arXiv:physics/0606194 v1 22 Jun 2006

CERN-AB-2006-004 DESY 06-001 ILC-Asia-2005-26 JAI-2006-001 KEK Report 2005-9 SLAC-R-796 UT-ICEPP 05-04

ATF2 Proposal

Vol. 2

ATF2 Group

February 13, 2006

Boris Ivanovich Grishanov, Pavel Logachev, Fedor Podgorny, Valery Telnov (BINP SB RAS, Novosibirsk)

Deepa Angal-Kalinin, James Jones, Alexander Kalinin (CCLRC/DL/ASTeC,Daresbury, Warrington, Cheshire)

Olivier Napoly, Jacques Payet (CEA/DSM/DAPNIA, Gif-sur-Yvette)

Hans-Heinrich Braun, Daniel Schulte, Frank Zimmermann (CERN, Geneva)

Robert Appleby, Roger Barlow, Ian Bailey, Leo Jenner, Roger Jones, German Kourevlev (The Cockcroft Institute, Daresbury, Warrington, Cheshire)

Eckhard Elsen, Vladimir Vogel, Nick Walker (DESY, Hamburg)

Nikolay Solyak, Manfred Wendt (Fermilab, Batavia, Illinois)

Tohru Takahashi (Hiroshima University, Higashi-Hiroshima)

Jie Gao, Weibin Liu, Guo-Xi Pei, Jiu-Qing Wang (IHEP, Beijing)

Nicolas Delerue, Sudhir Dixit, David Howell, Armin Reichold, David Urner (John Adams Institute at Oxford University)

Alessio Bosco, Ilya Agapov, Grahame A. Blair^1, Gary Boorman, John Carter, Chafik Driouichi, Michael Price (John Adams Institute at Royal Holloway, Univ. of London)

Sakae Araki, Hitoshi Hayano, Yasuo Higashi, Yosuke Honda, Ken-ichi Kanazawa, Kiyoshi Kubo, Tatsuya Kume, Masao Kuriki, Shigeru Kuroda, Mika Masuzawa, Takashi Naito, Toshiyuki Okugi, Ryuhei Sugahara, Toshiaki Tauchi,^1 Nobuhiro Terunuma, Nobu Toge, Junji Urakawa, Hiroshi Yamaoka, Kaoru Yokoya (KEK, Ibaraki)

Yoshihisa Iwashita, Takanori Mihara (Kyoto ICR, Uji, Kyoto)

Maria Alabau Pons^∗, Philip Bambade, Olivier Dadoun (LAL, Orsay)

∗LAL, Orsay and IFIC, Valencia

ATF2 Proposal, Volume 2, 2005

Benoît Bolzon, Nicolas Geffroy, Andrea Jeremie, Yannis Karyotakis (LAPP, Annecy)

Andy Wolski (LBL, Berkeley, California)

Jeff Gronberg (LLNL, Livermore, California)

Stewart Takashi Boogert, Alexey Liapine, Stephen Malton, David J. Miller, Matthew Wing (University College London, London)

Masayuki Kumada (NIRS, Chiba-shi)

Samuel Danagoulian, Sekazi Mtingwa (North Carolina A&T State University, North Carolina)

Eric Torrence (University of Oregon, Eugene, Oregon)

Jinhyuk Choi, Jung-Yun Huang, Heung Sik Kang, Eun-San Kim, Seunghwan Kim, In Soo Ko (Pohang Accelerator Laboratory)

Philip Burrows, Glenn Christian, Christine Clarke, Anthony Hartin, Hamid Dabiri Khah, Stephen Molloy, Glen White (Queen Mary University of London, London)

Karl Bane, Axel Brachmann, Thomas Himel, Thomas Markiewicz, Janice Nelson, Yuri Nosochkov, Nan Phinney, Mauro Torino Francesco Pivi, Tor Raubenheimer, Marc Ross, Robert Ruland, Andrei Seryi^1, Cherrill M. Spencer, Peter Tenenbaum, Mark Woodley (SLAC, Menlo Park, California)

Sachio Komamiya, Tomoyuki Sanuki^1, Taikan Suehara (University of Tokyo, Tokyo)

1 The Editorial Board

ATF2 Proposal, Volume 2, 2005

Contents

1 Introduction 3

2 Timelines 5

3 Organization 11 3.1 Introduction . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11 3.2 ATF and ATF2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11 3.3 Organization of ATF . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11 3.3.1 International Collaboration Board (ICB) . . . . . . . . . . . . . . . . . . . . . . 12 3.3.2 Technical Board (TB) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 12 3.3.3 Spokesperson (SP) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 12 3.3.4 System/Group Coordinators (SGCs) . . . . . . . . . . . . . . . . . . . . . . . . 13 3.4 Execution of Research Programs at ATF . . . . . . . . . . . . . . . . . . . . . . . . . . 13 3.5 Membership of the Collaboration . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 15

4 Cost Estimation 17

5 International Contributions 19 5.1 Overview . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 19 5.2 International Contribution . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 24 5.2.1 IN2P3 in France . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 24 5.2.2 DESY . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 26 5.2.3 CERN . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 27 5.2.4 UK LCABD Collaboration . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 29 5.2.5 SLAC . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 29 5.2.6 IHEP in China . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 30 5.2.7 PAL in Korea . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 31 5.2.8 KEK and University of Tokyo . . . . . . . . . . . . . . . . . . . . . . . . . . . . 32 ATF2 Proposal, Volume 2, 2005

6 Concluding remarks 35

ATF2 Proposal, Volume 2, 2005

LIST OF FIGURES 1

List of Figures

2.1 Outline of the ATF2 time schedule. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 6 2.2 Time schedule of ATF2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 8 2.2 (continued) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 9 2.2 (continued) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10 3.1 Simplified chart of ATF organization. . . . . . . . . . . . . . . . . . . . . . . . . . . . 14 4.1 Cost distribution of the components normalized by the total cost, where the in-kind ones are also included. 18 4.2 Annual budget estimation in JFY2005 through JFY2007, where in-kind contributions are also shown. 18

List of Tables

4.1 Cost estimation for the ATF2 construction. . . . . . . . . . . . . . . . . . . . . . . . . 17 5.1 International contributions of major institutes, which are based on the expression of interests. 21 5.2 Specification of the quadrupole magnet. . . . . . . . . . . . . . . . . . . . . . . . . . . 31

ATF2 Proposal, Volume 2, 2005

2 LIST OF TABLES

ATF2 Proposal, Volume 2, 2005

1 Introduction

For achieving the high luminosity required at the International Linear Collider (ILC), it is critical to focus the beams to nanometer size with the ILC Beam Delivery System (BDS), and to maintain the beam collision with a nanometer-scale stability.

To establish the technologies associated with this ultra-high precision beam handling, it has been proposed to implement an ILC-like final focus optics in an extension of the existing extraction beamline of ATF at KEK. The ATF is considered to be the best platform for this exercise, since it provides an adequate ultra-low emittance electron beam in a manner dedicated to the development of ILC.

The two major goals for this facility, called ATF2, are : (A) Achievement of a 37 nm beam size, and (B) control of beam position down to 2 nm level. The scientific justification for the ATF2 project and its technical design have been described in Volume 1 of the ATF2 Proposal [1]. We present here Volume 2 of the ATF2 Proposal, in which we present specifics of the construction plans and the group organization to execute the research programs at ATF2.

The sections in this report have been authored by relevant ATF2 subgroups within the International ATF Collaboration. The time line of the project is described in Section 2. Section 3 discuss the structure of the international collaboration. Sections 4 and 5 discuss budget considerations, which are presented as well as the design and construction tasks to be shared by the international collaboration at ATF2. Concluding remarks have been contributed by Dr. Ewan Paterson, Chair of the International Collaboration Board of the ATF collaboration.

ATF2 Proposal, Volume 2, 2005

4 1 INTRODUCTION

ATF2 Proposal, Volume 2, 2005

2 Timelines

The purpose of ATF2 is to address two major challenges of the ILC BDS: focusing the beams to nanometer size and providing sub-nanometer stability. More specifically, as described in the Volume 1[1], the goals of the ATF2 are:

(A) Achievement of a 37 nm beam size

(A1) Demonstration of a compact final focus system based on a local chromaticity correction scheme

(A2) Maintenance of the small beam size

(B) Control of the beam position

(B1) Demonstration of beam orbit stabilization with nano-meter precision at IP.

(B2) Establishment of a beam jitter controlling technique at the nano-meter level with an ILClike beam

In defining the timeline of the ATF2, severals facts have to be taken into consideration.

The official plan proposed by the ILC-GDE (Global Design Effort) is to complete the RDR (Reference Design Report) by the end of 2006 and to write the TDR (Technical Design Report) after two or more years. The scientific goals of the ATF2 have little to do with the RDR. For example, ATF2 will not exert a large influence on the choice of the crossing angle. On the other hand ATF2 can have a big impact on the TDR. The commissioning process of the ILC Final Focus System is very much complicated, as expected from the experience of the SLC. We can learn from the ATF2 what sort of diagnostics system and tuning algorithm are useful for minimizing the process. Thus, ATF2 should be completed well before the TDR, though we do not know exactly when TDR will be finished.

The timelines take into consideration the international nature of the design discussion, fabrication and procurement processes of the hardware components and their testing.

The schedule of the ATF must also be taken into account. As described in Volume 1 of the present proposal [1], ATF2 requires a refurbishment of the floor of the ATF building, which will take a few months. In order not to reduce the precious machine time of the ATF, the refurbishment work must be done during a summer shutdown. Also, the experimental studies at ATF2 after its construction must be carefully scheduled in a consistent way with other ATF studies. One must keep in mind that there are still many subjects to be studied at the ATF to be done in parallel with the ATF2, such as the development of diagnostics devices, beam-dynamics studies, etc,

We decided to adopt the following schedule, while taking the above facts into consideration:

ATF2 Proposal, Volume 2, 2005

Figure 2.1: Outline of the ATF2 time schedule.

• All of the major components, such as magnets, power supplies, BPMs and vacuum components, must be completed by June, 2007.

• The floor refurbishment and subsequent construction of the shield are to be done during the summer shutdown in 2007 (mid-June to October).

• Installation of all the components needed for the ATF2 Goal A will be done in September through December, 2007.

• The first beam operation of ATF2 is expected in February, 2008. Then, at least ATF2 Goal A (achievement of 37 nm beam size) and presumably Goal B1 (orbit stabilization to nanometer level) can be achieved by the time of TDR completion.

Fig. 2.1 shows an outline of the schedule.

Our present schedule leads us to completion of the ATF2 installation by early 2008. This will be followed by commissioning of the beamline, and subsequent efforts towards achieving Goal A as rapidly as possible. We realize that it is highly desirable to accumulate a sufficient amount of real-life experiences from this beamline so as to provide the Technical Design Report of ILC with substantially practical inputs from an operational standpoint. It is also anticipated that even during the construction of ILC, continued beam operation of ATF2 is expected to offer opportunities of further developing beam tuning as well as a training ground for a younger generation of accelerator physicists and engineers.

ATF2 Proposal, Volume 2, 2005

Moreover, the experience with tuning procedures for ATF2 will also serve to minimize the commissioning period of the ILC FFS. Thus, the study at ATF2 will continue even after the start of ILC construction. Even during the machine operation of ILC, ATF2 may serve as a test bed for solving possible problems at ILC and for new ideas. It is also within the scope of ATF2 to test a laser system for the gamma-gamma collider. Thus, ATF2 is a long-term project.

The details of the schedule are shown in Fig. 2.2.

ATF2 Proposal, Volume 2, 2005

Figure 2.2: Time schedule of ATF2.

ATF2 Proposal, Volume 2, 2005

Figure 2.2: (continued)

ATF2 Proposal, Volume 2, 2005

Figure 2.2: (continued)

ATF2 Proposal, Volume 2, 2005

3 Organization

3.1 Introduction

We have established an International Collaboration of ATF with many institutes; it was launched on August 1st, 2005. Now, several additional institutes are preparing to join this collaboration.

The International Collaboration of ATF is based on the Memorandum of Understanding (MoU), which defines the organization of the international collaboration to carry out research programs at ATF accelerator complex, so as to maximally contribute to the world design and development efforts in the areas of particle sources, damping rings, beam focusing and beam instrumentation towards the International Linear Collider (ILC) project. We are adding MoU, a chart of the organization and related material onto new ATF Homepage (http://atf.kek.jp/).

3.2 ATF and ATF2

The design and preparations of the ATF2 project have been proceeded for construction by several international groups (design, magnet, instrumentation, vacuum, alignment and final focus). ATF2 group has been organized under the ATF international collaboration since 2005. The member list of the organization will be shown in (http://atf.kek.jp/) with the approval of ICB. As is evident from the ATF MoU, the construction and operation of ATF2 will be executed under the leadership of the Deputy and Sub-Deputy for the ATF2 project within the framework of the ATF International Collaboration. The management of activities of ATF2 will be carried out under the supervising bodies, as described in the subsequent sub-sections.

In the following we describe a simplified explanation of the ATF MoU and additional decisions after the 1st International Collaboration Board (ICB) meeting.

3.3 Organization of ATF

To execute the scientific programs at ATF, the following bodies were instituted:

• International Collaboration Board (ICB)

• Technical Board (TB)

• Spokesperson (SP) with his/her Deputies

• System/Group Coordinators (SGCs)

ATF2 Proposal, Volume 2, 2005

3.3.1 International Collaboration Board (ICB)

The International Collaboration Board (ICB) is a decision-making body for executive matters related to the ATF collaboration. Each collaborating institute can delegate one member to the ICB. In addition, the ICB is joined by the three GDE Regional Directors, who represent Asian, North American and European regions.

One of the members of the ICB is to serve as the ICB Chair. The nomination of the ICB Chair is done through mutual voting by all of the ICB members.

According to the 1st ICB meeting at Snowmass 2005, an ICB meeting will be held approximately once per year. Research programs and near-term schedules of the machine operation will be posted to the ATF homepage, usually for the upcoming two weeks. If some collaborators have a need to change the schedule, SP or Deputies have to coordinate it.

3.3.2 Technical Board (TB)

The TB consists of approximately 4 ∼ 5 members from each of the Asian, North American and European regions. The members of the ATF Technical Board (TB) are nominated and appointed by the ICB. The TB conducts the following tasks:

• At the request of ICB, assist the Spokesperson in formulating the ATF Annual Activity Plan, which outlines the activity plans of ATF, including the budget and beam-time allocation for each Japanese fiscal year.

• Assist the ICB in assessing the scientific progress that is being made by the ATF collaboration.

The SP has three Deputies and serves as the TB Chair for efficient management. Usually, the schedule of the ATF machine operation is divided to two blocks of operating time per year with about four months of a long summer shutdown. One block is from the middle of October to December, and the other is from the middle of January to the middle of June. Since there are many collaborators, we propose two meetings of TB per year, in December and May, to review and recommend the research programs at ATF.

3.3.3 Spokesperson (SP)

The SP carries out the following tasks:

• Direct and coordinate the work required at ATF in accordance with the ATF Annual Activity Plan.

• Report on progress made by the collaboration to the ICB and the director of KEK.

• Report on matters related to the KEK budget and KEK properties to the director of KEK.

ATF2 Proposal, Volume 2, 2005

3.4 Execution of Research Programs at ATF 13

To carry out these tasks, the SP will:

• Appoint, with the approval of ICB, up to three Deputies to assist in his/her tasks in the areas of – Beam operation, – Hardware maintenance, and – Design, construction and commissioning of ATF2.

• Appoint, with the approval of ICB, the System/Group Coordinators (SGCs) on critical ATF/ATF2 subsystems and study programs.

• Organize a ”Coordination Group” with the Deputies and System/Group Coordinators for coordinating the details of the operation and development at ATF on a daily (during the beam operation period) or weekly (during the maintenance and construction period) basis.

The report and the discussion are usually carried out through the ATF Homepage (http://atf.kek.jp/) with members of ICB, TB and SGCs.

3.3.4 System/Group Coordinators (SGCs)

• The System/Group Coordinators were appointed by the Spokesperson with the approval of ICB.

• The appointment of the System/Group Coordinators was made in a manner consistent with the ATF Annual Activity Plan.

• The System/Group Coordinators coordinate the tasks charged to the assigned Systems or Groups, and assist the Spokespersons and the Deputies coordinate the ATF research programs.

In the case of small study groups with less than 5 members, the Spokesperson or the Deputies may assume the role of its Coordinator on an acting basis.

A simplified organization chart is shown in Fig. 3.1.

3.4 Execution of Research Programs at ATF

The ATF Spokesperson (SP) supervises the construction and operation programs of ATF in accordance with the ATF Annual Activity Plan, as approved by the ICB. The ATF SP can delegate part of his/her tasks to the Deputies and System/Group Coordinators, as deemed appropriate. The planning and execution of the construction and operation programs of ATF must be conducted in a manner consistent with the Japanese laws, KEK internal regulations and other rules applicable in the cases of activities by non-KEK members of the collaboration. Details of the group structures are to be formulated in ways optimized in accordance with the technical nature of each program in

ATF2 Proposal, Volume 2, 2005

Figure 3.1: Simplified chart of ATF organization.

question, e.g.. activities such as design, simulation, testing, construction, commissioning, operation, and investigation.

Additional agreements concerning matters related to execution of non-KEK budget, management of non-KEK properties at the premise of ATF, together with the handling of KEK properties at the premises outside KEK, are to be individually dealt with in Annexes attached to the ATF MoU. The detailed coordination of the beam-time allocation will be done by the Coordination Group. An institute that has not signed onto the ATF MoU may participate in any part of the research programs at ATF, after authorization of the ATF SP, as long as the proposed activity is:

• within the ATF Annual Activity Plan, • under the consent by the relevant the Deputies or System/Group Coordinators, and • promptly reported to the ICB.

Should a conflict of interests occur among the members or Work Groups within the collaboration, the Spokesperson will make the best efforts to resolve it in an amicable manner. When a suitable resolution cannot be reached, the Spokesperson will bring the matter to the ICB for further negotiation towards a resolution.

ATF2 Proposal, Volume 2, 2005

3.5 Membership of the Collaboration 15

3.5 Membership of the Collaboration

Membership of new institutes for the ATF collaboration is subject to approval of the ICB. Institutes that desire to join the ATF collaboration shall submit a proposal to the Spokesperson, who will relay the matter to ICB.

The withdrawal of a member institute from the ATF collaboration is subject to acknowledgment by the ICB. Institutes that desire to withdraw from the ATF collaboration shall submit a notification to the Spokesperson, who will relay the matter to ICB.

ATF2 Proposal, Volume 2, 2005

ATF2 Proposal, Volume 2, 2005

4 Cost Estimation

i In this section we discuss the construction expenses that are considered necessary to complete the ATF2 to be ready towards 2008 for starting the initial commissioning. The expenses associated with the commissioning operation, or possible hardware improvements during commissioning, are not accounted for, since it is considered premature to evaluate these at this stage of efforts.

The ATF2 will be constructed by an international collaboration following the Memoranda of Understanding signed by research institutions participating in the ATF2 project.

Each research institution will fund all normal operating expenses (salaries, administrative support, and travel ) of its personnel.

The expenses for all of the components are expected to be supported equally by three regions of North America, Europe and Asia where the institutions reside, while the conventional facilities will be funded by KEK as the host institute. In addition, KEK will fund the operating cost of ATF and ATF2, which is about 1.5 × 10^8yen per year.

The cost estimation of the construction is summarized in Table 4.1, assuming the maximal use of the ATF facility. The total cost of the ATF2 project is estimated to be 5.2 × 10^8yen. No contingency is added, as is usual in a Japanese cost evaluation. The cost includes in-kinds, whose estimation is about 0.3 × 10^8yen. The cost distribution is shown in Fig. 4.1. Annual budgets are estimated to meet the planned commissioning in February, 2008, as shown in Fig. 4.2.

Table 4.1: Cost estimation for the ATF2 construction.

Item Estimated cost (10^8yen or Oku yen) Conventional Facilities 1.07 Magnets 0.58 Magnet Supports 0.77 Power Supplies 0.68 Vacuum 0.36 Alignment 0.13 Controls 0.20 Beam Instrumentation 1.37 Total Cost 5.16

ATF2 Proposal, Volume 2, 2005

18 4 COST ESTIMATION

Figure 4.1: Cost distribution of the components normalized by the total cost, where the in-kind ones are also included.

Figure 4.2: Annual budget estimation in JFY2005 through JFY2007, where in-kind contributions are also shown.

ATF2 Proposal, Volume 2, 2005

5 International Contributions

5.1 Overview

Many institutes have expressed interest of participating in the ATF2 project, as can also be clearly seen in the author list of the ATF2 proposal. The contributions of major institutes are summarized in Table 5.1. The listed contributions are preliminary at present, since some of them are not yet funded, and are still in a process of proposals to their funding agencies. The ATF2 project will be completed with these contributions.

The European contribution comes from LAL,LAPP (France), DESY ,CERN and universities in UK. They have a strong research program of EUROTeV for the realization of ILC, where R&D on the beam-delivery system is one of major tasks, as well as the CLIC R&D program. Also, there is the LCABD (Linear Collider Accelerator and Beam Delivery) collaboration in UK. Therefore, they will participate in the ATF2 project closely involving them. Especially, they expressed the desire to have responsibilities of the laserwire system and the feedforward and feedback system for beamsize measurements of the micron-size beam and precise orbit control at the sub-micron meter level, respectively. CERN has an in-kind contribution of an active support system for the final focus doublet. Their active participation in the commissioning and beam operation is also expected.

SLAC is the major laboratory from North America. SLAC and KEK have been collaborating on the R&D of linear colliders as well as the B-factory accelerators within the framework of Japan-US Science and Technology Cooperative Program. The ATF2 project is also one research field in the program. SLAC will contribute the electronics of cavity BPMs, the power supply system as well as the beam tuning and operation. Also, SLAC expressed an interest in producing the final doublet system. The mover system of magnets is provided in-kind, which have been used at the FFTB, SLAC.

In Asia, the major laboratories are IHEP (China), PAL (Korea) and KEK as the host. IHEP will produce the quadrupole magnets. PAL will produce the cavity BPMs. They will participate in the beam tuning and operation as well. PAL expressed an interest in the power-supply system, since they have recently developed a similar system. KEK and the University of Tokyo will take responsibility for the precise beam-size monitor at IP, which is called the Shintake monitor based on the laser interferometer, with collaboration with SLAC and UK-universities. Also, KEK will contribute the IP-BPM to measure the vertical beam jitter with an accuracy of 2 nm at the focus point, which will be replaced with the Shintake monitor during the second operational stage. As the host, KEK will provide all other components, including the conventional facilities, in order to ensure completion within the proposed schedule.

In Table. 5.1, there are also human resources estimations that can be available at each institute during three years of the construction and the commissioning for the Japanese fiscal year of 2005 through 2007. The human resources are defined by full-time-equivalent (FTE) man times working period, such

ATF2 Proposal, Volume 2, 2005 as months and years during the three years. The total human resources are estimated to be 39.75 person·years, where the Japanese one is 15 . In addition to the ATF2 human resources, there are 18 person·years for ATF operation of the injection and damping ring at KEK.

We will finalize these contributions by April, 2007, to meet with the initial commissioning time in February, 2008.

The following subsections describe the respective contributions in more detail, including expressions of interest in various fields of the ATF2 project.

ATF2 Proposal, Volume 2, 2005

Table 5.1: International contributions of major institutes, which are based on the expression of interests.

Item LAL, LAPP DESY CERN UK SLAC IHEP PAL KEK/U.Tokyo (France) (German) (Europe) (USA) (China) (Korea) (Japan) Mechanical stability and vibrations (include Ground Motion) of Qs

EUROTeV EUROTeV 1 active stabilization table (2.35×0.8m^2 ×0.8(H)m) 100kCHF (8.72 Myen) yes yes

GEANT4 modeling of the ATF2 beam line by BD- SIM EUROTeV; 1.5 person·year at post-doc level in 2006– 2008 + travel money yes

Evaluation and implementation of steering and optical tuning algorithms, BBA and IP tuning

1 PhD student in 2006–2009 + money for visits to KEK

7 person·month yes+ EUROTeV (ILPS)

0.5 person·year 3 person·month yes

Participation in commissioning activities with development of the strategy yes 4 person·month yes 0.5 person·year yes

Design of the low-noise electronic readout system, and coherent radiation monitor for beam size measurement technical contributions + money for visits to KEK yes

Fast kicker pulser XFEL yes (ATF) Laser wire system EUROTeV (LBBD)

35 Myen yes

Remote operations EUROTeV Survey of relevant collective effects in ATF2 and ATF extraction line

1 person·month (wake field)

ATF2 Proposal, Volume 2, 2005

Item LAL, LAPP DESY CERN UK SLAC IHEP PAL KEK/U.Tokyo (France) (German) (Europe) (USA) (China) (Korea) (Japan) Beam feedback / feedforward system

4 person/year, 10 Myen

4 Myen yes (RF)

High-precision transformer BPMs (3); 100nm resolution, 4mm aperture

EUROTeV 160kCHF (13.95 Myen) QBPM(37): 218 k$ electronics system (24 Myen) QBPM(37): 6 person·month, cavity system 41.5 Myen QBPM(37): 5 Myen hybrid + short cables Q-magnets 2 person·year, 23.5 Myen Magnet movers: 24 Myen yes (33 + spares) Magnet support system (except for FD)

44 Myen

Power supply system 67.5 Myen 6 person·month (if possible) Vacuum system 38.4 Myen Control system 10 Myen Shintake monitor (BSM) 3 Myen 14.5 Myen Final doublet 5 Myen Bends: FF and chicane 17.5 Myen 6 and 8 pole magnets 8.4 Myen IP-BPM system R&D Conventional facility (concrete shields, floor reinforcement) Utilities (air conditioning, water cooling system, AC power cabling) Interlock system, Labor cost (alignment, cabling, setup)

107.2 Myen + more

ATF2 Proposal, Volume 2, 2005

Item LAL, LAPP DESY CERN UK SLAC IHEP PAL KEK/U.Tokyo (France) (German) (Europe) (USA) (China) (Korea) (Japan) Commissioning tools: yes yes wire scanners, screen monitors etc. (8.7 Myen) Alignment: total station system (5 Myen) FTE^1 for 3 years 6.5 ? 1 24 12 3 1.25 18.3 in JFY2005–2007 FTEs for injection and DR at ATF for 3 years

? ? ? ? ? ? ? 27

in JFY2005–2007

1FTE = Full Time Equivalent in person·year

ATF2 Proposal, Volume 2, 2005

5.2 International Contribution

5.2.1 IN2P3 in France

Introduction

At present, two IN2P3 laboratories, LAL (contact person Philip Bambade) and LAPP (contact person Yannis Karyotakis), are able to contribute to the ATF2 project, as outlined below.

The main technical and scientific motivations have been discussed in the context of the ILC-WG4 (Beam Delivery System) activities in phase with the GDE. The argument to train young physicists and engineers on a real system is also recognized as being important.

Partial support for French participation to ATF2 should become available within the global bilateral Japan-France agreement, presently being discussed to promote joint research activities in subatomic physics. French participation to ATF2 was among the projects submitted within this framework. Although there is no information yet on the level of the potential support, the hope is that funds for travel, some extended visits and contributions to a few critical short-term contracts may become available through this scheme.

The projects that IN2P3 can contribute to towards ATF2 are listed below:

Mechanical stabilization

Within the presently funded EuroTeV activities, a frequency analysis of the mechanical support structures of the final doublet can be made, in view of ensuring appropriate stability. This contribution can be connected to the design work of such structures. If additional resources become available, participation to an active stabilization program can also be considered.

GEANT4 modeling

Contributions to a GEANT4 modeling of the ATF2 beam line can be provided, based on the BDSIM tool presently used to study the ILC beam delivery system, by involving part of the on-going EuroTeV activity at LAL (work package ILPS, activity PCDL, which includes GEANT4 modeling of the ILC post-IP extraction line and assessments of the related backgrounds) in 2006. This will serve to estimate the backgrounds from beam losses at the dump after the ”IP” and from a halo produced by upstream collimators. In connection with a program of background measurements, it will also be critical to validate the BDSIM tool. Of particular interest are background conditions in the vicinity of the interferometers planned to measure the beam size (Shintake, coherent synchrotron radiation). Presently, one post-doctoral researcher is being funded throughout 2006 by EuroTeV. He can contribute 50% of his time during 2006. To complement this and to enhance the contribution beyond 2006 and into the commissioning period of ATF2, a second post-doc has to be recruited by mid-2006 for a 2-year period. He/she should have roughly equal contributions on the ILPC/PCDL ILC extraction line work (as additional LAL contribution to EuroTeV) and ATF2 beam-line GEANT4 modeling. This project is closely connected with the work of the group of Grahame Blair (RHUL,UK), author of BDSIM package and with whom the LAL group has a collaborative agreement through the

ATF2 Proposal, Volume 2, 2005

ALLIANCE bilateral scheme (to fund mutual visits). The financing, foreseen for the second post-doc, is 50% from IN2P3 as a direct contribution to the ATF2 project (to be accounted for in 2006-2008 within the funds for the above-mentioned France-Japan collaboration agreement) and 50% on other laboratory funds (this needs endorsement of the LAL scientific council). In total, the contribution to this part of the project would thus be 1.5 person-year at the post-doc level during the 2006 – 2008. In addition, travel money for visits to KEK will be provided through the France-Japan funds. Some complementary travel money for meetings and conferences is available within the LAL ILC group and EuroTeV travel budgets.

Tuning and commissioning

Evaluation and implementation of steering and optical tuning algorithms, and participation in commissioning activities. Participation in the development of dedicated beam instrumentation. A student has recently started PhD study jointly supervised at the University of Valencia (by Angeles Faus-Golfe) and at LAL-Orsay (by Philip Bambade). It will last for about 4 years from September 2005, and a significant part of the thesis work can be spent on ATF2. The funding for this student is secured for the full period (first year at LAL through EU funding, via the research training network contract RTN2-2001-00450, and subsequent years in Valencia with extended periods at LAL, through a newly approved Spanish 3-year contract to fund ILC activities in Valencia and through the bilateral CYCIT-IN2P3 agreement PP05-1, to fund mutual visits). In addition, travel money for visits to KEK will be provided through the France-Japan funds. Some complementary travel money for meetings and conferences is available within the LAL ILC group and EuroTeV travel budgets. For what concerns contributions to beam instrumentation, two projects are considered. The first is to help design the low-noise electronic readout system necessary to reach nanometer-level resolutions with a cavity beam-position monitor at the ”IP”. The second is to contribute to the implementation of a recently proposed scheme to use coherent synchrotron radiation to monitor the ATF2 beam, based on an idea suggested by Takashi Naito (KEK), adapted from a technique currently used on the ATF ring.

Summary of contributions to ATF2

• Mechanical stabilization (to be specified further by Yannis Karyotakis)

• GEANT4 modeling of ATF2 beam line: 1.5 person-years at post-doc level in 2006-2008 + money for visits to KEK

• Tuning algorithms, commissioning and instrumentation: 1 PhD student in 2006-2009 + money for visits to KEK

• Instrumentation developments: technical contributions + money for visits to KEK

ATF2 Proposal, Volume 2, 2005

5.2.2 DESY

Introduction

DESY is interested in fostering collaboration with KEK, specifically in the area of ILC related developments. The ATF activities are unique in that they provide small emittance beams that are required for realistic ILC accelerator and instrumentation tests. ATF is planned as an ILC test facility and thus has the benefits of providing flexibility for the changing the needs of the experiments as they evolve.

At the same time DESY is operating the VUV-FEL as a user facility that grew out of the TESLA test Facility (TTF). The prime goal for this facility is to provide FEL beams for the various users; however, approximately 1/4 of the time is reserved for accelerator studies, which can be viewed as complementary to the ATF program.

The main construction project at DESY during the coming years will be the European X-ray FEL based on TESLA SC linac technology. Preparation for this ambitious project currently dominates DESY’s R&D program, and through the synergy of the shared linac technology represents DESY’s largest contribution to the ILC. Given this situation, it is clear that DESY will not have large resources available to invest in additional or unrelated activities.

The ILC group at DESY tries to benefit from the activities for the VUV-FEL and the XFEL in an optimal manner and contributes to the XFEL in some fundamental research. There are some additional resources that DESY sets aside for ILC specific research. In addition, DESY contributes to the ILC effort via its participation in the EUROTeV program. Given the current commitments and limited resources, it is only possible for DESY to collaborate on new projects that fit well within existing programs and goals. It will not be possible for DESY to assume new larger responsibilities at this time.

Participation in Experiments at ATF

DESY wishes to take part in the experimental program at the ATF. DESY wishes to emphasize the parts of the program that are complementary to the international program at the TTF. In particular DESY wishes to

• contribute to the running of ATF (shifts, preparation, data analysis)

• profit from the experience of using new instrumentation and the possibility to test and use new equipment

• help to propose experiments at the ATF in a worldwide coordinated fashion while taking the available resources into account

Fast Kicker Pulser

DESY is interested to advance the pulser development for the fast kickers in collaboration with KEK. Such a program is already under way (F. Obier), and is mandatory for the XFEL. It is possible that

ATF2 Proposal, Volume 2, 2005 the same pulser can be used for the XFEL and for ATF. As part of the existing collaboration, DESY wishes to continue measurements of the rise and fall times of the kicker pulse using the ATF beam. After successful tests and studies DESY may be in a position to construct and supply the required kicker pulser modules for ATF, providing the necessary resources can be made available.

Laser Wire Facility

DESY is part of the Laser Based Beam Diagnostics (LBBD) collaboration, through its support of the laserwire facility at PETRA. DESY’s contribution to this project has now increased with the purchase of a new laser (within the EUROTeV program). DESY would be interested to extend its current program to the new facilities planned for ATF2 in a manner that is compatible with the the EUROTeV program, together with our UK collaborators.

Remote Operations

DESY is participating in the development of a Mobile Virtual Laboratory as part of its EUROTeV program. The activities are coordinated by F.Willeke and will serve to enable remote diagnostics and interferences. The ATF is planned as an international user facility, and could thus serve as a showcase for the functionality of the approach. DESY is interested to extend these activities towards a remote facility, such as the ATF. Other institutions would be welcome to engage in the remote operation.

Mechanical Stability and Vibrations

DESY has been taking ground motion measurements at many sites worldwide. DESY is also engaged in characterizing the ground motion and so-called ‘cultural noise’. A program to develop accurate vibration sensors to measure spectra in the cold mass of the linac cryomodule is also underway. The work is carried out as part of DESY’s EUROTeV studies and is complemented by activities in Oxford and Annecy. Such R&D could be extended to the ATF2 program.

In addition it will be necessary to characterize the need for active stabilization at the ILC. The ATF would be an ideal place to counterbalance the need for sophisticated stabilization at the sub-micron level versus the benefits of active feedback systems and control loops as they are foreseen for the ATF.

Summary

DESY is seeking to increase the collaboration with KEK within the constraints of its limited free resources. DESY wishes to take part in the experimental program at the ATF and to contribute to its analysis. DESY has made a proposal for specific participation in the areas of kickers, laser wires, remote control, ground motion and stabilization.

5.2.3 CERN

Introduction

Since additional resources have been requested for the CLIC Test Facility No. 3 (CTF-3), the CLIC Team can presently offer as CERN contributions to the ATF2 Project only existing equipment and

ATF2 Proposal, Volume 2, 2005 studies.

Studies

The CLIC Team proposes contributions to the following four groups of studies:

• Development of a commissioning strategy. A corresponding section was already written for the ATF2 design report, Volume 1 [1].

• Investigation of optimum beam-based alignment procedures, e.g., as in [2], with pertinent specification of the BPM ranges.

• Simulations of IP tuning and the determination of the maximum tuning knob ranges, e.g., in the spirit of [3].

• Survey of relevant collective effects in ATF2 and the ATF extraction line, in particular wake fields, e.g., as in [4].

Hardware

In addition, the following hardware contributions are proposed.

• An active stabilization table including stabilizing feet (STACIS2000 system from TMC; value about 100 kCHF). The table is a honeycomb support structure with length 2.4 m, width 0.8 m, and height 0.8 m. The manufacturer guaranteed the absence of any structural resonances below 230 Hz. The stabilizing feet are equipped with integrated geophones for measuring ground vibrations, rubber pads for passive damping, and piezoelectric movers for active damping of load vibrations induced from the ground. The stabilized table was successfully used for the CERN stability study [5]. Presently it is on loan at LAPP (Annecy). The table would be available from the middle of 2006. The best use of this table for ATF2 needs to be identified. One possibility may be to stabilize the final quadrupoles and the IP monitors.

• Three high-precision transformer BPMs (development costs about 160 kCHF plus human resources, co-financed by the European Union within EUROTeV) [6]. The projected spatial BPM resolution is 100 nm and the time resolution 15 ns. The nominal BPM aperture is 4 mm, but it could be increased to, e.g., 6 mm. These BPMs would be available at the end of 2007. The starting point of the EUROTeV BPM design is a similar monitor, used at CTF-3, with a 40-mm aperture [7]. The goal of the EUROTeV work package [8] is to reduce the size of the BPM by a factor of 10 and to improve its resolution accordingly, from a few microns to 100 nm. The advantages of the transformer BPMs compared with, e.g., rf BPMs, are that they function for arbitrary bunch spacing, have a large frequency bandwidth (almost 6 decades) and a simple readout electronics, and that they are insensitive to spray from lost beam particles. The EU- ROTeV packages leaves some flexibility. For the ATF/ATF2 application, information is still needed on the desirable aperture, the surrounding beam pipe, the flange sizes, and the type of flanges.

ATF2 Proposal, Volume 2, 2005

5.2.4 UK LCABD Collaboration

The UK LCABD (Linear Collider Accelerator and Beam Delivery) Collaboration comprises 14 UK institutes working mainly in aspects of the ILC Beam Delivery System. A number of institutes are already involved in collaborative R&D at ATF, and are interested in participating in ATF2. A brief outline of the areas of interest is:

• Development of steering and optical tuning knobs and algorithms (Daresbury Lab.)

• Simulations of IP tuning and optimization of tuning knobs (Daresbury, QMUL)

• Commissioning strategy and participation in commissioning activities (Cambridge, Daresbury Lab., Oxford, QMUL, RHUL, UCL)

• Development of a laserwire system for ATF(2) (Oxford, RHUL, UCL)

• Development of a beam-based intra-train feedback system for beam stabilization for ATF(2) (Daresbury Lab., Oxford, QMUL)

• Development of a ring-to-linac feed-forward system for stabilization of the vertical beam position in the ATF(2) extraction line (Daresbury Lab., QMUL)

• Development of optical alignment capability for ATF NanoBPMs, and final-focus magnets in ATF2 (Oxford)

• Participation in NanoBPM development for ATF(2) (Cambridge, UCL)

The current LCABD project is funded until April 1st, 2007. Contributions can be made to ATF(2) within the framework of the approved LCABD program. UK funding for any contributions beyond April 1st, 2007 could be applied for when the UK funding agencies (PPARC, CCLRC) make their call for proposals, which we currently expect to be in mid-2006. Some UK BDS activities are also supported within the EUROTeV framework.

5.2.5 SLAC

KEK and SLAC have a long history of fruitful collaboration, and have worked jointly on ATF since the design phase. The ATF2 project will bring this collaboration to a new international level. SLAC is interested in participating in design studies and in developing and contributing to ATF2 hardware similar to that needed for ILC. SLAC is also interested in contributing hardware existing at SLAC for reuse at ATF2 and participating in ATF2 commissioning and operation.

Design studies for ATF2:

• Design studies for ATF2 optics

• Evaluation of wake-field effects

ATF2 Proposal, Volume 2, 2005

• Analysis of tolerances • Simulation of tuning methods • Simulation of alignment system • Design of extraction from ATF ring

Development of ILC-like hardware and other hardware for ATF2:

• Electronics for 100 nm resolution ATF2 beamline BPMs • ATF ring BPMs with better resolution and lower systematics • High availability, stable power supplies for ATF2 beamline magnets • High availability fast kicker pulsers • Final doublet quadrupole magnets • Dipole bending magnets • Participate in the design and production of the ATF2 beamline quads at IHEP • Precision magnets movers for ATF2

Contribution of personnel power for commissioning and operation:

• Participate in operation and commissioning of ATF2

An estimate of the personnel-power contribution from SLAC to ATF2 is expected to be approximately 12 FTEs in JFY 2005-2007 (3 years); however the specific hardware development and contributions from SLAC to ATF2 depend details of the collaboration agreements and funding levels.

5.2.6 IHEP in China

The Institute of High Energy Physics (IHEP), Chinese Academy of Sciences, is interested in strengthening the collaboration with KEK within ILC-Asia and ILC-Global frames. ATF2 as one of the most important international collaboration R&D projects for ILC provides a unique possibility to study very low-emittance electron beam, with its production, manipulations, instrumentation, measurements, and operation. IHEP is working on an R&D program of XFEL. There are many common physical and technical problems for ILC (ATF2) and XFEL. IHEP takes the participation to ATF2 as one opportunity to accumulate the experiences for advanced accelerator technology for future relevant projects.

IHEP is fabricating 24 quadrupoles and may fabricate other magnets for the ATF2. The specification is listed in the Table 5.2. The field measurements will be conducted at IHEP.

ATF2 Proposal, Volume 2, 2005

Table 5.2: Specification of the quadrupole magnet.

Quadrupole Type QEA-D32T180 Maximum integrated strength (Tesla) 10.879 Predicted effective length (meters) 0.1978 Maximum gradient (Tesla/meter) [based on predicted L eff] 55.0 Main Coils (Values are per magnet) Maximum Current (Amps) 130.0 Maximum Power (kW) 1.98 Resistance at 40^oC (Ω) 0.117 Incoming cooling water temperature (^oC) 25.4± 0.1 Inlet water pressure (Kg/cm^2) 7.14 Design Water p (Kg/cm^2) across TWO water circuits 6.0 Total Water Flow at Design p (litres/min) at ∼ 20^oC 2.2 Trim Coils (Values are per magnet) Maximum Current ( DC Amps) 5.0 Maximum Power (W) 6.2 Resistance at 40^oC (mΩ) 247

From the planning, the quadrupole magnet fabrication will start for ATF2, right after the magnet fabrication work for BEPC-II is finished.

Concerning the beam dynamics in the ATF2 beam line, IHEP accelerator physicists wish to participate in the beam line design, installation, tuning algorithms, commissioning, data taking and analyzing. IHEP can contribute to the running of the ATF, such as shifts, machine studies and data analysis. Advanced instrumentation technologies are subjects of interests for IHEP, and the involvement of relevant task forces is foreseen in the future.

5.2.7 PAL in Korea

ATF2 is a promising test facility to study the beam generation, beam dynamics, beam diagnostics, and beam operation for a low-emittance and short-bunched Linac, such as the ILC. Most of the ILC technology will also be applicable to the X-ray FEL. As the PAL (Pohang Accelerator Laboratory) is pursuing both the XFEL program and the ILC collaboration, the participation of scientists in the construction and beam study of ATF2 should be beneficial to PAL by boosting the synergy of the shared technology. Collaborations with other worldwide participating laboratories are also desirable. Possible contributions to ATF2 will be beam-dynamics simulations, beam instrumentation (Cavity BPM), rf system (phase measurement and feedback) and precision magnet power supply technology. Total of 15 person-month human-resource contributions are foreseen. The traveling expenses for visits to KEK can be benefited by the utilization of partial support from Japan-Korea CUP (Core University Program).

ATF2 Proposal, Volume 2, 2005

Beam Physics

PAL is a current member of the ILC design effort group. Bunch compression and the damping ring design for ILC are major activities for now. Participation in beam parameter measurements, feedbacks and beam-based optimization of ATF2 should be considered. The contribution of 3 person-month human resources for this study are foreseeable.

Beam Instrumentation

As an active part of the PAL contribution to the ATF2 program, PAL is fabricating cavity BPMs for ATF2. The required detection resolution of the cavity BPM for ATF2 is better than 100 nm. With expertise in the precision machining and fabrication in PAL, we have successfully completed fabrication and cold rf tests of a prototype cavity BPM. Cold tests of the BPM characteristics, such as the resonance frequency, Q-factors and isolation between vertical and horizontal sensitivities, can be performed in PAL using a network analyzer. We are also interested in a hot test of BPMs with a real beam in ATF2 beamlines. The contributions of 6 person-months of human resources will be needed for cavity BPM collaboration. Other kinds of beam-diagnostic monitors, such as a wire scanner and laser wire, are also subjects of interest to us.

Magnet Power Supply

Technology for a precision magnet power supply is another unique area that PAL can contribute to an advanced accelerator program, like ATF2. Depending on the hardware work, up-to 6 person-months of human resources can be allocated for the job. Activities that have been done in PAL are:

• development and operation of ±110A digital bipolar power supplies with accuracies of 2 ppm (10 min) and 10 ppm (12 hr)

• development and operation of ±30A analog switching power supplies with accuracies of 5 ppm (10 min) and 50 ppm (12 hr)

RF Technology

A pulse-to-pulse phase measurement and feedback technique for the rf system is also foreseen as a possible contribution to ATF2 operation. A digital phase measurement and analog phase shifter comprises an rf feedback system. The phase accuracy of the measurement achieved in PAL is 0.03 degree-rms.

5.2.8 KEK and University of Tokyo

The total operational time of ATF was 21 weeks with 110 hours/week in JFY2004. Twenty five foreign researchers have conducted experiments at ATF, which took about 30% of the beam time. ATF has been annually operated with 9 FTEs (Full Time Equivalent) comprising of 3, 3 and 3 FTEs for the injection, damping ring and extraction line, respectively. The operation was fully supported by KEK.

ATF2 Proposal, Volume 2, 2005

Since ATF2 is an extension of ATF to be fully integrated, the above-mentioned human resources will also be available at ATF2. In addition, 5 FTEs will contribute to following activities each year in JFY 2005 – 2007: i.e. the construction period.

KEK contributes in the optics design and an estimation of the tolerances for the magnet stabilities, such as the field strength and the positions, while the originally proposed optics has been evaluated by comparing to the adopted ILC scaled optics. Planning of the commissioning strategy and the tuning methods is also an active field, involving many years of experience in the ATF operation at KEK.

KEK closely collaborates with IHEP and SLAC to design quadrupole magnets and to evaluate the performance by magnetic field measurements.

The magnets must be stabilized, especially in the vertical direction at sub-micron meter level for the final focus beam line, whose requirements are similar to the ILC. KEK produces the magnet support system using FFTB movers. The system can be applicable at ILC.

Cavity BPM (Q-BPM) is one of essential instruments for precise beam-position measurements with an accuracy of 100 nm at the ILC. In close collaboration with PAL, KEK participates in the design of Q-BPM and in the performance measurement at the ATF beam line as well as at a test bench. Also, KEK develops and produces the IP-BPM system with an accuracy of 2 nm, which measures the vertical jitters of the focal point.

All of the ATF2 components are incorporated in the upgraded ATF control system. The vacuum system is also provided by KEK.

As already mentioned, KEK takes care of the conventional facility, including the reinforcement of floors, concrete shields and the utilities, such as the water-cooling system, air-conditioning and interlock system.

The University of Tokyo has the prime responsibility for a precise beam-size monitor, called a Shintake monitor, in close collaboration with KEK, SLAC and UK-universities. The Shintake monitor has been used at the FFTB/SLAC, and it will be upgraded. The major upgrades are the optical system, including the laser, itself, with a half wavelength of 532 nm and precise phase detection and control, as well as the detector system for measuring scattered photons. Background simulations are also active research items in collaboration with the optics group for optimizing the collimation system in the beam line.

ATF2 Proposal, Volume 2, 2005

ATF2 Proposal, Volume 2, 2005

6 Concluding remarks

The ATF2 is an indispensable component of the International R&D program towards the ILC, the International Linear Collider. As described in this document, it represents a scaled model of the Beam Delivery System, BDS, which transports, focuses and controls the beams into the collision points within the detectors. In the ATF2 presented here, the collaboration has produced a system designed to test the optics, tolerances, instrumentation and controls to demonstrate a proof of principle for the ILC. The ATF2 is unique in that beginning with the ultra-low emittance beam from the ATF, its beam stability, size and instrumentation will mimic that of the ILC but obviously at lower energy.

The Coordination Group formed by the collaboration, and described above, has proved to be effective in producing the technical design, the construction and installation plans, the associated budgets, schedules and defined responsibilities of the partners. This team, with the continuing support of the international community, will demonstrate the BDS design, offer learning opportunities on the construction and operation of BDS to all who are interested, particularly the younger members within the community, and be a critical contributor to the realization of the ILC.

Ewan Paterson Chair International Collaboration Board

ATF2 Proposal, Volume 2, 2005

36 6 CONCLUDING REMARKS

ATF2 Proposal, Volume 2, 2005

REFERENCES 37

References

[1] ATF2 Collaboration (B. Grishanov et al.), ATF2 Proposal, Volume 1, CERN-AB-2005-035, CLIC note 636, DESY 05-148, ILC-Asia-2005-22, JAI-2005-002, KEK Report 2005-2, SLAC-R-771, UT- ICEPP 05-02 (2005).

[2] T. Raubenheimer, D. Schulte, “The Ballistic Alignment Method,” PAC99, New York (1999), Brief Review of Linear Collider Beam-based Alignment for Linacs,” T. O. Raubenhaimer, P. G. Tenenbaum, November 2003.(SLAC-TN-03-071)

[3] F. Zimmermann, “Magnet Alignment Tolerances in the SLC Final Focus System Determined by Lie Algebra Techniques,” Nucl. Instr. Meth. A364, 231 (1995).

[4] F. Zimmermann, K.L.F. Bane, C.K. Ng, “Collimator Wake Fields in the SLC Final Focus,” EPAC96, Sitges (1996).

[5] R. Assmann et al., “The CLIC Stability Study on the Feasibility of Colliding High Energy Nanobeams,” Proc. Nanobeam’02, Lausanne, CERN-Proceedings-2003-001 (2002).

[6] Web site: http://www.eurotev.org

[7] M. Gasior, “An Inductive Pick-Up for Beam Position and Current Measurement,” CERN-AB- 2004-053-BDI, CLIC Note 572, presented at DIPAC 2003 (2003).

[8] Web site: https://cern-eurotev-wp5.web.cern.ch/CERN-EUROTeV-WP5/

ATF2 Proposal, Volume 2, 2005