern to the involved experimenters. New classes of gaseous detectors such as large-scale straw-type detectors, Micro-pattern Gas Detectors and related detector types with their own specific aging effects have evolved since the first workshop on wire chamber aging was held at LBL, Berkeley in 1986. In light of these developments and as detector aging is a notoriously complex field, the goal of the workshop was to provide a forum for interested experimentalists to review the progress in understanding of aging effects and to exchange recent experiences.

A brief summary of the main results and experiences reported at the 2001 workshop is presented, with the goal of providing a systematic review of aging effects in state-of-the-art and future gaseous detectors.

I. Introduction

Aging effects in proportional wire chambers, a permanent degradation of operating characteristics under sustained irradiation, has been and still remains the main limitation to their use in high-rate experiments [1]. Although the basic phenomenology of the aging process has been described in an impressive variety of experimental data, it is nevertheless difficult to understand any present aging measurement at a microscopic level and/or to extrapolate it to other operating conditions. Many chemical processes are expected to occur simultaneously in the gaseous discharges surrounding the wire, and consequently a quantitative description of aging effects, which would require as a minimum a detailed analysis of all gas-phase and gas-surface reaction products, is currently not available. There is much experimental information, well summarized in [2]-[4], which suggests that wire chamber lifetime may be extremely sensitive to the nature and purity of the gas mixture, different additives and trace contaminants, materials used in contact with the gas, geometry of electrodes and configuration of electric field. The ’classical aging effects’, well known since the advent of wire chambers, lead to the formation of deposits, conductive or insulating, on the electrode surfaces and manifest themselves as a decrease of the gas gain due to the modification of electric field, excessive currents, self-sustained discharges, or sparking. Traditionally, the aging rate has been parameterized as a normalized gas gain loss: R = −^1_G^{dG}_{dQ} (% per C/cm), where G is the initial gas gain, dG is the loss of gas gain after collected charge dQ per unit length [3]. However, the assumption that the aging rate is only a function of the total accumulated charge has not been confirmed for gaseous detectors operated in high-rate environments. In reality, the rate of polymer formation depends upon many microscopic variables such as cross-sections of electron and photon processes and their energy distributions in gas avalanches, molecular dissociation energies, as well as densities of electrons, ions and free radicals. Consequently, one may expect that the aging rate could also be affected by macroscopic parameters, such as gas gain, ionization density and radiation intensity, which are directly related to the basic microscopic variables. Several results presented at the 2001 workshop clearly indicate that such dependencies do exist.

Some of the conclusions from the 1986 workshop are still valid in 2001. However, the dramatic increase in charge (up to 1.0^C_{cm wire} per year), which is expected to be accumulated on sensing electrodes in the new high rate experiments, poses much more stringent constraints on the radiation hardness of materials and gas mixtures, assembly procedures, and basic rules for construction and operation of gaseous detectors, than previously encountered. Only a limited choice of gases have been demonstrated to tolerate such doses. Moreover, recent experience with straws and honeycomb drift tubes revealed that chemical etching processes leading to a dramatic damage of gold-plating on wires could occur in non-polymerizing CF_4 mixtures at exceedingly high current densities. These new developments since the 1986 workshop raise a question about the adequacy of using CF_4-based mixtures for long-term, high-rate applications.

The scientific program of the 2001 workshop addressed specific questions which, as reported by many authors, are of a primary interest: classical aging effects, models and insights from plasma chemistry, materials for detectors and gas systems, lessons learned from detector operation at high radiation intensities, new aging effects, experiences with large systems and recommendations for future detectors. About 100 detector experts attended the 4 day workshop, and 10 invited talks, 31 contributed talks and 9 posters were presented in 7 sessions [5].

∗Featured talk at the IEEE Nuclear Science Symposium and Medical Imaging Conference, November 4-10, 2001, San Diego, USA

II. General Characteristics of Aging Processes

A. Classical Aging Effects

The ’classical’ aging effects are the result of chemical reactions occurring in avalanche plasmas near anodes in wire chambers leading to formation of deposits on electrode surfaces. During gas avalanches many molecules break up in collisions with electrons, de-excitation of atoms, and UV-photon absorption processes. Whereas most ionization processes require electron energies greater than 10 eV, the breaking of covalent molecular bonds and formation of free radicals requires only 3-4 eV, and can lead to a higher concentration of free radicals than that of ions in the gaseous discharges. Consequently, free-radical polymerization is regarded as the dominating mechanism of wire chamber aging. Since free radicals are chemically very active they will either recombine to form the original molecules or other volatile species, or may start to form new cross-linked molecular structures of increasing molecular weight. When the polymerized chain becomes large enough for condensation to occur, it will diffuse to an electrode surface.

It is worthwhile to mention that one has to distinguish between formation of polymers in the gas avalanche near the anode wire and their deposition on electrode (anode or cathode) surfaces. The polymer deposition mechanism can be viewed as a phenomenon that occurs whenever the gaseous species fails to bounce back after a collision with an electrode surface, including a surface layer of molecules previously formed in the gas discharges. Initially, the polymer could be attached to the surface very weakly, unless some additional chemical reactions take place between the polymer atoms and atoms of the wire material. Moreover, many free radicals are expected to have permanent or induced dipole moments so that electrostatic attraction to a wire can also play a significant role in the polymer deposition process. For the inert gold-plated anode wires the probability for polymers to stick to the surface is rather small until the creation of the first monolayer of deposits, which may significantly increase further deposition. The influence of surface wire quality on anode aging and a model of polymer film growth is proposed in [6]. The importance of reactions between the electrode material and polymers produced in avalanches for the deposition mechanism can be illustrated by the following examples:

• Non-gold anode wires react with fluorine radicals produced in an avalanche to form resistive metal fluorides. Many studies have demonstrated excellent aging properties, up to 10^C_{cm·wire} , of CF_4/iC_4H_{10} (80:20) gas avalanches [7]-[9], which also has the ability to etch silicon-based and hydrocarbon deposits on previously aged gold-plated wires [10], [11]. However, extensive deposition was observed on unplated wires irradiated in CF_4/iC_4H_{10} (80:20) [11], [12].

• Exceedingly large aging rates were observed in pure CF_4 and in Ar/CF_4/O_2 (50:40:10) [11]-[13], which are typical etching gases and reluctant to polymerize. This effect was related to the chemical processes at the cathode, where trace fluorocarbon deposits were found resulting in a loss of gas gain and not in a self-sustained Malter discharge.

The self-sustained discharge (Malter effect) [14], which is due to a thin insulating layer deposited on a conducting cathode by a polymerization mechanism, is one of the most devastating phenomena of all aging effects. The resistivity of the insulating layer defines the maximum rate capability of the detector before the onset of field-emission of electrons from the cathode, which starts if the rate of ionic charge neutralization across the dielectric film is smaller than the rate of ion charge build-up [15], [16]. There exists evidence that certain metal oxide coatings on the cathode and/or simply the cathode material itself (eg. carbon-loaded polycarbonate foil) may not be conducting enough and could cause Malter-like breakdowns in the presence of large localized ionization densities [3], [16], [17]. Several other factors may facilitate its ignition, such as highly ionizing particles, sparks, sharp points on electrodes causing corona discharges, or thin anode wires [15]. It is easy to ignite Malter currents in a detector operating with hydrocarbon gases at elevated high voltages [18] or forcing chambers to breakdown [19]-[21], and in a detector, which has been previously exposed to TMAE gas [22]. The CRID RICH detector [23] with an excellent 3-dimensional single electron reconstruction capability allowed the first imaging of the onset of the Malter effect, which starts from sporadic bursts of single electrons from a localized cathode spot [22]. Such a positive feedback between electron emission at the cathode and anode amplification will lead to high ionization densities at distinct chamber locations. This, in turn, can initiate the production of new reactive species at much larger rates, thus promoting more deposits to form at the same cathode spot to an extent sufficient to establish a classical self-sustained Malter discharge. The most dangerous consequence of this phenomena is that the Malter effect could easily spread over a large area, if it goes undetected for a long period of operation, thus causing irreparable damages to the chamber.

Many experiments have demonstrated that the addition of H_2O or alcohols – after the insulating layer at the cathode is already formed – tends to stabilize the detector operation, but not to cure the Malter effect [2], [3]. When these additives are removed, usually the chamber suffers from Malter effect again. Recently, it was discovered that the addition of oxygen (0.02-0.05 %) or CO_2 (5 %) to the damaged chamber, which showed a self-sustained dark current with He/iC_4H_{10} (80:20), could revert or cure a Malter breakdown in the presence of high current density [18]. When the oxygen is removed, the chamber can still operate at a high ionization level (although it will start to age again without additive). It is also worthwhile to mention that the possibility of reanimation of anode wires aged in hydrocarbon gases by means of sputtering was demonstrated in Ar/O_2 (99:1) and Ar/CO_2 (93:7) [24], [25]. These effects support results from plasma chemistry, where it is known that oxygen reacts with hydrocarbon molecules and the end products are volatile CO, CO_2, H_2O and H_2.

B. Wire Chambers vs Plasma Chemistry

While the specific reactions responsible for wire chamber aging are extremely complex, some qualitative approach to the aging phenomena in different gases could be obtained from similarities between chemical processes in plasmas of gas avalanches [2], [3], [11], [12] and those that occur in the better-understood low-pressure (< 1 Torr) rf (13.6 MHz) plasmas [26], [27]. Although many parameters (electric field, gas pressure, electron density, power density) are vastly different between the two regimes, the electron energies are not so different. Also, in both cases the free radicals are most likely the active species involved in polymer formation.

In plasma polymerization, the overall mechanism of ‘Competitive Ablation and Polymerization’ proves to be a basic principle that describes reactions occurring in a plasma polymerization system. Considerable fragmentation of the gas molecules or rearrangement of atoms occurs in the plasma and the extent of the process and the dominating mechanism vary with the types of gases and the discharge conditions. The most important concept here is that both polymerforming species and species that cause ablation (physical or chemical etching) of materials are created in the plasma of the original gas. The significance of this concept is fully established in perfluorocarbon plasmas, which represent the most extreme case of ablation competing with polymer formation. Actually, CF_4-based gases are used for both etching and deposition processes, the distinction being made by the gas and its concentration with which CF_4 is mixed. In general, the addition of oxygenated species shifts the chemistry of CF_4 plasmas towards etching, while the addition of hydrogenated species shifts the chemistry towards polymerization [26], [28]. In the former case, the dissociative products of CF_4 and O_2 are the most desirable active species for the etching processes in plasmas [29]-[32]. For the latter case, in the absence of hydrogen, products of the CF_4 discharge could act as an effective etching gas especially for Si-based deposits, which react with fluorine to form volatile SiF_4. The addition of hydrogen atoms or molecules to CF_4 scavenge F atoms by the formation of more stable HF and produces a mixture with carbon-enriched (CF_3, CF_2, CF ) residues. As the ratio of F/C decreases, perfluorocarbons polymerizes readily, i.e. the balance shifts from ablation to polymerization [28], [33]-[35]. For instance, very fast polymer formation was observed in C_6F_6 and C_2H_2F_4 plasmas [28]. On the other hand, hydrofluoric acid can chemically attack HF -soluble materials existing in the system. Under certain conditions, Si-etching can be accompanied by the polymerization of the etching gas CF_4 on the Si-substrate [29], [36], [37].

Correspondingly, recent results from wire chamber operation also show that both polymerization and etching phenomena can occur in CF_4-based gases (see section V). Particularly, using the same experimental setup, a lack of apparant aging have been observed in CF_4/iC_4H_{10} (80:20) and CF_4/iC_4H_{10} (50:50) mixtures, whereas heavy carbonaceous deposits were observed on the gold-plated wires in CF_4/iC_4H_{10} (95:5), CF_4/iC_4H_{10} (20:80) and CF_4/C_2H_4 (95:5) gases [11].

Two other examples, where conclusions from plasma chemistry are qualitatively applicable to wire chambers are: • In plasma chemistry, most organic compounds with oxygen-containing groups are generally reluctant to form polymers. For example, water in plasmas could act as an efficient modifier of the polymer chain-growth mechanism by reacting with polymer precursors and forming volatile species (up to 50 % H_2O was added to the plasma feed gas) [26]. In wire chambers, the addition of water (a few hundred to a few thousands ppm of H_2O) has been found to effectively suppress polymerization effects [38], [39], to prevent Malter breakdown [18], [40], [41], or even to restore the original operation in aged counters [42], [43]. There is more than one mechanism by which H_2O/alcohols can help in wire chambers [15], [44]. Because of the large dipole moment, these molecules will tend to concentrate near the electrode surfaces, where polymerization takes place. Water has an additional advantage in wire chambers since it increases the conductivity of the partially damaged electrodes - a property that can have adverse effects in a MSGC [4].

• In plasmas, the characteristic polymerization rate of Si is higher than for C [28]. From the viewpoint of wire aging, even minor traces of Si-pollutants in the gas have a much higher tendency to create deposits, than similar amounts of hydrocarbon molecules.

It has to be stated, though, that the absence of corresponding systematic studies in plasma chemistry with parameters similar to wire chambers (atmospheric pressure, power densities, gas mixtures) does not allow any quantitative comparisons between the plasma chemistry and wire chamber processes.

III. Experience from laboratory R & D experiments.

Over the last few decades an impressive variety of experimental data has been accumulated from laboratory tests and detectors installed at high energy physics facilities. However, there are many contradictory experiences obtained in seemingly identical conditions, which means that we do not always control all parameters that influence aging effects. It is now well established that – even if a low aging rate can be obtained in the laboratory with very pure gas and otherwise clean conditions – large-area detectors using the same mixture can fail due to severe aging after a relatively small beam exposure. However, experience from the laboratory, where operating conditions are much better controlled, can be used to understand some general principles and might help to implement these results successfully in large chambers.

There are a lot of experiments that clearly indicate premature aging in Ar/CH_4 mixtures exposed to intense radiation [38], [45]-[49]. Moreover, the aging rate in Ar/CH_4 (90:10) was found to be mainly a function of current density, i.e. the product of irradiation rate and gas gain, independently from electrode material and purity of methane [50], [51]. This observation indicates that CH_4 itself polymerizes in the avalanche plasma due to the hydrogen deficiency of radicals and their ability to make bonds with hydrocarbon molecules [3], [26], and similarly for all hydrocarbon gases. Under certain conditions the aging rate in Ar/C_2H_6 with alcohol can be strongly reduced [52], [53]. However, noble gas/hydrocarbon mixtures are not trustworthy for long-term, high-rate experiments. In order to suppress polymerization of hydrocarbons, oxygen-containing molecules can be added to the mixture. For Ar/CH_4/CO_2, measurements have shown that sensitivity to aging decreases with decreasing CH_4 and increasing CO_2 content [24].

Dimethylether (DME) appeared in the 1986 workshop as a good quencher and a reasonably good radiation-hard gas for wire chambers operated at high intensities. The aging rate in DME tends to be lower than the polymerization rate of ordinary hydrocarbons [2] and several groups reported the absence of aging effects in wire chambers up to large values of accumulated charge [6], [50], [51], [54]. However, the aging effects in DME appear to be highly sensitive to traces of pollutants at the ppb level, which are difficult to keep under control in large detectors. There is also evidence of high chemical reactivity of DME, which requires a careful material selection for detector assembly and gas system components [55].

Attempts were made to replace organic quenchers with aging resistant ones, like CO_2. The Ar(Xe)/CO_2 gases could be in principle absolutely radiation resistant under clean conditions; up to now, there is no well-established mechanism, which could lead to the formation of anode deposits in these mixtures. Stable operation up to ∼ 1^C_{cm wire} was reported for Ar/CO_2 [2], [3], [56], [57] and up to ∼ 5^C_{cm wire} for Xe/CO_2 mixtures [58]. However, a gradual decomposition of CO_2 can also occur and the resulting pure carbon can be deposited specifically at the cathode [24], [59]. Sometimes this carbon layer does not affect the performance of drift tubes [24]. Recent systematical aging tests were performed for the ATLAS muon aluminum drift tubes. In order to guarantee reproducibility of the results and to study aging behavior under different operating conditions, 26 tubes with Ar/CO_2 (93:7)+600 ppm H_2O mixture have been irradiated with an Am^{241} source up to an accumulated charge of ∼ 1.3^C_{cm wire} and 47 tubes with Ar/CO_2 (90:10) gas were exposed to a Cs^{137} source up to ∼ 0.6^C_{cm wire} [25], [60], [61]. All tubes were 100 % efficient at the end of these aging runs, however, these measurements represented an average performance of the wire over a length of 3 m and were not sensitive to local inefficiencies. It should be mentioned, that the aging performance of Ar/CO_2 is sensitive to traces of impurities. Si-based pollutants are one of the sources of aging in Ar/CO_2, probably due to the production of non-volatile SiO_2 [57], [60], [62], [63]. Several other experiments also observed aging effects in Ar/CO_2, however, the reasons of the gain reduction were not identified [6], [25], [64], [65].

The identification of radicals and fragments formed in the electron avalanches is a means to understand and eventually overcome the problems related to the aging of gaseous detectors [3], [66], [67], [68]. A recent investigation of avalanche products has shown that seventeen new compounds were identified in the effluent gas stream from an irradiated proportional counter with Ar/C_2H_4 (50:50) mixture [69]. Some of the observed species (aliphatic hydrocarbons) contained double or triple bonds which, similar to plasma polymerization, can be easily ’opened’ in the discharges and polymerize very aggressively. The systematic analysis of light emission spectra in proportional counters may also provide useful information about basic physics processes in electron avalanches [70], [71].

IV. Experience with ‘standard radiation level’ detectors.

A. Classical Wire Chambers.

For a long time, classical wire chambers of various designs with many thousands of wires have been used for large-area tracking detectors in the ‘standard radiation levels’ experiments, i.e. with total collected charges < 50 mC/cm for the whole period or running. Basic rules for the construction and operation of these detectors are known. Moreover, many of the large wire chambers were built and demonstrated to work [2], [3], [72]. Nevertheless, recent experience with large systems still shows the appearance of aging effects associated mainly with hydrocarbon polymerization and with presence of pollutants in the gas system.

A time expansion chamber filled with CO_2/iC_4H_{10} (80:20) mixture successfully operated as a vertex detector of the L3 experiment at LEP. After an accumulated charge of 10^{−4 C}_{cm wire} collected during 11 years of running, there was no sign of aging [73]. Classical aging effects (Malter effect or/and sense wire deposits) have been observed in the H1 Central Jet Chamber operated with Ar/C_2H_6 (50:50) + 0.1 % H_2O and in the ZEUS Central Tracking Detector filled with Ar/CO_2/C_2H_6 (83:12:5) + 0.5 % C_2H_5OH at the HERA ep-collider. In the former case, the replacement of 0.1 % H_2O with 0.8 % of ethanol cured the Malter effect and stabilized the detector operation [74], while for the latter case the aging problem was alleviated by the addition of H_2O [75]. In both systems there was no clear indication that polymerization is ‘fed’ by the presence of impurities in the gas system, indicating that hydrocarbons are the likely source of chamber aging.

An abundance of literature exists describing the dramatic effect of certain gaseous constituents, which may be either due to the contaminants initially present in the gas system or that result from outgassing of construction materials upon the aging rate of wire chambers. Several examples of large systems, where the presence of pollutants increased the aging rate many times, have been reported in [76], [77]. While laboratory tests with prototype chamber indicated negligible aging rates (R < 10 %/C/cm), a much larger aging rate (1000 %/C/cm) was observed in the large Central Tracking Chamber of the CDF experiment operated with Ar/C_2H_6 (50:50) + 0.1 % alcohol. The analysis of the aged sense wires showed the presence of C, O and Si elements. After cleaning the gas system components and making changes to reduce aerosols emanating from an alcohol bubbler, the aging rate was greatly reduced allowing the detector to operate without dramatic loss in performance. The presence of Si is to be pointed out here since silicon has been systematically detected in analysis of many wire deposits, although in many cases the source of Si-pollutant has not been clearly identified. The Si-compounds are found in many lubricants, adhesives and rubber, encapsulation compounds, silicon-based grease, various oils, G-10, RTV, O-rings, fine dust, gas impurities, polluted gas cylinders, diffusion pumps, standard flow regulators, molecular sieves, and their presence may not necessarily be noted in the manufacturer’s documentation [2], [3], [51]. Because of a high specific polymerization rate Si molecules should be avoided in the detector system at all cost. Consequently, if there is a question whether or not some device may incorporate silicon compounds it should be subjected to additional aging test. Another example is the D0 WAMUS muon drift chambers, which suffered fast anode aging when operated with an Ar/CF_4/CO_2 (90:6:4) mixture. Here, the source of the contaminant was outgassing of glass-steel polyester epoxy resin used in the construction. A cold-trap added to the gas recirculating system reduced the aging rate by a factor of ten, while the extreme method of quickly heating the wires just below their melting point (‘zapping’) succeeded in blowing hardened sheaths of outgassing products off of the wires; thus completely cleaning the aged gold wires ‘in-situ’ [77].

The chosen examples underline the importance of having control over all detector parameters, but often it is quite difficult to draw final conclusions since nominally identical detectors connected to the same gas circuit may perform very differently [74], [77]. In some cases it might be possible to eliminate harmful impurities by installing appropriate filters or cold traps in the gas system [76], [77]. Many helpful guidelines for construction and operation of classical wire chambers at ‘low’ rates, which have been compiled over the past 40 years, are summarized in [78] as follows:

• Create a moderately clean environment during detector construction and clean the gas system components prior to start of operation;

• Avoid the presence of ‘bad’ molecules in contact with active gas (Si, halogens, sulphur, plasticizers, outgassing) [2], [3];

• A huge variety of gases can be successfully used (noble gases, hydrocarbons, freons, CO_2, DM E, H_2O, alcohols,‘magic gas’,...);

• Hydrocarbons are the most likely source of aging (effect is more pronounced in presence of contamination or under discharges, sparks, Malter effect). Even with addition of water/alcohol the improvements are still limited and it is problematic to consider them for high rate applications;

• If aging effects are observed despite taking all of the above precautions, add suitable additives and/or identify the source of pollution and clean the gas system.

B. Resistive Plate Chambers.

In the 1990’s, Resistive Plate Chambers (RPC) were proposed as an economical and proven technology ideally suited for large-area detection systems. For example, both the Belle and BaBar experiments have instrumented their flux returns with RPC’s operated in streamer mode. However, high chamber currents started to show up in Belle’s RPC’s almost immediately upon installation. This problem was related to the presence of high levels of water (∼ 2000ppm) in the gas, which permeated through the walls of the polyethylene tubing. Operating the RPC’s with Ar/C_4H_{10}/C_2H_2F_4 (30:8:62) plus water in streamer mode led to the formation of hydrofluoric acid that etched the electrodes made from ordinary glass. This resulted in the creation of emission points triggering chamber currents. The problem was finally solved by replacing the plastic tubes with copper ones (H_2O < 10ppm) [79].

In the BaBar RPC’s the electrodes are made of Bakelite coated with linseed oil. After an initial period of successful operation with an Ar/C_4H_{10}/C_2H_2F_4 mixture, the RPC’s started to show a permanent reduction in efficiency and an increase in dark current. The main conclusion of the subsequent extensive R&D studies related the BaBar RPC problem to the lack of polymerization of the linseed oil and formation of oil droplets under the influence of high temperature and high currents [80]. Further efficiency deterioration mechanisms, that may play an important role in BaBar’s RPC’s have been proposed by J. Va’vra [15]. He suggested that this problem could be due to an electrochemical change of resistivity of fresh linseed oil, modulated by the presence of water in the RPC’s. A positive example is the L3 RPC at LEP, which operated at a very low particle flux over 8 years without significant loss of efficiency [81]. In contrary to RPC’s used in streamer mode at the Belle, BaBar and L3 experiments, the future LHC experiments will operate RPC’s in proportional mode, which is desirable in terms of total accumulated charge per particle. However, much higher particle fluxes at the LHC require more systematic R&D studies of the RPC technology, since many processes could degrade their performance under high-rate conditions. Recent results of aging tests for ATLAS, CMS and LHC-B RPC’s indicate that under the right circumstances RPC can withstand large integrated doses [82]-[84].

It should be stressed though that the problems with Belle and BaBar RPC’s are not ‘classical aging effects’, but rather unpredictable surface effects, related to the specific choices of materials and operating conditions.

C. Gaseous Photodetectors.

Gaseous photon detectors used in high energy physics experiments must ensure an efficient way of converting U V photons to electrons with a subsequent detection of single photoelectrons [85], [86]. For gaseous converters, systematical aging studies have been carried out with T M AE and T EA vapors [87]-[89], which are added to the carrier gas to provide photoionization capability [90]. TMAE is the best material in terms of quantum efficiency, however, the main obstacle of using T M AE at high rates is an exceedingly rapid gas gain loss due to deposits on the anode wires [86], [91]-[94]. Several studies have indicated that anode wire deposits can be removed by heating the wires with elevated currents [89], [95]; unfortunately this recovery is followed by a quick drop in gain [96], [97]. In addition, all photosensitive materials, and, most probably, their various aging products are good insulators and may excite self-sustained currents when deposited on the cathode [86]. Systematic studies with T M AE and T EA also allowed to establish basic dependencies between the aging behavior and dissociation energy or wire diameter [91]:

• aging rate for T M AE is larger than for T EA (T M AE molecule is more fragile than T EA); • aging rate for T M AE and T EA is inversely proportional to the anode wire diameter; At low rates, the possibility to use gaseous photon detectors on a very large scale at long-term with hydrocarbon/TMAE gases has been demonstrated for large 4π devices (e.g. SLD CRID and DELPHI RICH) [86]. It is worthwhile to mention, that the high reactivity of TMAE with oxygen and other substances necessitates a very high degree of cleanliness and leak-tightness for gas systems in these detectors.

In recent years, there has been considerable work in the field of photon imaging detectors by combining solid photocathodes (CsI) and wire chambers or gaseous electron multipliers. However, several aging tests also revealed degradation of CsI photocathode quantum efficiency for very high rate environments; a collection of existing aging data for these can be found in [86], [91], [92], [98]-[101].

V. Aging Experience with High-Rate detectors of the LHC era.

The most recent developments in high-energy physics require a dramatic increase of the radiation intensity encountered by gaseous detectors: from mC/cm/wire for the ‘standard radiation level’ detectors up to C/cm/wire for the new highrate experiments of the LHC era (HERA-B, LHC). Among the most critical items that affect the lifetime of gaseous detectors (apart from the gas mixtures) are the materials in contact with gas, assembly procedures, gas mixing and distribution systems, and tubing. In section III.A we discuss the outgassing properties of several materials and general rules for assembly of high-rate gaseous detectors and gas systems, while sections III.B-D contain the summary of the recent experience with aging problems in gaseous detectors operated at extremely large particle fluxes.

A. Choice of Materials for Detectors and Gas Systems

The increasingly challenging requirements for building and testing the next generation of large-area gaseous detectors has demanded a concerted effort towards finding adequate materials for detectors and associated gas systems. Many non-metallic ‘good materials’ successfully used in the ‘standard radiation level’ detectors might nevertheless outgas at a small level, thus causing fast aging under high rate conditions. The lifetime studies of Microstrip Gas Chambers (MSGC) in high intensity environments, which also had the greatest impact on the understanding of aging phenomena in all types of gaseous detectors, demonstrate that the amount of pollutants in the gas system play a major role in determining the aging properties of the detector [4]. Consequently, the outgassing from materials, epoxies, joints, tubing, etc. has to be carefully controlled. For obvious reasons, the use of glues, plastics and many organic materials is unavoidable in particle detectors. It is therefore very important to choose materials, which are suitable for the practical mechanical and electrical assembly of a gaseous detectors, in terms of their possible outgassing effects and radiation robustness.

It is suggested to start by searching for low-outgassing materials in a NASA database, which was originally developed for selecting spacecraft materials [51], [102]. It contains more than 1600 entries for adhesives, 500 entries for rubbers and elastomers, 800 entries for potting materials. This list can help to pre-select assembly materials before doing tests matching the specific requirements of each detector.

A large amount of outgassing data for epoxy compounds, adhesive tapes, leak sealers, rigid materials, O-rings, and plastic pipes have been accumulated in the framework of the RD-10 project at CERN, which afterwards was merged with the more specific research on MSGC within the RD-28 project. In the RD-10 tests, an outgassing box, placed upstream of the strongly irradiated wire counter, was used to introduce samples of materials into the gas stream, thus allowing a systematic study of outgassing effects on the chamber lifetime. Furthermore, the gas flowing from the chamber was analyzed with a Gas Chromatograph (GC) and Mass Spectrometer (MS) or Electron Capture Device (ECD). While for some materials only outgassing properties were verified and materials releasing detectable pollutants were rejected, for other ‘radiation hard materials’ full evidence of suitability was obtained in long-term aging tests of a validated clean detector. The long list of candidates recommended to be used in the construction of gaseous detectors can be found in [2]-[4],[103]-[106] and was summarized at the 2001 workshop [51]. The effect of outgassing from materials on the lifetime of gaseous detector can be illustrated by several examples: Araldit AW103 epoxy mixed with HY991 hardener did not induce any detectable gas pollutants in the GC/MS and was also validated by irradiating the wire chamber. It is presently used as a glue for the construction of ATLAS straws [106] and triple-GEM stations of the COMPASS experiment [107]. The GC/MS analysis of another popular epoxy, Araldit106 and HV953 U, extensively used in the assembly of older MWPC’s, revealed traces of heavy hydrocarbon molecules in the effluent gas stream, which could be partially responsible for the observation of aging reported in [17], [60]. In fact, this glue has shown the largest outgassing rate among all tested glues in [106]. Interestingly, outgassing can also be due to an incorrect ratio of hardener to resin or even insufficient curing time; both factors may largely increase the gas contamination [51], [108].

Gas tubes used for the supply of the active gas have always been the object of primary attention when analyzing aging effects in wire chambers. Electro-polished stainless steel and hydrogen-fired copper gas pipes are the best choices for gaseous detectors operated in high-rate environments, since they are free of outgassing and ensure zero gas permeability. However, due to their high price and concerns for the material budget in the active area of the detector, many experiments often use cheaper plastic tubes, although these are susceptible to outgassing, have high gas permeability and can consequently cause severe aging. Particularly, PVC, Teflon and neoprene rubber tubes contain halogen atoms in molecular chains, which are known to increase drastically the aging rate [2], [3]. Polyethylene tube outgasses water, large alcanes and substituted aromatics [67]. One of the classical examples, cited by many authors, shows that the introduction of PVC pipe can initiate a gain reduction, which continues with the same rate even after the PVC tube is replaced with the original stainless steel tubes [20]. This indicates a potentially very serious problem: one can cause permanent damage to a detector by a wrong choice of material even for a limited period of time. Therefore, one should use as much steel as possible for gas supply lines, especially in parts exposed to high radiation doses.

Up to now, there is no strong objection to the use of nylon (polyamide, RILSAN) tubes if they are not too long. However, plastic pipes usually introduce water to the gas due to the natural outgassing and/or due to the diffusion of air humidity through the walls: as much as ∼ 1700 ppm of water can be added to the gas by placing 20 m of nylon pipe at the chamber inlet [51]. Particularly, nylon tubes were used to introduce water indirectly to the chamber for curing Malter breakdown [40]. However, the presence of water can cause ‘bad’ surface chemistry as described above and is therefore extremely dangerous for certain RPC and MSGC detectors.

The general recommendations concerning the choice of assembly materials and rules for the mechanical construction of high-rate detectors, which includes adequate assembly procedures, personnel training, quality checks, final testing as part of fighting against the aging, have been reported at the workshop in [51], [78]. There are clearly many ‘bad’ and a lot of usable materials. However, a specific material is either adequate or not for a particular detector type and operating conditions - one has to do tests matching the specific requirements of the experiment. Finally, no spontaneously-chosen materials should be installed in the detector or gas system in the last minute, before the start of real operation.

B. Micro-pattern Gas Detectors.

Future high-luminosity experiments have prompted a series of inventions of new high-rate gaseous detectors: MSGC, MICROMEGAS, Gas Electron Multipliers (GEM) and many others [109], [110]. The systematic research of the physical parameters used to manufacture and operate MSGC’s, such as substrate and assembly materials, metal for the strips, and type and purity of the gas mixtures play a dominant role in determining their long-term stability [4], [111], [112]. Despite the promising performance of MSGC’s (high-rate capability, good space accuracy, and excellent multi-track resolution), there are several major processes, particularly at high rates, leading to operating instabilities: charge-up of substrates, destructive microdischarges, and surface deposition of polymers [4].

The influence of glass conductivity has been verified for MSGC’s: the use of borosilicate glass as a substrate results in rate-dependent modification of gain due to the radiation induced variation of surface resistivity. Use of electronconducting or diamond-coated glass solves the problems of short and long-term instabilities for detectors made on insulating support [4]. The problem of microdischarges, induced by heavily ionizing particles and destroying the electrode structure, turned out to be a major limitation to all single-stage micro-pattern detectors in hadronic beams [113], [114]. The nature and resistivity of the strip material affects the developments of sparks [115]. Aluminum electrodes are more robust against gas discharges than gold. However, the use of Al electrodes led to the appearance of ‘bubbles’ or ‘craters’ on the cathode strips even at modest collected charges, while no aging effects were observed with strips made from gold [116].

Microstrip chambers have been operated with a large variety of gases; to prevent fast aging at high rates, convincing evidence suggests again to avoid hydrocarbons in the gas [117], [118]. Under optimal laboratory conditions, absence of any degradation of MSGC performance with Ar/DM E has been demonstrated by many groups up to large accumulated charges [4], [112], [118]-[121]. However, MSGC-GEM detectors operated with Ar/DM E shows fast aging under X-rays, if the size of the irradiated area is large enough, while identical chambers with Ar/CO_2 showed no aging [116], [122]. Long-term survival without degradation has been also observed for triple-GEM and MICROMEGAS-GEM detectors, operated with Ar/CO_2 [123], [124]. Unfortunately, Ar/CO_2 mixtures have worse quenching properties and are more prone to discharges than Ar/DM E. Protection against sparking can be significantly improved by adding a small amount (∼ 0.3 %) of H_2O to the MSGC. However, in contrary to wire chambers, such an addition of water led in one case to massive coating on the anode strips both in Ar/DM E and Ar/CO_2 mixtures [4], [116]. These observations underline the importance of careful selection of materials and gas mixtures for high-rate applications and of treating micro-pattern detectors as delicate devices during production and running phases.

C. Choice of Gas Mixtures.

Future high energy and luminosity experiments pose a new challenge for gas mixtures, raising the requirement for their radiation hardness up to ∼ 1^C_{cm wire} per year. Under these constraints only a limited choice of gases is available, and from the ‘conventional mixtures’ only Ar(Xe)/CO_2 is demonstrated to tolerate such doses. Unfortunately, these mixtures are quite transparent for photons and have a low electron drift velocity, which limits their possible application for high-rate detectors and large drift distances.

About twenty years ago, CF_4 was proposed as the most attractive candidate for high-rate environments [125]-[127]. This is primarily due to the high-drift velocity, high primary ionization, low electron diffusion and resistance to aging [13], [128], [129]. Within the broad spectrum of gas mixtures, there is no gas mixture without CF_4 that is able to tolerate doses ∼ 10^C_{cm wire} . It is believed that, when CF_4 dissociates in the gaseous discharges into highly reactive CF_x and F radicals, the atomic fluorine is very effective in suppressing polymerization effects. However, Ar(Xe)/CF_4 mixtures have rather poor energy and spatial resolution due to the dissociative electron attachment processes in CF_4 [130]- [132]. Moreover, the CF_4 molecule has a small quenching cross-sections of metastable Ar-states [133] and excited CF_4 molecules emit photons from the far UV to the visible [134]. This results in an intolerable level of afterpulsing in Ar/CF_4 gases even at moderate gas gains. The advantage of the enhanced drift velocity of CF_4 for high-rate applications have been realized by the addition of one of the common quenchers (e.g. CO_2, CH_4) to CF_4 or to Ar/CF_4. This can also ‘cool’ electrons to the extent that attachment does not occur.

D. Lessons learned from detector operation at high ionization densities.

Accelerated aging tests, often carried out with radioactive sources or X-rays to emulate the long-term lifetime properties of the detector, can be extrapolated to the real experimental conditions directly only if the aging rate depends on the total collected charge and not upon the current density, particle rate, or gas gain at which the dose was accumulated. In reality, many laboratory studies have demonstrated severe gain losses at lower charge accumulation rates, other conditions being held constant [4], [7], [20], [42], [48], [50]. The lower polymerization rate for higher current densities is attributed to the onset of space charge effects, which reduce the electron energies in the avalanche, thus decreasing the density of ions and radicals in the avalanche plasma.

The new generation of high-rate detectors of the LHC era has not only to cope with high dose rates, but also has to survive in a hostile presence of heavily ionizing particles with an average energy deposition 10-1000 times larger than for MIP’s. An exposure of ‘large-scale’ gaseous detectors over the full area in such a harsh radiation environment at high ionization densities (> 100 nA/cm) can result in greatly enhanced polymer formation: an abundance of aggresive radicals will diffuse for rather long times (∼ hours) within the irradiated chamber and will react with other avalanche-produced polymer fragments. According to this naive picture, this mechanism could significantly accelerate polymerization in large systems, whereas in small-scale laboratory tests the aging rate typically decreases with increasing gas flow [3], [7], [8], [25]. Furthermore, polymer deposition in wire chambers likely starts from localized spots and then can spread over the entire irradiated region. Since in large, mass-produced systems an extremely high quality for electrode surfaces and cleanliness of the gas systems are hard to reach, any imperfections – in the presence of high currents – could easily trigger sparks, discharges or Malter currents, which will in turn dramatically increase the polymerization rate.

Recent systematic research clearly demonstrates that the initial stage of radiation tests usually performed in the laboratory may not offer the full information needed to estimate the lifetime of the real detector. Strong dependence of aging performance upon size of the irradiated area, current density, high voltage (gas gain), irradiation rate, particle type and energy have been observed in high-rate environments.

Severe anode and cathode aging effects were found in prototype honeycomb drift tubes operated with CF_4/CH_4 (80:20) and Ar/CF_4/CH_4 (74:20:6) mixtures in the high-rate HERA-B environment (secondaries from interactions of 920 GeV proton with target nucleus) after a few mC/cm of accumulated charge [16], [17], [135], [136], [137]. This effect was surprising since chambers had previously been proven to be immune to very large X-ray doses up to 5 C/cm. An extensive R&D program, carried out at 10 different radiation facilities to resemble HERA-B conditions, revealed that Xrays or electrons were not able to trigger Malter currents, while in the large-area modules, irradiated with hadrons above a certain energy, Malter effect appeared very rapidly. The aging effects in these honeycomb drift tubes were traced to a combination of several problems; a solution which uses gold-coated cathode foils and a Ar/CF_4/CO_2 (65:30:5) mixture was found to survive in a high-rate hadronic environment up to ∼ 1^C_{cm wire} [17].

The aging performance of the HERA-B muon proportional chambers has been studied with Ar/CF_4/CH_4, CF_4/CH_4, and Ar/CF_4/CO_2 mixtures in a variety of conditions [138]-[141]. The aging rate in Ar/CF_4/CH_4 was found to be more than two orders of magnitude higher in hadronic beams than in the laboratory studies with radioactive sources. In addition, strong dependences of the aging properties on high voltage and progressive deterioration of the gas gain in the direction of the serial gas flow have been observed for large-scale prototypes irradiated with Ar/CF_4/CH_4 (67:30:3) in the harsh HERA-B environment. Aging effects increasing in the direction of the serial gas flow (even outside the irradiation zone) have been also reported for a Ar/CO_2/C_2H_2F_4 mixture [142]. A strong dependence of the aging properties on high voltage, irradiation rate, length of irradiation and gas flow rate has been also observed in the ATLAS muon drift tubes operated with Ar/CH_4/N_2/CO_2 (94:3:2:1) [24], [25], [60], [61]. Here, the systematic R&D studies have shown a nearly exponential dependence of chamber lifetime on high voltage and on the counting rate within the experimentally investigated parameter range. Unfortunately, the high voltage is not the physical quantity directly responsible for aging in wire chambers, therefore, these aging effects could be classified as depending on the gas gain and/or current density, which are related to the density of ions and radicals in the avalanche plasma.

Dependence of polymer formation on the energy input is well established in plasma polymerization. Nearly all organic compounds regardless of their chemical nature can be polymerized under certain conditions. The structure of plasma polymers formed from the same monomer is highly dependent on the actual conditions of polymerization: the energy input level, the size (cross-sectional area) of a tube and even on the position within the reactor [26]. The experimental dependence of chamber lifetime on ionization density, gas gain and irradiation rate, which are also related to the total dissipated energy in the detector from ionizing particles, indicates that the aging behavior can not be solely explained on the basis of the molecule ratios in the mixture (gas composition), without taking into account the actual operating conditions. These results illustrate the need for studying the aging performance of a detector under conditions as close as possible to the real environment.

The dependence of the detector lifetime on the size of the irradiated area, in particular, and the increase of the aging rate in the direction of the serial gas flow means that aging should be viewed as a non-local and intensity-dependent phenomenon. These observations seem to be the most critical when trying to extrapolate the aging behavior from laboratory tests to large-scale detectors. Some of the long-lived aggressive radicals may diffuse in the direction of the gas flow and react with other avalanche generated contaminants, thus enhancing aging effects with increasing usage of the gas. Here it is important to note that due to the increased aging in the direction of the gas flow it is worthwhile to avoid gas distribution systems that supply many chambers by a serial flow.

Fig. 1 Various manifestations of damage to the gold-plating of wires: a) amorphous W O deposits [147]; b) long piece of gold peeled away from the wire surface [148].

As reported above, polymer deposition can occur in CF_4/CH_4 mixtures, as suggested by plasma chemistry. Similarly, the aging properties of Ar(Xe)/CF_4/CO_2 gases, which by analogy with plasma experiments should have excellent etching properties, have been widely investigated over the last years. Using Ar/CF_4/CO_2 mixtures under optimal operating conditions, no observable drop in gain due to polymerization has been found for the HERA-B honeycomb drift tubes up to 1.5 C/cm [17], HERA-B aluminum proportional chambers up to 0.7 C/cm [138], CMS cathode strip chambers up to 0.4 C/cm [143], 13 C/cm [63], LHCb multi-wire proportional chambers up to 0.25 C/cm [144], COMPASS straw tubes up to 1.1 C/cm [145] and HERMES drift tubes up to 9 C/cm [146]. Moreover, honeycomb drift tubes which were initially aged with Ar/CF_4/CH_4 were afterwards successfully recovered in Ar/CF_4/CO_2 [17]. However, an analysis of the cathode surfaces at the end of operation with Ar/CF_4/CO_2 revealed in some cases the presence of fluorine-based deposits on the cathodes, which fortunately did not result in self-sustained currents [63], [138], [143]. Since dissociative products of CF_4 react violently with many materials and the resultant polymer films at cathodes could provoke aging effects one should seriously consider using materials in high-rate detectors which are very robust to CF_4; gold-plated electrodes [17] or straw cathode materials [147] fulfill this requirement.

A further advantage of CF_4-based mixtures is additional resistance against Si-polymerization. This suggestion is based on experiences from plasma polymerization, where discharges of CF_4/H_2 are successfully used for SiO_2 etching, while CF_4/O_2 plasmas selectively etches Si [29]. Extensive studies performed for the ATLAS straws partially confirm this hypothesis: Si-deposits have not been observed in irradiation area for large current densities (> 1 μA/cm). On the other hand, SiO/SiO_2-deposits were found at the edges and even outside of the irradiated area. The resulting balance between Si polymerization and CF_4 etching processes was found to be very sensitive to the Si-source intensity and ionization density [147].

In the most recent investigations at extremely high current densities (∼ 1 − 5μA/cm) in Ar(Xe)/CF_4/CO_2 mixtures a new ‘aging phenomenon’ has appeared - the damage of the gold-plating of wires in straws and honeycomb drift tubes. Several years of intensive research at CERN with straw tubes under different conditions and for different types of wires indicate that the main components responsible for gold wire damage in Xe/CF_4/CO_2 (70:20:10) are harmful radicals, products of CF_4 disintegration, in connection with H_2O. (It was suggested that HF acid could be responsible for destruction of gold-plating and formation of W O deposits). No wire damage effects have been observed for water concentrations below 0.1 % up to 20 C/cm ! [147]. Dedicated studies with straw tubes performed at PNPI with Xe/CF_4/CO_2 (70:20:10) and Ar/CF_4/CO_2 (60:30:10) mixtures demonstrated that under high dose rates the goldplating of the wire was cracked, the wire diameter increased and a large amount of oxygen was observed on the tungsten in gold cracks [148]-[150]. Similar effects have been observed for wires irradiated in a Ar/CO_2/C_2H_2F_4 mixture [142]. The authors propose a model to explain the results - an anode wire ‘swelling’ mechanism, where the forces causing the damage to the wire surface develop under the gold layer of the wire [149]. Fig. 1 shows examples of a variety of wires with damaged gold-plating from [147], [148]. In contrary to the experience with straws, in one test with honeycomb drift tubes irradiated with Ar/CF_4/CO_2 (65:30:5) the destruction of gold coating and even rupture of anode wires have been observed only for water concentration below 50 ppm, while for H_2O > 400 ppm, gold wire damage effects were avoided [151], [152]. Further studies still remain to be done to fully understand the exact mechanism of gold wire damage during operation at high ionization densities. Although no F -based deposits were observed on the anode wires in any of the tests, the chemically reactive dissociative products of CF_4 most probably initiate the destruction processes of gold-plating.

Studies of straw proportional tubes with Xe/CF_4/CO_2 mixture revealed another phenomenon, which might degrade detector performance in high rate experiments. The gas composition was found to be modified in the avalanche plasma of a strongly irradiated straw, presumably due to the production of some long-lived and highly electro-negative species [153]. These electro-negative radicals could be also responsible for the so-called ‘transient aging effect’ observed at high-rates in Xe/CF_4/CO_2 [154], Ar/CF_4/CO_2 [151] and Ar/CF_4/CH_4 [138]. A ‘transient aging effect’ is a temporary gain reduction, which can be restored by an appropriate increase of the gas flow. The very high aggressiveness of dissociative products of CF_4 and the dynamic modification of the gas composition requires more detailed studies to evaluate the possible consequence of these effects on the long-term performance and stability of large-area gaseous detectors. In view of the aging results described here, one can see that the presence of large amounts of CF_4 in the mixture does not necessarily ensure good aging properties automatically.

The challenge to avoid aging in the new generation of high-rate experiments requires not only a very careful choice of all detector materials, but also forces the gas systems to be of previously unnecessary quality and cleanliness. However, a real system will always contain some degree of imperfection and pollution – despite all precautions. It has to be stressed here that in closed-loop recirculation systems, which are required for detectors operated with expensive gases (Xe, CF_4) all impurities and reactive radical fragments will remain in the gas until they are removed by a purification system or deposited elsewhere. Therefore, for the construction of large-area gaseous detectors the maximal cleanliness for all processes and quality checks for all system parts are of primary importance. Examples of ‘clean’ gas systems currently used for high-rate detectors are presented in [155], [156]. Certainly, the definition of the word ‘clean’ has changed considerably since the 1986 workshop.

VI. Summary

Aging phenomena obviously constitute one of the most complex and serious problems which could limit the use of gaseous detectors in unprecedently severe radiation environments. The operation in high-intensity experiments of the LHC era demand not only an extraordinary radiation hardness of construction materials and gas mixtures, but also appropriate assembly procedures and quality checks during detector construction and testing. Since the 1986 workshop, considerable progress has been made on the understanding of general principles which might help to prevent or at least to suppress the aging rate to an acceptable level. However, a quantitative description of the aging processes, which would require a detailed knowledge of the reaction cross sections of all chemical species in the avalanche plasma, is still not available.

After the many years of intensive research and development of radiation-hard gaseous detectors, an impressive variety of experimental data has been accumulated. The radiation hardness and outgassing properties of the various materials used for the construction of detectors and gas systems are among the most crucial items affecting the lifetime of gaseous detector. However, the observed dependences of aging performance on the nature and purity of the gas mixture, different additives and trace contaminants, construction materials, gas flow, size of the irradiated area, irradiation intensity, ionization density, high voltage, particle type and energy, make quantitative comparisons of aging properties under very different conditions very difficult. Consequently, this data can serve only as a guideline before the start of long-term studies under conditions as close as possible to the real environment of the experiment. Such radiation tests should include an extended study of ‘large-scale’ final prototype chambers, exposed over the full area to a realistic radiation profile (particle type and energy, ionization density, irradiation rate). It is of primary importance to vary the operating parameters systematically in order to investigate their possible influence on the aging performance. In order to exclude statistical fluctuations of unknown nature and to provide a reliable estimate for the detector lifetime, the radiation tests should be carried out with several detectors irradiated under identical conditions.

This paper is based on the results reported at the DESY workshop, and also briefly discusses other experience with gaseous detectors relevant to the present aging problems. Transparencies and videos of presentations from the ‘International Workshop on Aging Phenomena in Gaseous Detectors’ (DESY, Hamburg) are available at the workshop’s web-page (http://www.desy.de/agingworkshop). The proceedings of the workshop will be published in a special volume of Nuclear Instruments and Methods: Section A.

VII. Acknowledgment

We are especially grateful to Andreas Schwarz (DESY), Jaroslav Va’vra (SLAC) and Mar Capeans (CERN) for many helpful discussions and careful reading of this manuscript.

References

[1] G. Charpak, H. Fisher, C. Gruhn, A. Minten, F. Sauli, G. Plch, G. Flugge, “Time degeneracy of multiwire proportional chambers,” Nucl.

Instr. Meth., vol. A99, pp. 279-284, 1972.

[2] J. Va’vra, “Review of wire chamber aging,” Nucl. Instr. Meth., vol. A252, pp. 547-563, 1986. [3] J. A. Kadyk, “Wire chamber aging,” Nucl. Instr. Meth., vol. A300, pp. 436-479, 1991.

[4] R. Bouclier, M. Capeans, C. Garabatos, G. Manzin, G. Million, L. Ropelewski, et al., “Aging of microstrip gas chambers: problems and solutions,” Nucl. Instr. Meth., vol. A381, pp. 289-319, 1996.

[5] Proceedings of the International Workshop on Aging Phenomena in Gaseous Detectors, to be published in Nucl. Instr. Meth. A [6] V. Blinov, “Influence of materials and sense wire surface quality on aging with DME and other gases” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[7] R. Henderson, R. Openshaw, W. Faszer, M. Salomon, G. Sheffer, “Wire chamber ageing with CF_4 /isobutane and argon/ethane mixtures,” IEEE Trans. Nucl. Sci., vol. 35(1), pp. 477-482, 1988.

[8] R. Openshaw, R. Henderson, W. Faszer, D. Murphy, M. Salomon, G.Sheffer, “Tests of wire chamber ageing with CF_4 /isobutane (80:20), Ar/C_2H_6 (50:50) and Ar/C_2H_6/CF_4 (48:48:4)” IEEE Trans. Nucl. Sci., vol. 36(1), pp. 567-571, 1989.

[9] J. Kadyk, J. Wise, D. Hess, M. Williams, “Anode wire aging tests with selected gases” IEEE Trans. Nucl. Sci., vol. 37(2), pp. 478-486, 1990.

[10] R. Openshaw, R. Henderson, W. Faszer, M. Salomon “Etching of anode wire deposits with CF_4 /isobutane (80:20) avalanches,” Nucl.

Instr. Meth., vol. A419, pp. 351-356, 1991.

[11] J. Wise, J. Kadyk, D. Hess, “Chemical model for wire chamber aging in CF_4 /iC_4H_{10} ,” J. Appl. Phys., vol. 74(9), pp.5327-5340, 1993. [12] J. Wise, “Chemistry of radiation damage to wire chambers,” Dissertation, University of California, Berkeley, LBL-32500, 1992. [13] J. Va’vra, P. Coyle, J. Kadyk, J. Wise, “Measurements of electron drift parameters for helium and CF_4 -bases gases,” Nucl. Instr. Meth., vol. A324, pp. 113-126, 1993.

[14] L. Malter, “Thin film field emission,” Phys. Rev., vol. 50, pp. 48-58, 1936.

[15] J. Va’vra, “Physics and Chemistry of Aging - Early developments” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[16] G. Bohm, “Observations on cathode aging in honeycomb drift tubes,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[17] C. Padilla, “Aging studies for the large honeycomb drift tube system of the outer tracker of HERA-B,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[18] A. Boyarski, “Laboratory aging tests for the BABAR drift chamber,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[19] B. Foster, “Whisker growth in test cells,” Proceedings of Workshop on Radiation Damage to Wire Chambers, LBL-21170, pp. 227-229, 1986.

[20] R. Kotthaus, “A laboratory study of radiation damage to drift chambers,” Proceedings of Workshop on Radiation Damage to Wire Chambers, LBL-21170, pp. 161-193, 1986.

[21] H. Sadrozinski, “Investigation of breakdown conditions of drift chambers,” Proceedings of Workshop on Radiation Damage to Wire Chambers, LBL-21170, pp. 121-129, 1986.

[22] J. Va’vra, “Can TMAE photocathode be used for high rate applications?” Nucl. Instr. Meth., vol. A367, pp. 353-357, 1995. [23] K. Abe, P. Antilogus, D. Aston, K. Baird, A. Bean, R. Ben-David, et al., “Performance of the CRID at SLD,” Nucl. Instr. Meth., vol.

A343, pp. 74-86, 1994.

[24] V. Pashhoff, “Studies on ageing and reanimation of drift tubes for the ATLAS muon spectrometer,” Dissertation, University Freiburg, 1999.

[25] S. Kircher, M.Kollefrath, G. Herten, W. Mohr, “Parameters of MDT ageing and reanimation,” ATLAS note, ATLAS-MUON-012 (2001).

[26] H. Yasuda, “Plasma Polymerization,” Academic Press, 1985. [27] H. V. Boenig, “Plasma Science and Technology,” Cornell University Press, 1982.

[28] H. Yasuda “New insights into aging phenomena from plasma chemistry,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[29] M.J. Kushner, “A kinetic study of the plasma-etching processes. A model for the etching of Si and SiO_2 in C_nF_m /H_2 and C_nF_m /O_2 plasmas,” J. Appl. Phys., vol. 53(4), pp. 2923-2938, 1982.

[30] C.J. Mogab, A.C. Adams, D.L. Flamm, “Plasma etching of Si and SiO_2 - the effect of oxygen additions to CF_4 plasmas,” J. Appl.

Phys., vol. 49(7), pp. 3796-3803, 1978.

[31] H.F. Winters, J.W. Coburn, E. Kay, “Plasma etching - A ’pseudo-black-box’ approach,” J. Appl. Phys., vol. 48(12), pp. 4973-4983, 1977.

[32] J.C. Martz, D.W. Hess, W.E. Anderson, “Tantalum etching in fluorocarbon/oxygen rf glow discharges,” J. Appl. Phys., vol. 67(8), pp.

3609-3617, 1990.

[33] E.A. Truesdale, G. Smolinsky, T.M. Mayer, “The effect of added acetylene on the rf discharge chemistry of C_2 F_6. A mechanistic model for fluorocarbon plasmas,” J. Appl. Phys., vol. 51(5), pp. 2909-2913, 1980.

[34] E.A. Truesdale, G. Smolinsky, “The effect of added hydrogen on the rf discharge chemistry of CF_4 , CF_3 H, and C_2F_6 ,” J. Appl. Phys., vol. 50(11), pp. 6594-6599, 1979.

[35] S. Motlagh, J.H. Moore “Cross sections for radicals from electron impact on methane and fluoroalkanes,” J. Chem. Phys., vol. 109(2), pp. 432-438, 1998.

[36] T. Arikado, Y. Horiike, “Si and SiO_2 etching under low self-bias voltage,” Jap. J. Appl. Phys., vol. 22(5), pp. 799-802, 1983. [37] H.F. Winters, “The role of chemisorption in plasma etching,” J. Appl. Phys., vol. 49(10), pp. 5165-5170, 1978. [38] M. Kollefrath, V. Paschhoff, M. Spegel, U. Topp, C. Fabjan, G. Herten, et al., “Aging studies for the ATLAS-monitored drift tubes,” Nucl. Instr. Meth., vol. A419, pp. 351-356, 1998.

[39] J.P. DeWulf, D. Geiregat, P. Vilain, F. Bergsma, C. Busi, A. Capone, et al., “Test results of the streamer-tube system of the charm II neutrino detector,” Nucl. Instr. Meth., vol. A252, pp. 443-449, 1986.

[40] J. Kadyk, J. Va’vra, J. Wise, “Use of straw tubes in high-radiation environments,” Nucl. Instr. Meth., vol. A300, pp. 511-517, 1998. [41] J.P. Venuti, G.B. Chadwick, “Radiation aging studies of CO_2 /hydrocarbon mixtures for the SLD drift chamber,” IEEE Trans. Nucl.

Sci., vol. 36(1), pp. 595-599, 1989.

[42] A. Algeri, H.G. Fischer, S.O. Holmgren, M. Szeptycka “Anode wire ageing in proportional counters: the problem of analog response,” Nucl. Instr. Meth., vol. A338, pp. 348-367, 1994.

[43] M. Danilov, N. Nagovitsin, V. Shibaev, I. Tichomirov, E. Michel, W. Schmidt-Parzefall, “Study of drift chamber aging with propane,” DESY note-88-090 (1988).

[44] J. Va’vra, “Aging of gaseous detectors,” SLC-PUB-5207, 1990.

[45] A. Smith, M.J.L. Turner, “Lifetime of proportional counters filled with xenon/methane and argon/methane,” Nucl. Instr. Meth., vol.

A192, pp. 475-481, 1982.

[46] H. Sipila, M.L. Jarvinen, “Extended lifetime of a wire chamber,” Nucl. Instr. Meth., vol. A217, pp. 298-300, 1983. [47] K. Kwong, J.C. Layter, C.S. Lindsey, S.O. Melnikoff, B.C. Shen, G.J. Vandalen, M.C. Williams, “Hydrocarbon polymerization on drift chamber wires,” Nucl. Instr. Meth., vol. A238, pp. 265-272, 1985.

[48] I. Juricic, J. Kadyk, “Anode wire aging measurements and a search for remedies,” IEEE Trans. Nucl. Sci., vol. 34(1), pp.481-485, 1987. [49] K. Silander, E.P. de Lima, M.M. Fraga, R.F. Marcus, F. Fraga, M. Salete Leite, A.J.P.L. Policarpo, “Aging studies with argon/methane based gas mixtures,” Nucl. Instr. Meth., vol. A367, pp. 298-301, 1995.

[50] R. Bouclier, M.Capeans, C. Garabatos, R.D. Heuer, M. Jeanrenaud, T.C. Meyer, F. Sauli, K. Silander, “Results of wire chamber aging tests with CH_4 - and DME-based gas mixtures,” Nucl. Instr. Meth., vol. A346, pp. 114-119, 1994.

[51] M. Capeans, “Aging and Materials: Lessons for Detectors and Gas Systems” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[52] M. Atac, “Wire chamber aging,” Proceedings of Workshop on Radiation Damage to Wire Chambers, LBL-21170, pp. 55-66, 1986. [53] S. Beingessner, T. Meyer, V. Vuillemin, M. Yvert, “The UA1 central detector at present and future luminosity,” Nucl. Instr. Meth., vol.

A257, pp. 552-555, 1987.

[54] R. Henderson, “Effects of materials on aging rates in wire chambers operated with DME,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[55] M. Jibaly, S. Majewski, P. Chrusch, R. Wojcik, F. Sauli, J. Gaudaen, “The aging of wire chambers filled with dimethyl ether: wire and construction materials and freon impurities,” Nucl. Instr. Meth., vol. A283, pp. 692-701, 1989.

[56] A. Dwurazny, Z. Hajduk, M. Turala, “Ageing effects in gaseous detectors and search for remedies,” Proceedings of Workshop on Radiation Damage to Wire Chambers, LBL-21170, pp. 113-120, 1986.

[57] E. Conti, F. Gasparini, “Test of the wire ageing induced by radiation for CMS barrel muon chambers,” Nucl. Instr. Meth., vol. A465, pp. 472-481, 2001.

[58] V. Bondarenko, V. Grigoriev, S. Zverev, A. Kruglov, I. Markina, V. Peskov, et al., “Radiation hardness studies of straw proportional tubes,” CERN-PPE/91-191 (1991).

[59] V. Bawdekar, “Carbon dioxide quench action in a beryllium proportional counter,” IEEE Trans. Nucl. Sci., vol. 22(1), pp. 282-285, 1975.

[60] M. Kollefrath, “Aging tests for the ATLAS muon drift tubes” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[61] V. Paschhoff, M. Spegel, “Aging effects studies for the ATLAS MDT’s using Ar/CO_2 (90:10),” ATLAS note, ATLAS-MUON-019 (1999).

[62] J. Adam, C. Baird, D. Cockerill, P.K. Frandsen, H.J. Hilke, H. Hofmann, et al., “A study of aging effects in wire chambers,” Nucl. Instr.

Meth., vol. A217, pp. 291-297, 1983.

[63] G. Gavrilov, “Aging studies of CMS muon chambers prototypes under high doses” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001; and preprint PNPI-2442 (2001).

[64] A.R. Faruqi, H. Road, “Rapid data collection systems for time resolved X-ray scattering experiments,” IEEE Trans. Nucl. Sci., vol.

27(1), pp. 644-648, 1980.

[65] T. Kowalski, “A study of aging effect in gas monitoring proportional counters of the BAC calorimeter of the ZEUS experiment,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[66] D. Hess “Plasma chemistry in wire coating,” Proceedings of Workshop on Radiation Damage to Wire Chambers, LBL-21170, pp. 15-23, 1986.

[67] J. Wise, J. Kadyk, D. Hess, M. Williams, “Study of plasma chemistry in wire chambers by GC/MS,” IEEE Trans. Nucl. Sci., vol.

37(2), pp.470-477, 1990.

[68] J. Va’vra, “Wire chamber gases,” Nucl. Instr. Meth., vol. A323, pp. 34-47, 1992.

[69] K. Kurvinen, “Analysis of organic compounds formed in electron avalanches in a proportional counter filled with ar/C_2H_4 mixture,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[70] T.J. Sumner, G.K. Rochester, P.D. Smith, J.P. Cooch, R.K. Sood, “Scintillating drift chambers - the nature of the emission process in Ar/CH_4 ,” IEEE Trans. Nucl. Sci., vol. 29(5), pp. 1410-1414, 1982.

[71] M.M. Fraga, E.P. Lima, M.A. Alves, J. Escada, R.F. Marques, M.S. Leite, A. Policarpo, “Fragments and radicals in gaseous detectors,” Nucl. Instr. Meth., vol. A323, pp. 284-288, 1992.

[72] A.V. Zarubin, “Properties of wire chamber gases,” Nucl. Instr. Meth., vol. A283, pp. 409-422, 1989. [73] B. Betev, “Experience with the L3 vertex drift chamber at LEP,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[74] C. Niebuhr, “Aging effects in Central Jet Chamber of H1,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[75] D. Bailey, “Experience with the ZEUS Central Tracking Detector,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[76] M. Binkley, “Experience with the Central Tracking Chambers of CDF,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[77] T. Marshall, “Restoring contaminated wires, removing gas contaminants and aging studies of drift tube chambers,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[78] B. Schmidt, “Recommendationd for building and testing the next generation of gaseous detectors,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[79] D. Marlow, “Recent experiences with aging in RPC’s,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[80] D. Piccolo “Aging effects in the RPC’s of the BaBar experiment,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[81] G. Carlino “Aging studies with L3 RPC’s at LEP,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[82] G. Aielli “Further advances in aging studies of RPC’s,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[83] G. Pugliese, “Aging studies for the RPC’s of the CMS Muon Trigger Detector,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[84] G. Passaleva, “First results of an aging test of a prototype RPC for the LHCb muon system,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[85] J. Seguinot, T. Ypsilantis, “A historical survey of Ring Imaging Cherenkov counters,” Nucl. Instr. Meth., vol. A343, pp. 1-29, 1994. [86] J. Va’vra, “Photon detectors,” Nucl. Instr. Meth., vol. A371, pp. 33-56, 1996.

[87] C.L. Woody, “Aging effects in low pressure wire chambers containing T M AE,” IEEE Trans. Nucl. Sci., vol. 35(1), pp. 493-497, 1988. [88] J. Va’vra, “Wire aging of hydrocarbon gases with TMAE additions,” IEEE Trans. Nucl. Sci., vol. 34(1), pp. 486-490, 1987. [89] J. Va’vra, “Wire aging with the TEA photocathode,” Nucl. Instr. Meth., vol. A387, pp. 183-185, 1997. [90] J. Va’vra, J. Kadyk, J. Wise, P. Coyle, “Study of photosensitive mixtures of TMAE and helium, hydrocarbon of CF_4 -based carrier gases,” Nucl. Instr. Meth., vol. A370, pp. 352-366, 1996.

[91] J. Va’vra, “Photon detectors with gas amlification,” Nucl. Instr. Meth., vol. A387, pp. 137-145, 1995. [92] P. Krizan, S. Korpar, M. Staric, A. Stanovnik, M. Cindro, R. Pestotnik, et al., “Photon detectors for HERA-B RICH,” Nucl. Instr.

Meth., vol. A387, pp. 146-149, 1995.

[93] J. Pyrlik, M. Atiya, D. Broemmelsiek, Th. Hamacher, M. Ispiryan, S. Korpar, et al., “Aging measurements of TMAE based photon detector for the HERA-B RICH,” Nucl. Instr. Meth., vol. A414, pp. 170-181, 1998.

[94] K. Lau, “Test-beam aging studies of a TMAE prototype for the HERA-B RICH,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[95] J. Va’vra, T. Bienz, F. Bird, M. Gaillard, G. Hallewell, Y. Kwon, et al., “Construction and initial operation of a proportional wire detector for use in a cherenkov ring imaging system,” IEEE Trans. Nucl. Sci., vol. 35(1), pp. 487-492, 1988.

[96] S. Korpar, P. Krizan, A. Stanovnik, M. Staric, D. Skrk, “Aging and rejuvenation of a T M AE+methane multiwire photon detector,” IEEE Trans. Nucl. Sci., vol. 46(3), pp. 317-320, 1999.

[97] D. Skrk, “Study of in-situ heating of aged anode wires,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[98] A. Breskin, “CsI photocathodes: history and mystery,” Nucl. Instr. Meth., vol. A371, pp. 116-136, 1996. [99] J. Va’vra, A. Breskin, A. Buzulutskov, R. Chechik, E. Shefer “Study of CsI photocathodes: volume resistivity and ageing,” Nucl. Instr.

Meth., vol. A387, pp. 154-162, 1995.

[100] V. Peskov “Aging in gaseous photodetectors,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct.

2-5, 2001.

[101] A. Di Mauro, “Aging of large area CsI photocathodes for the ALICE HMPID prototypes,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[102] http://epims.gsfc.nasa.gov/og/index.cgi [103] R. Bouclier, M.Capeans, C. Garabatos, F. Sauli, K. Silander, “Effects of outgassing from some materials on gas chamber aging,” Nucl.

Instr. Meth., vol. A350, pp. 464-469, 1994.

[104] R. Bouclier, M. Capeans, C. Garabatos, G. Manzin, G. Million, L. Ropelewski, F. Sauli, et al., “Aging studies with microstrip gas chambers,” Nucl. Phys. B., vol. 44, pp. 557-566, 1995.

[105] A. Romaniouk, “Choice of materials for the construction of the TRT,” ATLAS-INDET/98-211 (1998). [106] F. Guarino, S. Ilie, A. Romaniouk, S. Soutchkov, G. Tardelli “Outgassing studies of materials for the TRT construction,” ATLAS- INDET/99-011 (1999).

[107] B. Ketzer, S. Bachmann, M. Deutel, J. Friedrich, S. Kappler, I. Konorov, et al., “GEM Detectors for COMPASS,” IEEE Trans. Nucl.

Sci., vol. 48(4), pp. 1065-1069, 2001.

[108] F. Sauli, “Review of workhop results on the fundamental understanding of aging processes,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[109] “Proceedings of the International Workshop on Micropattern Detectors,” Orsay, France (1999). [110] “Proceedings of the PSD99 - 5th International Conference on Position Sensitive Detectors,” London, England (1999). [111] A. Barr, S. Bachmann, B. Boimska, R. Bouclier, A. Braem, C. Camps, et al., “Construction, test and operation in a high intensity beam of a small system of micro-strip gas chambers,” Nucl. Instr. Meth., vol. A403, pp. 31-56, 1998.

[112] F. Sauli, A. Sharma, “Micro-Pattern Gaseous Detectors,” CERN-EP/99-69 (1999).

[113] Y. Bagaturia, O. Baruth, H. Dreis, F. Eisele,I. Gorbunov, W. Gradl, et al., “Studies of aging and HV breakdown problems during development and operation of MSGC and GEM detectors for the Inner Tracking System of HERA-B,” submitted for publication to Nucl. Instr. Meth., [114] A. Bressan, M. Hoch, P. Pagano, L. Ropelewski, F. Sauli, S. Biagi, et al., “High rate behavior and discharge limits in micro-pattern detectors,” Nucl. Instr. Meth., vol. A424, pp. 321-342, 1998.

[115] B. Schmidt, “Microstrip gas chambers: Recent developments, radiation damage and long-term behavior,” Nucl. Instr. Meth., vol.

A419, pp. 230-238, 1998.

[116] M. Hildebrandt, “Aging studies for the Inner Tracker of HERA-B,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[117] R. Bouclier, J. Florent, J. Gaudaen, G. Million, A. Pasta, F. Sauli, et al., “High flux operation of microstrip gas chambers on glass and plastic supports,” Nucl. Instr. Meth., vol. A323, pp. 240-246, 1992.

[118] L. Alunni, R. Bouclier, G. Fara, C. Garabatos, G. Manzin, G. Million, et al., “Performance of MSGC on electronically and ionically conductive substrata in various operational conditions,” Nucl. Instr. Meth., vol. A348, pp. 344-350, 1994.

[119] R. Bouclier, M. Capeans, C. Garabatos, G. Manzin, G. Million, L. Ropelewski, et al., “Development of micro-strip gas chambers for high-rate operation,” Nucl. Instr. Meth., vol. A367, pp. 168-172, 1995.

[120] E. Daubie, “Aging tests of MSGC detectors,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct.

2-5, 2001.

[121] J. Miyamoto, J. Shipsey, “An aging study of semiconductive microstrip gas chambers and a gas electron multiplier,” Nucl. Instr. Meth., vol. A367, pp. 168-172, 1995.

[122] T. Hott, “Aging problems of the Inner Tracker of HERA-B: An example for new detectors and new effects,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[123] S. Kappler, “Aging measurements with the gas electron multiplier (GEM),” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[124] J. Miyamoto, “Aging Study of a MICROMEGAS with GEM preamplification,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[125] L. Christophorou, D. McCorkle, D. Maxey, J. Carter, “Fast gas mixtures for gas-filled particle detectors,” Nucl. Instr. Meth., vol.

A163, pp. 141-149, 1979.

[126] L. Christophorou, P. Datskos, J. Carter, “Gases of possible interest to SSC muon detectors,” Nucl. Instr. Meth., vol. A309, pp. 160-168, 1991.

[127] L. Christophorou, J. Olthoff, M. Rao, “Electron interactions with CF_4 ,” J. Phys. Chem. Ref. Data, vol. 25(5), pp. 1341-1387, 1996. [128] B. Schmidt, S. Polenz, “Electron motion in counting gases - new answers and new questions,” Nucl. Instr. Meth., vol. A273, pp.

488-493, 1988.

[129] J. Fischer, A. Hrisoho, V. Radeka, P. Rehak, “Proportional chambers for very high counting rates based on gas mixtures of CF_4 with hydrocarbons,” Nucl. Instr. Meth., vol. A238, pp. 249-264, 1985.

[130] P.G. Datskos, J.G. Carter, L.G. Christophorou, “Ionization coefficients in selected gas mixtures of interest for particle detectors,” J.

Appl. Phys., vol. 71(1), pp. 15-21, 1978.

[131] W.S. Anderson, J.C. Armitage, E. Dunn, J.G. Heinrich, C. Lu, K.T. McDonald, et al., “Electron attachment, effective ionization coefficient, and electron drift velocity for CF_4 gas mixtures,” Nucl. Instr. Meth., vol. A323, pp. 273-279, 1992.

[132] S. Biagi, “Accurate three-dimensional simulation of straw chambers using slow, medium and fast gas mixtures,” Nucl. Instr. Meth., vol. A310, pp. 133-136, 1991.

[133] J.E. Velazco, J.H.Kolts, D.W. Setser, “Rate constants and quenching mechanisms for the metastable states of argon, krypton and xenon,” J. Chem. Phys., vol. 69(10), pp. 4357-4373, 1978.

[134] A. Pansky, A. Breskin, A. Buzulutskov, R. Chechik, V. Elkind, J. Va’vra, “The scintillation of CF_4 and its relevance to detection science,” Nucl. Instr. Meth., vol. A354, pp. 262-269, 1995.

[135] H. Kolanoski, “Investigation of aging in the HERA-B Outer Tracker Drift Tubes,” Proceedings of Nuclear Science Symposium and Medical Imaging Conference, France, October 2000.

[136] M. Hohlmann, “The Outer Tracker of HERA-B,” Nucl. Instr. Meth., vol. A461, pp. 21-24, 2001. [137] C. Stegmann, “The Outer Tracker of HERA-B,” Nucl. Instr. Meth., vol. A453, pp. 153-158, 2001. [138] M. Titov, “Aging Studies for the Muon Detector of HERA-B,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[139] M. Danilov, L. Laptin, I. Tichomirov, M. Titov, Yu. Zaitsev, “Aging tests of the proportional wire chambers using Ar/CF_4 /CH_4 (74:20:6), Ar/CF_4 /CH_4 (67:30:3) and Ar/CF_4 /CO_2 (65:30:5) mixtures for the HERA-B Muon Detector,” hep-ex/0107080, preprint ITEP-43-00, 2000.

[140] A. Arefiev, S. Barsuk, M. Danilov, V. Eiges, M. Titov, Yu. Zaitsev, et al., “A Gaseous Muon Detector at the HERA-B Experiment,” IEEE Trans. Nucl. Sci., vol. 48(4), pp. 1059-1064, 2001.

[141] M. Danilov, Yu. Gilitsky, T. Kvaratschellia, L. Laptin, I. Tichomirov, M. Titov, Yu. Zaitsev, “Aging studies of large area proportional chambers under high rate irradiation with CF_4 -based mixtures,” hep-ex/0111077 and hep-ex/0111078, preprint ITEP-15-01, 2001.

[142] G. Gavrilov, A. Krivchitch, E. Kuznetsova, V. Lebedev, L. Schipunov, E. Lobachev, “Aging properties of the straw drift-tubes operating with gas mixture containing C_2 H_2F_4 ,” Preprint PNPI-2407, 2001.

[143] O. Prokofiev, “Aging tests of full scale CMS muon cathode strip chambers,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[144] V. Souvorov, “First results of an aging test of full scale MWPC for the LHC-B muon system,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[145] W. Dunnweber “Irradiation response of straw drift tubes,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[146] J. Brack, J. Belz, S. Clark, J. Ely, B. Fox, G. Hofman, et al., “The HERMES forward tracking chambers: construction, operation and aging effects,” Nucl. Instr. Meth., vol. A469, pp. 47-54, 2001.

[147] A. Romaniouk, “Aging studies for the ATLAS transition radiation tracker (TRT),” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[148] A. Krivchitch “Anode wire swelling - a new phenomenon for anode wire aging at high doses,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[149] T. Ferguson, G. Gavrilov, A. Egorov, A. Krivchitch, E. Kuznetsova, V. Lebedev, et al., “Anode wire swelling - a possible phenomenon in anode wire aging under high-accumulated doses,” Preprint PNPI-2406, 2001.

[150] T. Ferguson, G. Gavrilov, A. Krivchitch, E. Kuznetsova, V. Lebedev, L. Schipunov, “The effect of oxygen on anode wire swelling under the high accumulated doses,” Preprint PNPI-2443, 2001.

[151] A. Schreiner, “Humidity dependence of anode corrosion in HERA-B outer tracker chambers with Ar/CF_4 /CO_2,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[152] A. Schreiner, “Aging studies of drift chambers of the HERA-B outer tracker using CF_4 -based gases,” Dissertation, University Humboldt, 2001.

[153] M. Capeans, C. Garabatos, R. Heuer, R. Mackenzie, T. Meyer, F. Sauli, K. Silander, “Ageing properties of straw proportional tubes with Xe/CF_4 /CO_2 gas mixture,” CERN-PPE/93-136, 1993.

[154] V. Bondarenko, B. Dolgoshein, V. Grigoriev, A. Kruglov, I. Markina, “Studies of radiation aging of the straw proportional tubes with Xe/CF_4 /CO_2,” Nucl. Phys. B., vol. 44, pp. 577-580, 1995.

[155] M. Hohlmann, “A clean gas system with closed loop for a large gaseous detector operating at high rates,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.

[156] H.B. Dreis, “Gas support systems for hadronic high-rate detectors,” presented at the International Workshop on Aging Phenomena, DESY, Hamburg, Oct. 2-5, 2001.