|M|=1

                                                                                                                   M=0

M=0

 |M|=1

 |M|=2

                                                                                                          Figure 1.

                                                                                                             Figure 2.

                                                                                                           Figure 3.

|M|=2

                                                              0

                                                         10

                                                         20

                                                         30

                                                         40

                                                         50

                                                         60

                                                         70
s  ( m b )

                                                                               1 10 100

                                                                                 1 10 100

                                                              0

                                                         50

                                                    100

                                                    150

                                                    200

                                                    250

                                                    300

                                                    350

                                                    400

V
1

                                                                              1 10 100

B o m b a r d i n g  e n e r g y  p e r  n u c l e o n   ( G e V )

                                                               0

                                                     100

                                                     200

                                                     300

                                                     400

                                                     500

                                                     600

                                                     700
s( M = 0 ) +
s( | M | = 1 ) +
s( | M | = 2 )   ( m b )

V
1

+V
2

arXiv:nucl-th/0104014 v2 5 Apr 2001