arXiv:hep-ex/0305011 v1 9 May 2003

DETERMINATION OF THE LEP BEAM ENERGY USING Z RECOIL EVENTS

CHRISTIAN ROSENBLECK III. Physikalisches Institut A, RWTH Aachen, D-52062 Aachen, Germany

The precise knowledge of the beam energy, Ebeam, at the LEP collider is important to reduce the systematic uncertainty on the W mass. The measurements by the LEP energy group can be cross checked using Z recoil events. Preliminary results of the four LEP experiments ALEPH, DELPHI, L3, and OPAL are presented. The combination of the results shows no significant deviation of the Ebeam value obtained using Z recoil events from the measurement by the LEP energy group.

1 Determination of the LEP beam energy

The very precise method to determine the beam energy that was used for the Z run of LEP with an uncertainty of about 1 MeV, the resonant depolarization method 1, is not available for beam energies above 60 GeV because the electron and positron beams remain unpolarized beyond this energy. To determine the energy of beams of a higher energy – more than 100 GeV in the last year of LEP operation – another method had to be used. Nuclear magnetic resonance (NMR) probes were installed in 16 of the LEP dipole magnets. The beam energy is obtained using the magnetic field B measured by these probes: E_{beam} ∼ ∮ B · dl. This value has to be calibrated against the energy from the depolarization method at lower energies by assuming a linear relation between E_{beam} and B to extrapolate to higher energies. The extrapolation method is cross checked using flux loop measurements, a spectrometer, and spin tune measurements 2. The uncertainty on the LEP beam energy measurement from these methods is about 20 MeV. The LEP energy model also describes the time-dependent energy variation at each interaction point. An independent cross check can be obtained by measuring the kinematics of Z recoil events as described below.

Figure 1: The Feynman diagram for Z recoil events. The beam electron or positron emits a hard initial state photon. An on-shell Z boson is produced, which decays to a fermion-antifermion-pair.

2 Z recoil events

Figure 1 shows the Feynman diagram of the “radiative return” events used for the beam energy determination. Either the incoming electron or positron emits a high energy photon before the collision. The Z exchange process has a high cross section at energies around the Z mass. Therefore the energy of the photon is such that an on-shell Z boson is produced in most cases. In general, the photon escapes along the beam direction, but it is sometimes observed in the calorimeters.

Due to photon emission, the effective centre-of-mass energy, √ s^′, for fermion-antifermion-pair production is reduced from the nominal centre-of-mass energy √ s. The reduced centre-of-mass energy can be extracted from event kinematics using √ s^′ = √ s · sin (θ^f ) + sin (θ^{f̄} )− | sin (θ^f + θ^{f̄} ) | sin (θ_f ) + sin (θ¯_f )+ | sin (θ_f + θ¯_f ) |

, (1)

Figure 2: Distributions of the effective centre-of-mass energy, √ s^′, as measured by OPAL, for μ^+μ^− (γ) final states (upper left), τ^+τ^−(γ) final states (upper right), and e^+ e^−(γ) final states (lower plots). Due to the large t-channel contribution, the recoil peak for the electron case is not seen as clearly as for the other channels. The “comb” structure at the end of the spectrum is due to the integral over different energies.

Figure 3: Effective mass of two-jet events, taken with the L3 detector, after kinematic fit, in the recoil peak region.

where (θ¯_f ) θ_f is the angle between the (anti-)fermion and the photon. Alternatively, a kinematic fit can be applied to the event, imposing four-momentum-conservation. This fit significantly enhances the resolution of the spectrum of the effective mass m_{eff}.

All four LEP experiments use the muon pair final state for this analysis. This channel has a very clear signature and low background. OPAL also uses the electron and the tau pair final states. Figure 2 shows √ s^′-distributions for lepton final states, as measured by OPAL. The radiative return peak at effective centre-of-mass energies of the Z boson mass is clearly visible. In addition, DELPHI, L3, and OPAL use two jet final states, making use of the high statistics of this channel. Figure 3 shows the distribution of the effective mass after kinematic fit for the L3 hadronic data.

The analyses presented here 3^,4^,5^,6 are performed on the 1997 to 2000 data sets with a total integrated luminosity of about 685 pb^{−1} per experiment.

3 Beam energy extraction

Different methods are used to extract the beam energy from the √ s^′ or m_{eff} spectra. In general, the precise knowledge of the Z boson mass, m_Z = 91.1876 ± 0.0021 GeV 7, allows to measure the beam energy using the position of the radiative return peak. In the analyses either E_{beam} is assumed to be the nominal value, then a new m_Z value is determined, and from the deviation of the new Z mass from the precision measurement a shift in the beam energy can be extracted. Alternatively, the Z boson mass is assumed to be the precision mass, and the beam energy is extracted directly.

For ALEPH muon pair events, a maximum likelihood fit is performed on the distributions of √ s^′ and on the “raw” effective mass

m^2_{raw} = 2 · p_1p_2 · (1 − cos θ_{12}), (2)

where p_i are the measured momenta of the muons and θ_{12} is the angle between them.

From a likelihood fit to both spectra, Data - Monte Carlo differences Δ √ s^′ and Δm_{raw} are extracted. These values are used to create a χ^2 function, which depends on the beam energy. By minimizing χ^2 = f(E_{beam}), a possible deviation

ΔE_{beam} = E^{meas}_{beam} − E^{LEP}_{beam} (3)

Figure 4: The “raw” effective mass (left) and the effective centre-of-mass energy (right) of muon pair events, as recorded with the ALEPH detector. Dots represent Data, whereas the histograms show Monte Carlo predictions for different Z masses. The lines show the functions used in the maximum likelihood fit.

from the nominal beam energy is obtained.

In the second method, used by DELPHI and OPAL for lepton pair events, the Z boson mass is assumed to be the precision mass. The deviation from the nominal centre-of-mass energy, ΔE_{CMS} = 2 · ΔE_{beam} is expressed as

ΔE_{CMS} = m_Z x − √ s_{LEP}, (4)

where x = √ s^′√ s , a function of the (anti-)fermion-photon angles only. A possible deviation from the nominal beam energy, ΔE_{beam}, is then extracted from comparing the results from a fit of a Breit-Wigner-like function to the ΔE_{CMS} distributions for Data and Monte Carlo prediction as shown in Figure 5.

In an ansatz used by DELPHI for hadronic final states and by L3 for hadronic and muon pair events, an unbinned maximum likelihood fit, using Monte Carlo event weights w = f( √ s^′, m_{test}) f( √ s^′, m_Z)

, (5)

where f( √ s^′, m) is a Breit-Wigner-like function and m_{test} is the mass to be tested, is performed to the √ s^′ or m_{eff} spectra to extract the Z boson mass, m^{fit}_Z . Any deviation from the precision mass is attributed to a deviation of the beam energy from the nominal value using

ΔE_{beam} = −E^{LEP}_{beam} · m^{fit}_Z − m_Z m_Z

. (6)

In the last method described here, used by OPAL for hadronic events, a Breit-Wigner-like function is fitted to the Monte Carlo √ s^′ spectrum to obtain the peak position m^∗_{mc}. The same function is fitted to the data spectrum, leaving only the normalisation and the peak position, m^∗_{Data}, as function of E_{beam}, as free parameters. A distribution of the data peak position versus the beam energy is obtained, and the beam energy is extracted by requiring

m^∗_{Data}(E_{beam}) = m^∗_{mc}. (7)

Figure 5: ΔECM distributions from DELPHI, for Monte Carlo prediction (left) and μ-pair Data (right). A Breit-Wigner-like function is fitted to both spectra.

4 Systematic uncertainties

The main systematic uncertainties for lepton pair events are the determination of the lepton angles, the ISR modeling (studied by using different orders of photon radiation as implemented in the KK2f 8 Monte Carlo generator), and fit properties. Further uncertainty sources include background uncertainties, Monte Carlo statistics, and LEP parameters. The total systematic uncertainty for the beam energy shift observed in leptonic events is 16 MeV.

For hadronic events, the systematic uncertainty is dominated by hadronisation uncertainties. They are studied by comparing the ARIADNE 9, HERWIG 10, and PYTHIA 11 hadronisation models. Further major contributions are jet measurements and detector modeling. For the combined result from hadronic events, the total systematic uncertainty amounts to 43 MeV.

For the combined result, the main contribution to the systematic uncertainty, amounting to 15 MeV, is due to hadronisation. The total systematic uncertainty is 22 MeV.

5 Results

Table 1 shows preliminary results of each experiment for leptonic and hadronic final states. A graphical representation is given in Figure 6. The final result, obtained by averaging the results from lepton pair and hadronic channels of all experiments, taking all correlations into account, yields ΔE_{beam} = E^{meas}_{beam} − E^{LEP}_{beam} = (−20 ± 25 ± 22)MeV. (8)

This result demonstrates the good agreement between the beam energy measurement from radiative events and the standard LEP energy determination.

References

1. L. Arnaudon et al., Z. Phys. C 66 (1995) 45.

2. LEP Energy Working Group notes 98-02, 99-01, 00-01, 01-01,

http://lepecal.web.cern.ch/LEPECAL/reports/reports.html.

3. ALEPH Collab.; Studies of e^+e^− → Zγ → μ^+μ^−γ events at √ s = 189 − 208 GeV, ALEPH 2003-02 CONF 2003-01.

LEP preliminary

Figure 6: Graphical representation of preliminary Ebeam measurements performed by the four LEP experiments. Shown is the shift from the nominal beam energy. The error bars indicate the total error.

Experiment Channel ΔE_{beam} [MeV] ALEPH μ^+μ^−γ −167 ± 91 ± 48 DELPHI μ^+μ^−γ +113 ± 75 ± 27 DELPHI qq̄γ − 55 ± 53 ± 65 L3 μ^+μ^−γ + 10 ± 115 ± 22 L3 qq̄γ − 46 ± 33 ± 51 OPAL e^+e^−γ + 40 ± 136 ± 78 OPAL μ^+μ^−γ − 51 ± 84 ± 22 OPAL τ^+τ^−γ +301 ± 199 ± 148 OPAL qq̄γ − 66 ± 34 ± 70 Combined l^+ l^−γ + 5 ± 41 ± 16 Combined qq̄γ − 52 ± 24 ± 43 Combined ff̄γ − 20 ± 25 ± 22

Table 1: ΔEbeam results from each experiment. The first error value represents the statistical contribution, the second the systematic contribution.

4. DELPHI Collab.; Preliminary determination of E_{beam} at LEP2 using radiative 2-fermion events in DELPHI, DELPHI 2002-084 CONF 618.

5. L3 Collab.; Measurement of the Z boson mass using Z decays in e^+e^− → Zγ events at LEP2 energies, L3 Note 2792.

6. OPAL Collab.; Determination of the LEP Beam Energy using Radiative Fermion-pair Events, OPAL Physics Note PN493.

7. K. Hagiwara et al. [Particle Data Group Collaboration], Phys. Rev. D 66 (2002) 010001. 8. S. Jadach, B. F. Ward and Z. Was, Comput. Phys. Commun. 130 (2000) 260;

S. Jadach, B. F. Ward and Z. Was, Phys. Rev. D 63 (2001) 113009 9. L. Lonnblad, Comput. Phys. Commun. 71 (1992) 15. 10. G. Corcella et al., arXiv:hep-ph/0210213.

11. T. Sjostrand, L. Lonnblad and S. Mrenna, arXiv:hep-ph/0108264.