arXiv:hep-ph/0207101 v3 14 Nov 2002

Parameter Value Gaussian Uniform Ref. σ half-width λ 0.2210 0.0020 - CKM Workshop |V_{cb}|(excl.) 42.1 × 10^{−3} 2.1 × 10^{−3} - PDG from Artuso/Barberio |V_{cb}|(incl.) 40.4 × 10^{−3} 0.7 × 10^{−3} 0.8 × 10^{−4} PDG from Artuso/Barberio |V_{ub}|(excl.) 32.5 × 10^{−4} 2.9 × 10^{−4} 5.5 × 10^{−4} CKM Workshop |V_{ub}|(incl.) 40.9 × 10^{−4} 4.6 × 10^{−4} 3.6 × 10^{−4} CKM Workshop ΔM_d 0.496 ps^{−1} 0.007 ps^{−1} – CKM Workshop ΔM_s > 14.9 ps^{−1} at 95% C.L. sensitivity 19.3 ps^{−1} CKM Workshop m_t 167 GeV 5 GeV – D0+CDF f_{Bd} √ B̂_{Bd} 230 M eV 30 M eV 15 M eV CKM Workshop ξ =^{fBs} √_{B̂Bs} f_{Bd} √_{B̂B} d 1.16 0.03 0.04 CKM Workshop

B_K 0.86 0.06 0.14 CKM Workshop sin 2β 0.78 0.08 - Last Belle+Babar