arXiv:hep-ph/0305036 v2 19 May 2003

Table 1: Amplitudes in Standard Model and at Ambiguous Moduli Points A(0, −^1_2 ) A(−1, −^1_2 ) A(0,^1_2 ) A(1,^1_2 ) A_{gL=1} in g_L = 1 units V − A 338 220 −2.33 −7.16 S + P −338 220 −24.4 −7.16 f_M + f_E 220 −143 1.52 −4.67 A_{New} = A_{gL=1}/ √ Γ V − A 0.84 0.54 −0.0058 −0.018 S + P −0.84 0.54 −0.060 −0.018 f_M + f_E 0.84 −0.54 0.0058 −0.018