arXiv:hep-ph/0204157 v2 8 Jan 2003 arXiv:hep-ph/0204157 v2 8 Jan 2003 arXiv:hep-ph/0204157 v2 8 Jan 2003

Table 1: The values of ⟨0|q̄q|0⟩, g⟨0|q̄σGq|0⟩.

Reference −⟨q̄q⟩^13 −g⟨q̄σGq⟩^15 [MeV] [MeV] [26] 210-230 375-395 [33] 225 402-429 [35] 272 490 [36] 150-180 400-460 [39] 217 429 [40] 178 456 [41] 171 447 This Work 182 422

Table 2: The values of χ^T a

Reference χ^T a [GeV ] [15] 0.002 [18] -0.008 [27] 0.009-0.017 [43] -0.0055 [40] -0.0014 [39] -0.0058 [41] -0.0018 This Work -0.0019

Table 3: The values of χ^πa

Reference χ^πa [GeV ] [14] 1.7-3.0 [11] 1.88 [39] 2.56 [41] 0.68 This work 1.06