hep-ph/9903328 11 Mar 1999

m_1, ν_1 m_2, ν_2 m_3, ν_3 k

Figure 1 : The sunset diagram k^2/μ^2T

Imaginary part k^2/μ^2T

Real part (subtracted) threshold threshold

..................................................................................................

Figure 2: Threshold approximations for unequal masses (ξ_1 = 0.1, ξ_2 = 0.3, ξ_3 = 0.6) k^2/(9m^2)

Imaginary part k^2/(9m^2)

Real part (subtracted) threshold threshold

..................................................................................................

Figure 3: Threshold approximations in the case of equal masses