F ig . 1 (a )

S

T

hep-th/9910002 1 Oct 1999

F ig . 1 (b )

S

T

F ig . 1 (c )

S

T

-4 -2 0 2 4

0

5

10

15

20

25

F ig . 2 type III type III type I

type II

a g