arXiv:hep-ex/0206028 v1 12 Jun 2002

HARP: a hadron production experiment

Emilio Radicioni CERN (Geneva, Switzerland) and INFN-Bari (Bari, Italy) on behalf of the HARP collaboration

Hadron production is a key ingredient in many aspects of neutrino physics. Precise prediction of atmospheric neutrino fluxes, characterization of accelerator neutrino beams, quantification of pion production and capture for neutrino factory designs, all of these would profit of highstatistics, high-precision hadron production measurements. In addition, such data is needed for the calibration of Monte-Carlo hadron production models. The HARP experiment at CERN is performing extensive measurements of cross sections and secondary particle yields to address these problems.

1 Introduction

Hadron production data is relevant in several branches of neutrino physics.

The study of atmospheric neutrinos provides strong evidence for neutrino oscillations. At the same time, to quantitatively understand this phenomenon, several accelerator-based neutrino experiments are being built, and new types of neutrino beams are being designed. In either cases, detailed knowledge of the hadron cross sections at the relevant energies is now considered a must.

The design of alternative neutrino beams would profit a lot from a more detailed knowledge of the hadron production cross-sections. Optimizing the figure of merit (and the cost) of the so-called neutrino factory (neutrino beam produced by decays in a muon storage ring) depends on the production and collection efficiency of pions at the target station, and therefore requires a systematic study of pion production cross sections at several energies (from a few GeV to 24 GeV, depending on design choices) and with several target materials.

The calculation of atmospheric neutrino fluxes is dominated by the primary cosmic ray flux, by the hadron production in the interaction of the primaries with target air nuclei, and by the subsequent decay chains. Since the primary cosmic ray spectrum is considered to be known to better than 10%, most of the uncertainty comes from the limited understanding of hadron interactions. Different Monte-Carlo simulations, depending on the model they are based on, provide estimates which can differ by as much as 30%^1. The relevant energy range for primary particles is, in this case, from a few GeV to a few 100 GeV, while target material should be as close as possible to the constituents of the atmosphere, namely N_2 and O_2.

Traditional neutrino beams are produced, much similarly as the atmospheric neutrinos, as decay products of the particles produced by a primary interaction of a proton beam in a target. It is therefore not surprising that, again, being able to describe the beam composition in detail relies on the detailed knowledge of the primary hadron interaction cross sections. The range of interesting beam energies spans from 8GeV^4 (for the beam of the MiniBooNE experiment at FNAL), to 12GeV (K2K beam^5 from KEK to SuperKamiokande), to 50GeV (the future JHFnu beam, again to SuperKamiokande) to 120GeV (to MINOS from FNAL), to 400GeV (CERN’s

Figure 1: The HARP apparatus.

CNGS).

A valuable by-product of such a systematic study would be a calibration sample for Monte- Carlo hadron production models, very much useful not only in neutrino physics, but also as precious a tool in the study of present and future detectors performances.

From this point of view, it is not surprising that relatively low-energy (in the 1GeV-to- 100GeV scale) hadron production experiments are being operated, built or proposed^{2 3 7 6}. Such experiments all share a basic design, consisting in the presence of open-geometry spectrometers, as close as possible to full angular coverage, and in the aim at full particle identification. This design has already been seen in heavy-ions experiments, whose calibration samples with proton beams are similar to the kind of measurements needed for our purposes. However, they are limited in acceptance or, most frequently, in statistics (small event sample, only one beam momentum, limited number of target materials).

The HARP^2 experiment at CERN is performing a systematic study of hadron cross sections at several beam momenta (from 2GeV/c to 15GeV/c) and on a large number of thin, thick and cryogenic targets. HARP’s design (Fig. 1) aims at a full-acceptance apparatus, capable of collecting a large number of settings thanks to its high-rate capability of one setting, corresponding to a few million events, per day. The desired overall precision of about 2% requires keeping the efficiency under control down to the level of 1%, primarily by redundancies in the acceptance regions of the detectors, shown in figure 2.

In addition to the standard set of target geometries and materials, HARP is also measuring production cross section on special targets provided by the K2K and MiniBooNE collaborations.

2 HARP apparatus

The HARP experiment is located on the T9 beam line in the East Hall of the CERN PS complex.

The PS delivers 24GeV/c protons to a primary target, supplying secondary beams to the East Hall experimental area. Several bending and focusing magnets allow to momentum-select and steer the beam to a 10mm spot onto the HARP target. The PS is operated with a 16.8s super-cycle; during this time, it delivers several spills to the East Hall in slow-extraction mode with a 400ms flat-top. HARP has been designed with the aim of collection up to 1000 events in such spills, which represents a relatively high rate, especially for the TPC. Since the beam is an admixture of several particle types (deuterons, protons, kaons, pions, muons, electrons) all of the same momentum, the beam line is instrumented with threshold Cerenkov and Time-Of-Flight detectors to tag the incoming particle. To precisely predict the impact position on the HARP target, trajectories of beam particles are recorded by 3 sets of X-Y multi-wire proportional chambers.

Particles hitting the target are defined by a 2cm diameter scintillation counter suspended on the beam line, which is then used in coincidence with a forward scintillator plane and a barrel-shaped scintillating fiber trigger surrounding the target.

HARP is using several thin (2% λ_i and 5% λ_i) and thick (0.5 to 1 λ_i) targets. Available materials are carbon, aluminum, copper, tin, tantalum and lead. In addition, cryogenic (liquid H_2, D_2, N_2, O_2) and special experimental (K2K and MiniBooNE) targets are also available. Data points will be collected at several momenta from 2GeV/c to 15GeV/c, for both positive and negative beam polarities.

2.1 Large-angle detectors

Particles with high transverse momentum are detected in a large-angle spectrometer, made by the Time Projection Chamber (TPC) for particle identification by tracking in magnetic field and measurement of dE/dx, and by a high-precision Resistive Plate Chambers (RPCs) time-of-flight arranged in a cylinder around the TPC. To allow backward-going particles to be detected, the target is placed inside the TPC volume.

The TPC consists in a cylindrical volume 1.5m long and 0.8m diameter filled with a 91% Ar, 9% CH_4 gas mixture. The trajectories of charged particles are bent by a 0.7T solenoid magnetic field. A 12KV electric field drives the ionization charges at a velocity of 5cm/μs to the read-out plane, where the induction signals are collected by 3972 pads arranged in 20 concentric rows. The pad signals are digitized in 100ns time bins, corresponding to about 5mm bins in the longitudinal direction.

The RPC system is made by 4-layers, 0.3mm gap RPC chambers. They allow for Time-Of- Flight measurement, e − π separation in the 100-250 MeV/c region and rejection of tracks from piled-up events by measuring the time of crossing tracks with a precision of about 150ps.

2.2 Forward detectors

Immediately after the TPC, a forward trigger scintillator plane selects events with small-angle particles. It is complemented by a further set of RPC chambers for e − π separation. Particles leaving the target in the forward direction are poorly seen in the TPC, and are therefore measured and tagged by the forward spectrometer.

The spectrometer is built around a 4-station Drift Chamber system, where a 0.68T dipole magnet is inserted between the first and the second station. The chambers are filled with 90% Ar, 9% CO_2 and 1% CH_4. The drift chamber modules have been designed for the NOMAD experiment. They are made by 4 sets of 3 planes inclined at angles of −5, 0, +5, and in HARP they have been oriented to have vertical wires. The drift chambers are expected to deliver 200μ resolution in the horizontal plane; this is a lower figure than quoted in Nomad, due to a change in the gas mixture imposed by safety constraints.

A 30m^3 Cerenkov detector sits after the second drift chamber station. It is filled with C_4F_{10} at atmospheric pressure. A set of cylindrical mirrors collect the light to 38 photo-multipliers. Its main purpose is the particle identification in the high-energy region. The thresholds are 2.6GeV/c for π, 9.3GeV/c for K and 17.6GeV/c for p.

After the third drift chamber station, a large Time-Of-Flight wall made of 39 scintillation counters identifies particles in the intermediate-energy range where, as shown in figure 2, it links the TPC to the Cerenkov. A preliminary analysis of data taken last year indicates a resolution of about 200ps.

Figure 2: Particle Identification.

At the far end of the apparatus, a lead/scintillating-fibers calorimeter is used as an electron identifier. This is a refurbished version of the CHORUS electron/hadron calorimeter.

3 Present status

After extensive debugging of the detectors during the winter shutdown, data taking has restarted on May 6th 2002, and will continue until end of September.

In the meantime, first attempts at analyzing the data from the year 2001 have been concentrated on low-energy points, with the aim of studying the beam composition and contamination, the RPC calibration and resolution, and the calibration, equalization, clustering, track finding and fitting in the TPC. Very preliminary momentum distributions have been produced and presented to the CERN-SPSC. First published results will be available soon.

References

1. R. Engel, T. K. Gaisser and T. Stanev, “Pion production in proton collisions with light nuclei: Implications for atmospheric neutrinos,” Phys. Lett. B 472, 113 (2000) 2. M. G. Catanesi et al., “Proposal to study hadron production for the neutrino factory and for the atmospheric neutrino flux,” CERN-SPSC-99-35.

3. M. G. Catanesi et al., “Proposal for hadron production measurements using the NA49 detector for use in long-baseline and atmospheric neutrino flux calculations,” CERN-SPSC- 2001-017.

4. E. Church et al. [BooNe Collaboration], “A proposal for an experiment to measure muonneutrino → electron-neutrino oscillations and muon-neutrino disappearance at the Fermilab Booster: BooNE,” FERMILAB-P-0898.

5. Y. Oyama [K2K collaboration], “K2K (KEK to Kamioka) neutrino oscillation experiment at KEK-PS,” 6. Y. Fisyak et al., “P-907: Proposal to Measure Particle Production in the Meson Area Using Main Injector Primary and Secondary Beams,” FERMILAB-PROPOSAL-P-907.

7. I. Chemakin et al. [BNL-E-910 Collaboration], “Centrality dependence of pi- production and stopping in p A collisions at 18-GeV/c,”