arXiv:hep-ex/0209063 v1 23 Sep 2002

Physics in Collision - Stanford, California, June 20-22, 2002

BABAR LEVEL 1 DRIFT CHAMBER TRIGGER UPGRADE

Valerie Halyo Stanford Linear Accelerator Center, 2575 Sand Hill RD, Menlo Park CA, USA

ABSTRACT As PEP-II is exceeding the original design luminosity, BaBar is currently upgrading its Level 1 Drift Chamber Trigger (DCT) to reduce the rate of background Level 1 triggers by more than 50% while preserving the high Level 1 trigger physics efficiency. New Z-Pt-Discriminator VME boards (ZPD) utilizing the stereo hit information from the drift chamber are being built to extract the track z coordinate at the beam line with a resolution of a few centimeters.

1 Introduction

As PEP-II exceeds its original design luminosity, BaBar upgrades its Level 1 Drift Chamber Trigger (DCT) to reduce the rate of background Level 1 triggers. The Level 1 trigger system in BaBar receives information from the Drift Chamber, the Calorimeter, and Instrumented Flux Return. The Drift Chamber information sent to the DCT is used to generate segments in the Track Segment Finder (TSF). This technique uses the drift time in order to establish accurate position and time of the track segment. In addition a Look Up Table derived from data is used to calibrate the best segment pattern into its corresponding track position and time. Once the segments are generated they are sent to the Binary Link Track Module (BLT) and to the new Z-PT Discriminator (ZPD). The BLT is responsible to combine these segments into tracks providing the first track multiplicity count. The ZPD extracts the track Pt and z coordinate at the beam line. The processed data is sent to the GLobal Trigger. The GLT attempts to match the spatial and angular location of calorimeter towers and drift chamber tracks. This result in 24 trigger lines which are sent to the Fast control to issue a L1 trigger.

2 The Z-PT Discriminator upgrade

The New Z-Pt-Discriminator boards (ZPD) replace the Pt Discriminator boards which only extracted the Pt of the tracks. The ZPD boards utilize the stereo hit information from the drift chamber to extract in addition the track z coordinate at the beam line. The ZPD boards select tracks based on their transverse momentum and their origin along the beam line, z_0, in order to reject beam pipe interactions far from the interaction point. The ZPD algorithm is composed of two main modules the Seed Track Finder and a z_0 Fitter. The first is a pattern recognition module which finds seed tracks with up to ten segments each, and the second module fits the seed tracks to a helix in order to determine their z_0. The resulting new trigger line can be based on any desired combination of z_0, PT and tan λ values. There are 8 new VME boards, each one receives input at 1 Gbyte/sec. The 153-line internal signal mega-bus transmit data at 120 Mhz. The are six algorithm engines (XC2V4000 FPGAs) per ZPD board working in parallel.

3 ZPD performance

The new ZPD boards are designed to accommodate the upcoming BaBar demands for high luminosity. The ZPD reduces the rate of background Level 1 triggers by more than 50% while preserving the high Level 1 trigger physics efficiency. A Monte Carlo simulation with higher background level was generated to test the performance of the ZPD. The results, as can be seen in fig 1 demonstrate that even up to 6 times the current background level we can achieve about 40% background suppression by rejecting events that lack at least one track with |z_0| < 13cm. In order to test the MC event efficiency using the ZPD algorithm. The event efficiency was tested on different MC samples including rare B decays. The denominator is simply all MC events passing at least one existing L1 trigger. Fig. 1 shows the event efficiency of the following rare B decays samples, where one B decayed generically while the other B decayed to: B^0 → K^0_s π^0, B^− → τ ν, B^0 → K^0_s νν, B^0 → π^0π^0. The results are very encouraging given the current pure DCT triggers are ranging from 80–95% for these events.

Figure 1: The total trigger rate vs. the |z_0| cut in different background conditions (Left). Event efficiency for rare B decay samples, where the event efficiency is determined by whether the event has at least one track with |z_0| < Zcut (Right).

The total trigger rate reduction due to an addition of a Z requirement |z_0| < 15cm is 30%, and improves to 38% for |z_0| < 10cm. However, it should be noted that the total trigger rate when the DCT lines are disabled is about 40% which is an irreducible rate (in the current BaBar trigger configuration) since they are triggered by at least one EMT-only trigger lines, independent of DCT. 4 Acknowledgments This work was supported by Department of Energy contract DE-AC03-76SF00515. References 1. The BaBar Detector, Nucl. Ins. Methods A 479 1-116 (2002). 2. A. Berenyi et al, IEEE Trans. Nucl. Sci. NS-46 , 2006 (1999). 3. A. Berenyi et al, IEEE Trans. Nucl. Sci. NS-46 , 348 (1999).