hep-lat/9909115 14 Sep 1999

Order a improved renormalization constants

T. Bhattacharya,^a R. Gupta,^a W. Lee,^a and S. Sharpe^b

aMS B285, Los Alamos National Lab, Los Alamos, New Mexico 87545, USA

bPhysics Department, University of Washington, Seattle, Washington 98195, USA

We impose the axial and vector Ward identities on local fermion bilinear operators in the Sheikholesalami- Wohlert discretization of fermions. From this we obtain all the coefficients needed to improve the theory at O(a), as well as the scale and scheme independent renormalization constants, ZA, ZV and ZS /ZP .

1. Introduction

In Reference [1], we studied the improvement of the Wilson-Dirac theory by removing all lattice artifacts linear in the lattice spacing a in on-shell matrix elements. In general, such an improvement for the dimension 3 fermion bilinear operators requires one to tune the coefficient of the clover operator in the action, determine the coefficient of an extra term each in the vector, axialvector, and tensor currents, and obtain the mass dependence of all the renormalization constants. We showed that all these improvement constants, as well as the renormalization constants for the axial and vector currents, can be determined by imposing the axial and vector Ward identities. The remaining renormalization constants, those for the scalar, pseudoscalar and tensor operators, are scheme dependent and cannot be determined by this method. The scheme dependence is, however, the same for both the scalar and the pseudoscalar operators, and the corresponding ratio of renormalization constants can again be obtained.

To test the efficacy of this method, we had evaluated the renormalization constants at β = 6.0 for the perturbative (tadpole improved) value of the clover coefficient, and found that these differed from the values determined by the ALPHA collaboration [2] using a non-perturbatively tuned coefficient. It was not clear whether the differences arose from different O(a^2) errors in the two calculation, or whether the difference in the clover coefficient was responsible for the variation observed. Here we report results of carrying out our procedure after changing the clover coefficient to that used by the ALPHA collaboration, and also at β = 6.2, where the O(a^2) errors are expected to be much smaller.

For the details of the notation used, the numerical technique, a study of the consistency when the same constant is determined in multiple ways, and the choice of the method which determines each quantity best, we refer the reader to Reference [1]. To avoid confusion, we repeat here that the coefficients b̃_X we defined differ from the coefficients b_X used by earlier authors. In particular, at the level of O(a) improvement, one has b̃_X = (Z0_AZ0_S /Z0_P )b_X .

2. Lattice parameters and Results

The results of our calculation done at β = 6.0 and 6.2 are presented in Table 1 and compared to the previous estimates by the ALPHA collaboration [2] and perturbation theory. In those cases where the coefficients b_X and b̃_X differ by more than the estimated error in our determination, we quote both for easier comparison with previous results.

The β = 6.0 calculations were done on 16^3 × 48 lattices, with a sample of 83 configurations at c_{SW} = 1.4755, and 125 configurations at c_{SW} = 1.769. At β = 6.2, we used 61 configurations with a lattice size of 24^3 × 64. The region of axial rotation used for the Ward identities comprise the time-slices 4 − 18 at β = 6.0 and 6 − 25 at β =

Table 1 Renormalization constants and improvement coefficients at β = 6.0 and β = 6.2. β = 6.0 β = 6.2 LANL LANL ALPHA P. T. LANL ALPHA Pert. Th.

C_{SW} 1.4755 1.769 1.769 1.4785 1.614 1.614 1.442 Z^0_V +0.745(1)(1) +0.764(1)(1) 0.7809(6) +0.810(5) +0.784(00)(00)+0.7922(4)(9)+0.821(5) Z^0_A +0.76(2)(1) +0.811(9)(12)0.7906(94)+0.829(3) +0.816(08)(05)+0.807(8)(2) +0.839(2) Z^0_P /Z^0_S +0.77(4)(1) +0.86(2)(0) N.A. +0.949(3) +0.878(15)(06)N.A. +0.953(2) c_A −0.005(15)(20)−0.02(2)(2) −0.083(5) −0.013(0) −0.033(04)(03)−0.038(04) −0.012(1) c_V −0.66(27)(02) −0.02(15)(07)−0.32(7) −0.028(1) −0.10(14)(06) −0.21(7) −0.026(7) c_T +0.17(07)(01) +0.05(04)(00)N.A. +0.020(0) +0.062(35)(08)N.A. +0.019(4)

b̃_V +1.57(2)(1) +1.62(2)(2) N.A. +1.106(11) +1.48(1)(1) N.A. +1.099(10) b_V +1.62(3)(1) +1.68(3)(3) +1.54(2) +1.273(16) +1.54(1)(0) +1.41(2) +1.254(14) b̃_A − b̃_V −0.56(9)(8) −0.26(6)(9) N.A. −0.002(0) −0.11(4)(3) N.A. −0.002(0) b̃_P − b̃_S −0.09(9)(3) −0.02(6)(0) N.A. −0.066(4) −0.06(3)(1) N.A. −0.062(4) b̃_P − b̃_A −0.20(9)(7) −0.09(8)(6) N.A. +0.002(4) −0.07(2)(3) N.A. +0.002(0) b̃_A − b̃_P + b̃_S /2

+0.48(1)(2) +0.69(25)(1) N.A. +0.584(7) +0.50(5)(0) N.A. +0.579(6)

b̃_A +1.01(09)(09) +1.36(06)(10)N.A. +1.104(11) +1.37(4)(2) N.A. +1.097(9) b̃_P +0.81(14)(16) +1.28(09)(15)N.A. +1.105(11) +1.30(4)(5) N.A. +1.099(10) b̃_S +0.90(17)(13) +1.29(10)(12)N.A. +1.172(30) +1.36(5)(4) N.A. +1.161(26)

6.2. Details of the quark masses and the lattice discretizations employed in the calculation will be presented elsewhere [4].

3. Dependence on β and c_{SW}

The determination of c_A is illustrative of the improvement we notice as we go to weaker couplings. This quantity is determined by requiring that the ratio P_{⃗x⟨∂μ[Aμ + acA∂μP ](ij)(⃗x, t)J(ji)(0)⟩} P_{⃗x⟨P (ij)(⃗x, t)J(ji)(0)⟩} (1) be independent of the time t at which it is evaluated, up to errors of O(a^2). Because this flatness criterion is automatically satisfied if the correlators are saturated by a single state, the determination is very sensitive to the small t region. On the other hand, at very small t, the O(a^2) errors dominate. We find that the region well fit by a constant starts at smaller values of t at β = 6.2, and that this results in smaller statistical errors on the determination of c_A. As c_A feeds into the

3-pt Ward identity calculation, the statistical errors are typically smaller at the weaker coupling. In addition, the sensitivity to how the continuum derivatives are discretized on the lattice is reduced, leading to smaller systematic errors.

In contrast, the proper choice of c_{SW} at β = 6.0 has a much smaller effect on the quality of the signal. We find that changing c_{SW} from 1.4755 to 1.769 has little effect on the statistical and systematic errors but brings Z^0_X and c_X closer to their perturbative values. In addition, the differences between the various b̃_X , which are almost zero in perturbation theory, also decrease.

4. Comparison with previous results

Different calculations of the non-perturbative renormalization constants are expected to differ because of residual O(a^2) errors in the theory. The magnitude of these effects are expected to be O(Λ^2_{QCD}a^2) in Z^0_X and O(Λ_{QCD}a) in c_X and b_X . Numerically these are about 0.02 and 0.15 respectively at β = 6.0, and 0.01 and 0.1 respectively at β = 6.2.

The differences between our values and those determined by the ALPHA collaboration are consistent with this qualitative expectation. In fact, the differences between the two determinations of Z^0_V are 0.017(1) and 0.008(1) at β = 6.0 and 6.2 respectively, exactly as expected from an O(a^2) scaling. For Z^0_A, the differences of 0.020(17) and 0.009(13) at the two β values are similar in magnitude, but have much larger errors.

Of the coefficients b_X , only b_V has been calculated by the ALPHA collaboration. The corresponding differences, 0.14(5) and 0.13(2), have large errors but are not inconsistent with the expected O(a) scaling.

The situation is less clear for the coefficients c_X . The ALPHA collaboration has computed only c_A and c_V and our results are completely consistent with theirs at β = 6.2. The differences at β = 6.0 are much larger in comparison and marginally significant.

5. Comparison with perturbation theory

The perturbative results quoted in the table are based on one-loop tadpole improved perturbation theory and their errors are obtained by squaring the one-loop term in this tadpole improved series. We notice that the non-perturbatively determined Z^0_V and Z^0_P /Z^0_S are significantly lower than their perturbative values and all the b̃_X ’s are higher. The coefficients c_X are small, and except for c_A, agree with perturbation theory within errors.

It is worth mentioning that the difference between the perturbative and non-perturbative Z^0_V is about 0.046(1) at β = 6.0 and 0.037(0) at β = 6.2, where the errors are purely statistical. As an O(a^2) contamination in our nonperturbative determination is expected to change by a factor of two between these two calculations, it cannot be a dominant contribution to the observed difference. Furthermore, noting that the tadpole improved α_s is about 0.13 and 0.12 in the two calculations, these differences are only about 2.5 times α^2_s, not unreasonable in a slowly converging perturbative series. The pattern is similar for Z^0_P /Z^0_S , where the difference between the perturbative and non-perturbative results is about 0.09(2) at β = 6.0 and 0.07(2) at β = 6.2. Because of the larger errors, it is, however, not possible to rule out O(a^2) artifacts in this case.

Except for b̃_V , the non-perturbative values for b̃_X are constant within errors as we move from β = 6.0 to β = 6.2. The leading non-perturbative errors in these quantities are O(a), which should change by a factor of about 1.4 between these two couplings. On the other hand, the perturbative one-loop term accounts for only about a fourth of b̃_V −1 and b̃_A −1. Such a high estimate of b̃_X with a correspondingly low value of Z^0_X could indicate a problem with understanding the quark mass dependences in general: more study is needed to clarify this issue.

6. Conclusion

We have demonstrated the feasibility of our method for determining the scheme-independent renormalization constants of the quark bilinear operators. Differences from previous calculations are consistent with the expected O(a^2) differences. Perturbation theory, even when tadpole improved, seems to have O(few × α^2_s) residual errors for the chirally extrapolated renormalization constants. The improvement constants c_X are small, but possibly somewhat larger than predicted by perturbation theory; a detailed comparison is still not possible due to the large errors. The mass dependences of the renormalization constants, given by b̃_X , are much larger than perturbation theory predicts.

REFERENCES

1. T. Bhattacharya, et al., hep-lat/9904011. 2. M. Lüscher, et al., Nucl. Phys. B491 (1997) 344 (hep-lat/9611015); ibid. 323 (heplat/9609035); and M. Guagnelli, et al., Nucl. Phys. (Proc. Suppl.) B63 (1998) 886 (hep-lat/9709088).

3. B. Sheikholeslami, et al., Nucl. Phys. B259, (1985) 572.

4. T. Bhattacharya, et al., in preparation.