0 0.05 0.1 0.15 0.2 0.25 0.3

P

+

GeV

/ 0

0.05

0.1

0.15

0.2

T

+VeG

0 0.5 1 1.5 2 n b

s

n

0

0.05

0.1

0.15

0.2

T

+VeG

/

È

P

È

E

2 nd

1 st

                                                                                                      MS

MS

                                                                                              MS
MS

US

US

hadronization line

plot.nb 1

                          V

q q

                                                                                                        S S
q q
r r

p

1
� p

2

p

3
p

4

S S

                        plot.nb 1

                                                                                0 0.1 0.2 0.3 0.4 0.5 0.6

s

+

GeV 2

/

                                                                  2.5

                                                                         5

                                                                  7.5

                                                                     10

                                                               12.5

                                                                     15

                                                               17.5

                                                                     20

V

                                                  +bm

/
n
b

s

n
0

+

GeV 2

/

                                                                  2.5

                                                                         5

                                                                  7.5

                                                                     10

                                                               12.5

                                                                     15

                                                               17.5

                                                                     20

V

                                                  +bm

/

T

 0.182 GeV

0.185

0.19

m

0
 0.005 GeV , n
b
 0

plot.nb 1

0 0.05 0.1 0.15 0.2

T

/
                                                                      0

                                                               0.5

                                                                      1

                                                               1.5

                                                                      2

                                                               2.5

V

                                                  +bm

/

m
0

 0.005 GeV , n
b

 0
s  1 GeV 2

1.5

2
plot.nb 1

0 0.5 1 1.5 2
n
b

s

n
0

0

0.5

1

1.5

2

2.5

+bm

          /

                                                                                                   m
                                                                                                         0

 0.005 GeV , T  0
s  1 GeV 2

1.5

2
plot.nb 1